Illustrated Catalogue of Locomotives; Baldwin Locomotive Works
Date: 2012-04-02T00:00:00+00:00
Keywords: Baldwin locomotives; Locomotives -- Catalogs

The Project Gutenberg eBook of Illustrated Catalogue of Locomotives; Baldwin Locomotive Works

This ebook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this ebook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

Title: Illustrated Catalogue of Locomotives; Baldwin Locomotive Works

Author: Baldwin Locomotive Works

Release date: April 1, 2012 [eBook #39329]

Language: English

Credits: Produced by Colin Bell, Christine P. Travers and the Online
Distributed Proofreading Team at http://www.pgdp.net (This
file was produced from images generously made available
by The Internet Archive)

*** START OF THE PROJECT GUTENBERG EBOOK ILLUSTRATED CATALOGUE OF LOCOMOTIVES; BALDWIN LOCOMOTIVE WORKS ***

BALDWIN LOCOMOTIVE WORKS.
[Bird's-eye View.]

Baldwin Locomotive Works.

ILLUSTRATED CATALOGUE
OF
LOCOMOTIVES.

M. BAIRD & Co.,

PHILADELPHIA.

MATTHEW BAIRD, | EDWARD H. WILLIAMS,
GEORGE BURNHAM, | WILLIAM P. HENSZEY,
CHARLES T. PARRY, | EDWARD LONGSTRETH.

PRESS OF
J. B. LIPPINCOTT & CO.,
PHILADELPHIA.

SKETCH OF THE BALDWIN LOCOMOTIVE WORKS.

The Baldwin Locomotive Works dates its origin from the inception of steam railroads in America. Called into existence by the early requirements of the railroad interests of the country, it has grown with their growth and kept pace with their progress. It has reflected in its career the successive stages of American railroad practice, and has itself contributed largely to the development of the locomotive as it exists to-day. A history of the Baldwin Locomotive Works, therefore, is, in a great measure, a record of the progress of locomotive engineering in this country, and as such cannot fail to be of interest to all who are concerned in this important element of our material progress.

Matthias W. Baldwin, the founder of the establishment, learned the trade of a jeweler, and entered the service of Fletcher & Gardiner, Jewelers and Silversmiths, Philadelphia, in 1817. Two years later he opened a small shop, in the same line of business, on his own account. The demand for articles of this character falling off, however, he formed a partnership, in 1825, with David Mason, a machinist, in the manufacture of bookbinders' tools and cylinders for calico-printing. Their shop was in a small alley which runs north from Walnut Street, above Fourth. They afterwards removed to Minor Street, below Sixth. The business was so successful that steam-power became necessary in carrying on their manufactures, and an engine was bought for the purpose. This proving unsatisfactory, Mr. Baldwin decided to design and construct one which should be specially adapted to the requirements of his shop. One of these requirements was that it should occupy the least possible space, and this was met by the construction of an upright engine on a novel and ingenious plan. On a bed-plate about five feet square an upright cylinder was placed; the piston-rod connected to a cross-bar having two legs, turned downward, and sliding in grooves on the sides of the cylinder, which thus formed the guides. To the sides of these legs, at their lower ends, was connected by pivots an inverted U-shaped frame, prolonged at the arch into a single rod, which took hold of the crank of a fly-wheel carried by upright standards on the bed-plate. It will be seen that the length of the ordinary separate guide-bars was thus saved, and the whole engine was brought within the smallest possible compass. The design of the machine was not only unique, but its workmanship was so excellent, and its efficiency so great, as readily to procure for Mr. Baldwin orders for additional stationary engines. His attention was thus turned to steam engineering, and the way was prepared for his grappling with the problem of the locomotive when the time should arrive.

This original stationary engine, constructed prior to 1830, has been in almost constant service since its completion, and at this day is still in use, furnishing all the power required to drive the machinery in the erecting-shop of the present works. The visitor who beholds it quietly performing its regular duty in a corner of the shop, may justly regard it with considerable interest, as in all probability the indirect foundation of the Baldwin Locomotive Works, and permitted still to contribute to the operation of the mammoth industry which it was instrumental in building up.

The manufacture of stationary steam-engines thus took a prominent place in the establishment, and Mr. Mason shortly afterward withdrew from the business.

In 1829-30 the use of steam as a motive power on railroads had begun to engage the attention of American engineers. A few locomotives had been imported from England, and one (which, however, was not successful) had been constructed at the West Point Foundry, in New York City. To gratify the public interest in the new motor, Mr. Franklin Peale, then proprietor of the Philadelphia Museum, applied to Mr. Baldwin to construct a miniature locomotive for exhibition in his establishment. With the aid only of the imperfect published descriptions and sketches of the locomotives which had taken part in the Rainhill competition in England, Mr. Baldwin undertook the work, and on the 25th of April, 1831, the miniature locomotive was put in motion on a circular track made of pine boards covered with hoop iron, in the rooms of the Museum. Two small cars, containing seats for four passengers, were attached to it, and the novel spectacle attracted crowds of admiring spectators. Both anthracite and pine-knot coal were used as fuel, and the exhaust steam was discharged into the chimney, thus utilizing it to increase the draught.

The success of the model was such that, in the same year, Mr. Baldwin received an order for a locomotive from the Philadelphia, Germantown and Norristown Railroad Company, whose short line of six miles to Germantown was operated by horse-power. The Camden and Amboy Railroad Company had shortly before imported a locomotive from England, which was stored in a shed at Bordentown. It had not yet been put together; but Mr. Baldwin, in company with his friend, Mr. Peale, visited the spot, inspected the detached parts, and made a few memoranda of some of its principal dimensions. Guided by these figures and his experience with the Peale model, Mr. Baldwin commenced the task. The difficulties to be overcome in filling the order can hardly be appreciated at this day. There were few mechanics competent to do any part of the work on a locomotive. Suitable tools were with difficulty obtainable. Cylinders were bored by a chisel fixed in a block of wood and turned by hand. Blacksmiths able to weld a bar of iron exceeding one and one-quarter inches in thickness, were few, or not to be had. It was necessary for Mr. Baldwin to do much of the work with his own hands, to educate the workmen who assisted him, and to improvise tools for the various processes.

The work was prosecuted, nevertheless, under all these difficulties, and the locomotive was finally completed, christened the "Old Ironsides," and tried on the road, November 23, 1832. The circumstances of the trial are fully preserved, and are given, further on, in the extracts from the journals of the day. Despite some imperfections, naturally occurring in a first effort, and which were afterward, to a great extent, remedied, the engine was, for that early day, a marked and gratifying success. It was put at once into service, as appears from the Company's advertisement three days after the trial, and did duty on the Germantown road and others for over a score of years.

Fig. 1.—The "Old Ironsides," 1832.

The "Ironsides" was a four-wheeled engine, modeled essentially on the English practice of that day, as shown in the "Planet" class, and weighed, in running order, something over five tons. The rear or driving-wheels were fifty-four inches in diameter on a crank-axle placed in front of the fire-box. The cranks were thirty-nine inches from centre to centre. The front wheels, which were simply carrying wheels, were forty-five inches in diameter, on an axle placed just back of the cylinders. The cylinders were nine and one-half inches in diameter by eighteen inches stroke, and were attached horizontally to the outside of the smoke-box, which was D-shaped, with the sides receding inwardly, so as to bring the centre line of each cylinder in line with the centre of the crank. The wheels were made with heavy cast-iron hubs, wooden spokes and rims, and wrought-iron tires. The frame was of wood, placed outside the wheels. The boiler was thirty inches in diameter, and contained seventy-two copper flues, one and one-half inches in diameter and seven feet long. The tender was a four-wheeled platform, with wooden sides and back, carrying an iron box for a water-tank, inclosed in a wooden casing, and with a space for fuel in front. The engine had no cab. The valve-motion was given by a single loose eccentric for each cylinder, placed on the axle between the crank and the hub of the wheel. On the inside of the eccentric was a half-circular slot, running half-way around. A stop was fastened to the axle at the arm of the crank, terminating in a pin which projected into the slot. This pin would thus hold the eccentric at one end or the other of the half-circular slot, and the engine was reversed by moving the eccentric about the axle, by means of movable hand-levers set in sockets in the rock-shafts, until it was arrested and held by the pin at one end or the other of the slot. The rock-shafts, which were under the footboard, had arms above and below, and the eccentric-straps had each a forked rod, with a hook, or an upper and lower latch or pin, at their extremities, to engage with the upper or lower arm of the rock-shaft. The eccentric-rods were raised or lowered by a double treadle, so as to connect with the upper or lower arm of the rock-shaft, according as forward or backward gear was desired. A peculiarity in the exhaust of the "Ironsides" was that there was only a single straight pipe running across from one cylinder to the other, with an opening in the upper side of the pipe, midway between the cylinders, to which was attached at right angles the perpendicular pipe into the chimney. The cylinders, therefore, exhausted against each other; and it was found, after the engine had been put in use, that this was a serious objection. This defect was afterwards remedied by turning each exhaust-pipe upward into the chimney, substantially as is now done. The steam-joints were made with canvas and red-lead, as was the practice in English locomotives, and in consequence much trouble was caused, from time to time, by leaking.

The price of the engine was to have been $4000, but some difficulty was found in procuring a settlement. The Company claimed that the engine did not perform according to contract; and objection was also made to some of the defects alluded to. After these had been corrected as far as possible, however, Mr. Baldwin finally succeeded in effecting a compromise settlement, and received from the Company $3500 for the machine.

We are indebted for the sketch of the "Ironsides" from which the accompanying cut is produced, as well as for other valuable particulars in regard to the engine, to Mr. H. R. Campbell, who was the Chief Engineer of the Germantown and Norristown Railroad when the "Ironsides" was placed in service, and who is thoroughly familiar with all the facts in regard to the engine. Much of the success of the machine was due to his exertions, as, while the President of the Company was inclined to reject it as defective, Mr. Campbell was earnest in his efforts to correct its imperfections, and his influence contributed largely to retain the engine on the road.

The results of the trial and the impression produced by it on the public mind may be gathered from the following extracts from the newspapers of the day:

The United States Gazette of Nov. 24th, 1832, remarks:

"A most gratifying experiment was made yesterday afternoon on the Philadelphia, Germantown and Norristown Railroad. The beautiful locomotive engine and tender, built by Mr. Baldwin, of this city, whose reputation as an ingenious machinist is well known, were for the first time placed on the road. The engine traveled about six miles, working with perfect accuracy and ease in all its parts, and with great velocity."

The Chronicle of the same date noticed the trial more at length, as follows:

"It gives us pleasure to state that the locomotive engine built by our townsman, M. W. Baldwin, has proved highly successful. In the presence of several gentlemen of science and information on such subjects, the engine was yesterday placed upon the road for the first time. All her parts had been previously highly finished and fitted together in Mr. Baldwin's factory. She was taken apart on Tuesday and removed to the Company's depot, and yesterday morning she was completely together, ready for travel. After the regular passenger cars had arrived from Germantown in the afternoon, the tracks being clear, preparation was made for her starting. The placing fire in the furnace and raising steam occupied twenty minutes. The engine (with her tender) moved from the depot in beautiful style, working with great ease and uniformity. She proceeded about half a mile beyond the Union Tavern, at the township line, and returned immediately, a distance of six miles, at a speed of about twenty-eight miles to the hour, her speed having been slackened at all the road crossings, and it being after dark, but a portion of her power was used. It is needless to say that the spectators were delighted. From this experiment there is every reason to believe this engine will draw thirty tons gross, at an average speed of forty miles an hour, on a level road. The principal superiority of the engine over any of the English ones known, consists in the light weight,—which is but between four and five tons,—her small bulk, and the simplicity of her working machinery. We rejoice at the result of this experiment, as it conclusively shows that Philadelphia, always famous for the skill of her mechanics, is enabled to produce steam-engines for railroads combining so many superior qualities as to warrant the belief that her mechanics will hereafter supply nearly all the public works of this description in the country."

On subsequent trials, the "Ironsides" attained a speed of thirty miles per hour, with its usual train attached. So great were the wonder and curiosity which attached to such a prodigy, that people flocked to see the marvel, and eagerly bought the privilege of riding after the strange monster. The officers of the road were not slow to avail themselves of the public interest to increase their passenger receipts, and the following advertisement from Poulson's American Daily Advertiser of Nov. 26, 1832, will show that as yet they regarded the new machine rather as a curiosity and a bait to allure travel than as a practical, every-day servant:

"Notice.—The locomotive engine (built by M. W. Baldwin, of this city) will depart daily, when the weather is fair, with a train of passenger cars. On rainy days horses will be attached."

This announcement did not mean that in wet weather horses would be attached to the locomotive to aid if in drawing the train, but that the usual horse-cars would be employed in making the trips upon the road without the engine.

Upon making the first trip to Germantown with a passenger train with the Ironsides, one of the drivers slipped upon the axle, causing the wheels to track less than the gauge of the road and drop in between the rails. It was also discovered that the valve arrangement of the pumps was defective, and they failed to supply the boiler with water. The shifting of the driving wheel upon the axle fastened the eccentric, so that it would not operate in backward motion. These mishaps caused delay, and prevented the engine from reaching its destination, to the great disappointment of all concerned. They were corrected in a few days, and the machine was used in experimenting upon its efficiency, making occasional trips with trains to Germantown. The road had an ascending grade, nearly uniform, of thirty-two feet per mile, and for the last half-mile of forty-five feet per mile, and it was found that the engine was too light for the business of the road upon these grades.

Such was Mr. Baldwin's first locomotive; and it is related of him that his discouragement at the difficulties which he had undergone in building it and in finally procuring a settlement for it was such that he remarked to one of his friends, with much decision, "That is our last locomotive."

It was some time before he received an order for another, but meanwhile the subject had become singularly fascinating to him, and occupied his mind so fully that he was eager to work out his new ideas in a tangible form.

Fig. 2.—Half-Crank.

Shortly after the "Ironsides" had been placed on the Germantown road, Mr. E. L. Miller, of Charleston, S. C, came to Philadelphia and made a careful examination of the machine. Mr. Miller had, in 1830, contracted to furnish a locomotive to the Charleston and Hamburg Railroad Company, and accordingly the engine "Best Friend" had been built under his direction at the West Point Foundry, New York. After inspecting the "Ironsides," he suggested to Mr. Baldwin to visit the Mohawk and Hudson Railroad and examine an English locomotive which had been placed on that road in July, 1831, by Messrs. Robert Stephenson & Co., of Newcastle, England. It was originally a four-wheeled engine of the "Planet" type, with horizontal cylinders and crank-axle. The front wheels of this engine were removed about a year after the machine was put at work, and a four-wheeled swiveling or "bogie" truck substituted. The result of Mr. Baldwin's investigations was the adoption of this design, but with some important improvements. Among these was the "half-crank," which he devised on his return from this trip, and which he patented September 10, 1834. In this form of crank, shown in Figure 2, the outer arm is omitted, and the wrist is fixed in a spoke of the wheel. In other words, the wheel itself formed one arm of the crank. The result sought and gained was that the cranks were strengthened, and, being at the extremities of the axle, the boiler could be made larger in diameter and placed lower. The driving axle could also be placed back of the fire-box, the connecting rods passing by the sides of the fire-box and taking hold inside of the wheels. This arrangement of the crank also involved the placing of the cylinders outside the smoke-box, as was done on the "Ironsides."

By the time the order for the second locomotive was received, Mr. Baldwin had matured this device and was prepared to embody it in practical form. The order came from Mr. E. L. Miller in behalf of the Charleston and Hamburg Railroad Company, and the engine bore his name, and was completed February 18, 1834. It was on six wheels; one pair being drivers, four and a half feet in diameter, with half-crank axle placed back of the fire-box as above described, and the four front wheels combined in a swiveling truck. The driving-wheels, it should be observed, were cast in solid bell-metal. The combined wood and iron wheels used on the "Ironsides" had proved objectionable, and Mr. Baldwin, in his endeavors to find a satisfactory substitute, had recourse to brass. June 29, 1833, he took out a patent for a cast-brass wheel, his idea being that by varying the hardness of the metal the adhesion of the drivers on the rails could be increased or diminished at will. The brass wheels on the "Miller," however, soon wore out, and the experiment with this metal was not repeated. The "E. L. Miller" had cylinders ten inches in diameter; stroke of piston, sixteen inches; and weighed, with water in the boiler, seven tons eight hundredweight. The boiler had a high dome over the fire-box, as shown in Figure 3; and this form of construction, it may be noted, was followed, with a few exceptions, for many years.

The valve-motion was given by a single fixed eccentric for each cylinder. Each eccentric-strap had two arms attached to it, one above and the other below, and, as the driving-axle was back of the fire-box, these arms were prolonged backward under the footboard, with a hook on the inner side of the end of each. The rock-shaft had arms above and below its axis, and the hooks of the two rods of each eccentric were moved by hand-levers so as to engage with either arm, thus producing backward or forward gear. This form of single eccentric, peculiar to Mr. Baldwin, was in the interest of simplicity in the working parts, and was adhered to for some years. It gave rise to an animated controversy among mechanics as to whether, with its use, it was possible to get a lead on the valve in both directions. Many maintained that this was impracticable; but Mr. Baldwin demonstrated by actual experience that the reverse was the case.

Meanwhile the Commonwealth of Pennsylvania had given Mr. Baldwin an order for a locomotive for the State Road, as it was then called, from Philadelphia to Columbia, which, up to that time, had been worked by horses. This engine, called the "Lancaster," was completed in June, 1834. It was similar to the "Miller," and weighed seventeen thousand pounds. After it was placed in service, the records show that it hauled at one time nineteen loaded burden cars over the highest grades between Philadelphia and Columbia. This was characterized at the time by the officers of the road as an "unprecedented performance." The success of the machine on its trial trips was such that the Legislature decided to adopt steam-power for working the road, and Mr. Baldwin received orders for several additional locomotives. Two others were accordingly delivered to the State in September and November respectively of that year, and one was also built and delivered to the Philadelphia and Trenton Railroad Company during the same season. This latter engine, which was put in service October 21, 1834, averaged twenty-one thousand miles per year to September 15, 1840.

Fig. 3.—Baldwin Engine, 1834.

Five locomotives were thus completed in 1834, and the new business was fairly under way. The building in Lodge Alley, to which Mr. Baldwin had removed from Minor Street, and where these engines were constructed, began to be found too contracted, and another removal was decided upon. A location on Broad and Hamilton Streets (the site, in part, of the present works) was selected, and a three-story L-shaped brick building, fronting on both streets, erected. This was completed and the business removed to it during the following year (1835). The original building still stands, forming the office, drawing-room, and principal machine-shops of the present works.

These early locomotives, built in 1834, were the types of Mr. Baldwin's practice for some years. Their general design is shown in Figure 3. All, or nearly all of them, embraced several important devices, which were the results of his study and experiments up to that time. The devices referred to were patented September 10, 1834, and the same patent covered the four following inventions, viz.:

1. The half-crank, and method of attaching it to the driving-wheel. (This has already been described.)

Fig. 4.—Baldwin Compound Wood and Iron Wheels, 1834.

2. A new mode of constructing the wheels of locomotive engines and cars. In this the hub and spokes were of cast-iron, cast together. The spokes were cast without a rim, and terminated in segment flanges, each spoke having a separate flange disconnected from its neighbors. By this means, it was claimed, the injurious effect of the unequal expansion of the materials composing the wheels was lessened or altogether prevented. The flanges bore against wooden felloes, made in two thicknesses, and put together so as to break joints. Tenons or pins projected from the flanges into openings made in the wooden felloes, to keep them in place. Around the whole the tire was passed and secured by bolts. The above sketch shows the device.

3. A new mode of forming the joints of steam and other tubes. This was Mr. Baldwin's invention of ground joints for steam-pipes, which was a very valuable improvement over previous methods of making joints with red-lead packing, and which rendered it possible to carry a much higher pressure of steam.

4. A new mode of forming the joints and other parts of the supply-pump, and of locating the pump itself. This invention consisted in making the single guide-bar hollow and using it for the pump-barrel. The pump-plunger was attached to the piston-rod at a socket or sleeve formed for the purpose, and the hollow guide-bar terminated in the vertical pump-chamber. This chamber was made in two pieces, joined about midway between the induction and eduction-pipes. This joint was ground steam-tight, as were also the joints of the induction-pipe with the bottom of the lower chamber, and the flange of the eduction-pipe with the top of the upper chamber. All these parts were held together by a stirrup with a set-screw in its arched top, and the arrangement was such that by simply unscrewing this set-screw the different sections of the chamber, with all the valves, could be taken apart for cleaning or adjusting. The cut below illustrates the device.

Fig. 5.—Pump and Stirrup.

It is probable that the five engines built during 1834 embodied all, or nearly all, these devices. They all had the half-crank, the ground joints for steam-pipes (which was first made by him in 1833), and the pump formed in the guide-bar, and all had the four-wheeled truck in front, and a single pair of drivers back of the fire-box. On this position of the driving-wheels, Mr. Baldwin laid great stress, as it made a more even distribution of the weight, throwing about one-half on the drivers and one-half on the four-wheeled truck. It also extended the wheel-base, making the engine much steadier and less damaging to the track. Mr. William Norris, who had established a locomotive works in Philadelphia in 1832, was at this time building a six-wheeled engine with a truck in front and the driving-wheels placed in front of the fire-box. Considerable rivalry naturally existed between the two manufacturers as to the comparative merits of their respective plans. In Mr. Norris's engine, the position of the driving-axle in front of the fire-box threw on it more of the weight of the engine, and thus increased the adhesion and the tractive power. Mr. Baldwin, however, maintained the superiority of his plan, as giving a better distribution of the weight and a longer wheel-base, and consequently rendering the machine less destructive to the track. As the iron rails then in use were generally light, and much of the track was of wood, this feature was of some importance.

To the use of the ground joint for steam-pipes, however, much of the success of his early engines was due. The English builders were making locomotives with canvas and red-lead joints, permitting a steam pressure of only sixty pounds per inch to be carried, while Mr. Baldwin's machines were worked at one hundred and twenty pounds with ease. Several locomotives imported from England at about this period by the Commonwealth of Pennsylvania for the State Road (three of which were made by Stephenson) had canvas and red-lead joints, and their efficiency was so much less than that of the Baldwin engines, on account of this and other features of construction, that they were soon laid aside or sold.

In June, 1834, a patent was issued to Mr. E. L. Miller, by whom Mr. Baldwin's second engine was ordered, for a method of increasing the adhesion of a locomotive by throwing a part of the weight of the tender on the rear of the engine, thus increasing the weight on the drivers. Mr. Baldwin adopted this device on an engine built for the Philadelphia and Trenton Railroad Company, May, 1835, and thereafter used it largely, paying one hundred dollars royalty for each engine. Eventually (May 6, 1839) he bought the patent for nine thousand dollars, evidently considering that the device was especially valuable, if not indispensable, in order to render his engine as powerful, when required, as other patterns having the driving-wheels in front of the fire-box, and therefore utilizing more of the weight of the engine for adhesion.

In making the truck and tender wheels of these early locomotives, the hubs were cast in three pieces and afterward banded with wrought-iron, the interstices being filled with spelter. This method of construction was adopted on account of the difficulty then found in casting a chilled wheel in one solid piece.

April 3, 1835, Mr. Baldwin took out a patent for certain improvements in the wheels and tubes of locomotive engines. That relating to the wheels provided for casting the hub and spokes together, and having the spokes terminate in segments of a rim, as described in his patent of September 10, 1834. Between the ends of the spokes and the tires wood was interposed, and the tire might be either of wrought-iron or of chilled cast-iron. The intention was expressed of making the tire usually of cast-iron chilled. The main object, however, was declared to be the interposition between the spokes and the rim of a layer of wood or other substance possessing some degree of elasticity. This method of making driving-wheels was followed for several years.

The improvement in locomotive tubes consisted in driving a copper ferrule or thimble on the outside of the end of the tube, and soldering it in place, instead of driving a ferrule into the tube, as had previously been the practice. The object of the latter method had been to make a tight joint with the tube-sheet; but, by putting the ferrule on the outside of the tube, not only was the joint made as tight as before, but the tube was strengthened, and left unobstructed throughout to the full extent of its diameter. This method of setting flues has been generally followed in the works from that date to the present, the only difference being that, at this time, with iron tubes, the end is swedged down, the copper ferrule brazed on, and the iron end turned or riveted over against the copper thimble and the flue-sheet, to make the joint perfect.

Early in 1835, the new shop on Broad Street was completed and occupied. Mr. Baldwin's attention was thenceforward given to locomotive building exclusively, except that a stationary engine was occasionally constructed.

In May, 1835, his eleventh locomotive, the "Black Hawk," was delivered to the Philadelphia and Trenton Railroad Company. This was the first outside-connected engine of his build. It was also the first engine on which the Miller device of attaching part of the weight of the tender to the engine was employed. On the eighteenth engine, the "Brandywine," built for the Philadelphia and Columbia Railroad Company, brass tires were used on the driving-wheels, for the purpose of obtaining more adhesion; but they wore out rapidly and were replaced with iron.

Fourteen engines were constructed in 1835; forty in 1836; forty in 1837; twenty-three in 1838; twenty-six in 1839; and nine in 1840. During all these years the general design continued the same; but, in compliance with the demand for more power, three sizes were furnished, as follows:

First-class. | Cylinders, | 12½ × 16; | weight, | loaded, | 26,000 | pounds.
Second-class. | " | 12    × 16; | " | " | 23,000 | "
Third-class. | " | 10½ × 16; | " | " | 20,000 | "

The first-class engine he fully believed, in 1838, was as heavy as would be called for, and he declared that it was as large as he intended to make. Most of the engines were built with the half-crank, but occasionally an outside-connected machine was turned out. These latter, however, failed to give as complete satisfaction as the half-crank machine. The drivers were generally four and a half feet in diameter.

A patent was issued to Mr. Baldwin, August 17, 1835, for his device of cylindrical pedestals. In this method of construction, the pedestal was of cast-iron, and was bored in a lathe so as to form two concave jaws. The boxes were also turned in a lathe so that their vertical ends were cylindrical, and they were thus fitted in the pedestals. This method of fitting up pedestals and boxes was cheap and effective, and was used for some years for the driving and tender wheels.

As showing the estimation in which these early engines were held, it may not be out of place to refer to the opinions of some of the railroad managers of that period.

Mr. L. A. Sykes, engineer of the New Jersey Transportation Company, under date of June 12, 1838, wrote that he could draw with his engines twenty four-wheeled cars with twenty-six passengers each, at a speed of twenty to twenty-five miles per hour, over grades of twenty-six feet per mile. "As to simplicity of construction," he adds, "small liability to get out of order, economy of repairs, and ease to the road, I fully believe Mr. Baldwin's engines stand unrivalled. I consider the simplicity of the engine, the arrangement of the working-parts, and the distribution of the weight, far superior to any engine I have ever seen, either of American or English manufacture, and I have not the least hesitation in saying that Mr. Baldwin's engine will do the same amount of work with much less repairs, either to the engine or the track, than any other engine in use."

L. G. Cannon, President of the Rensselaer and Saratoga Railroad Company, writes, "Your engines will, in performance and cost of repairs, bear comparison with any other engine made in this or any other country."

Some of Mr. Baldwin's engines on the State Road, in 1837, cost, for repairs, only from one and two-tenths to one and six-tenths cents per mile. It is noted that the engine "West Chester," on the same road, weighing twenty thousand seven hundred and thirty-five pounds (ten thousand four hundred and seventy-five on drivers), drew fifty-one cars (four-wheeled), weighing two hundred and eighty-nine net tons, over the road, some of the track being of wood covered with strap-rail.

The financial difficulties of 1836 and 1837, which brought ruin upon so many, did not leave Mr. Baldwin unscathed. His embarrassments became so great that he was unable to proceed, and was forced to call his creditors together for a settlement. After offering to surrender all his property, his shop, tools, house, and everything, if they so desired,—all of which would realize only about twenty-five per cent. of their claims,—he proposed to them that they should permit him to go on with the business, and in three years he would pay the full amount of all claims, principal and interest. This was finally acceded to, and the promise was in effect fulfilled, although not without an extension of two years beyond the time originally proposed.

In May, 1837, the number of hands employed was three hundred, but this number was reducing weekly, owing to the falling off in the demand for engines.

These financial troubles had their effect on the demand for locomotives, as will be seen in the decrease in the number built in 1838, 1839, and 1840; and this result was furthered by the establishment of several other locomotive works and the introduction of other patterns of engines.

The changes and improvements in details made during these years may be summed up as follows:

The subject of burning coal had engaged much attention. In October, 1836, Mr. Baldwin secured a patent for a grate or fireplace which could be detached from the engine at pleasure, and a new one with a fresh coal fire substituted. The intention was to have the grate with freshly ignited coal all ready for the engine on its arrival at a station, and placed between the rails over suitable levers, by which it could be attached quickly to the fire-box. It is needless to say that this was never practiced. In January, 1838, however, Mr. Baldwin was experimenting with the consumption of coal on the Germantown road, and in July of the same year the records show that he was making a locomotive to burn coal, part of the arrangement being to blow the fire with a fan.

Up to 1838, Mr. Baldwin had made both driving and truck wheels with wrought tires, but during that year chilled wheels for engine and tender trucks were adopted. His tires were furnished by Messrs. S. Vail & Son, Morristown, N. J., who made the only tires then obtainable in America. They were very thin, being only one inch to one and a half inches thick; and Mr. Baldwin, in importing some tires from England at that time, insisted on their being made double the ordinary thickness. The manufacturers at first objected and ridiculed the idea, the practice being to use two tires when extra thickness was wanted, but finally they consented to meet his requirements.

All his engines thus far had the single eccentric for each valve, but at about this period double eccentrics were adopted, each terminating in a straight hook, and reversed by hand-levers.

At this early period, Mr. Baldwin had begun to feel the necessity of making all like parts of locomotives of the same class in such manner as to be absolutely interchangeable. Steps were taken in this direction, but it was not until many years afterward that the system of standard gauges was perfected, which has since grown to be a distinguishing feature in the establishment.

In March, 1839, Mr. Baldwin's records show that he was building a number of outside-connected engines, and had succeeded in making them strong and durable. He was also making a new chilled wheel, and one which he thought would not break.

On the one hundred and thirty-sixth locomotive, completed October 18, 1839, for the Philadelphia, Germantown and Norristown Railroad, the old pattern of wooden frame was abandoned, and no outside frame whatever was employed,—the machinery, as well as the truck and the pedestals of the driving-axles, being attached directly to the naked boiler. The wooden frame thenceforward disappeared gradually, and an iron frame took its place. Another innovation was the adoption of eight-wheeled tenders, the first of which was built at about this period.

April 8, 1839, Mr. Baldwin associated with himself Messrs. Vail and Hufty, and the business was conducted under the firm name of Baldwin, Vail & Hufty until 1841, when Mr. Hufty withdrew, and Baldwin & Vail continued the copartnership until 1842.

The time had now arrived when the increase of business on railroads demanded more powerful locomotives. It had for some years been felt that for freight traffic the engine with one pair of drivers was insufficient. Mr. Baldwin's engine had the single pair of drivers placed back of the fire-box; that made by Mr. Norris, one pair in front of the fire-box. An engine with two pairs of drivers, one pair in front and one pair behind the fire-box, was the next logical step, and Mr. Henry R. Campbell, of Philadelphia, was the first to carry this design into execution. Mr. Campbell, as has been noted, was the Chief Engineer of the Germantown Railroad when the "Ironsides" was placed on that line, and had since given much attention to the subject of locomotive construction. February 5, 1836, Mr. Campbell secured a patent for an eight-wheeled engine with four drivers connected, and a four-wheeled truck in front; and subsequently contracted with James Brooks, of Philadelphia, to build for him such a machine. The work was begun March 16, 1836, and the engine was completed May 8, 1837. This was the first eight-wheeled engine of this type, and from it the standard American locomotive of to-day takes its origin. The engine lacked, however, one essential feature; there were no equalizing beams between the drivers, and nothing but the ordinary steel springs over each journal of the driving-axles to equalize the weight upon them. It remained for Messrs. Eastwick & Harrison to supply this deficiency; and in 1837 that firm constructed at their shop in Philadelphia a locomotive on this plan, but with the driving-axles running in a separate square frame, connected to the main frame above it by a single central bearing on each side. This engine had cylinders twelve by eighteen, four coupled driving-wheels, forty-four inches in diameter, carrying eight of the twelve tons constituting the total weight. Subsequently, Mr. Joseph Harrison, Jr., of the same firm, substituted "equalizing beams" on engines of this plan afterward constructed by them, substantially in the same manner as since generally employed.

In the American Railroad Journal of July 30, 1836, a wood-cut showing Mr. Campbell's engine, together with an elaborate calculation of the effective power of an engine on this plan, by William J. Lewis, Esq., Civil Engineer, was published, with a table showing its performance upon grades ranging from a dead level to a rise of one hundred feet per mile. Mr. Campbell stated that his experience at that time (1835-6) convinced him that grades of one hundred feet rise per mile would, if roads were judiciously located, carry railroads over any of the mountain passes in America, without the use of planes with stationary steam power, or, as a general rule, of costly tunnels,—an opinion very extensively verified by the experience of the country since that date.

A step had thus been taken toward a plan of locomotive having more adhesive power. Mr. Baldwin, however, was slow to adopt the new design. He naturally regarded innovations with distrust. He had done much to perfect the old pattern of engine, and had built over a hundred of them, which were in successful operation on various railroads. Many of the details were the subjects of his several patents, and had been greatly simplified in his practice. In fact, simplicity in all the working parts had been so largely his aim, that it was natural that he should distrust any plan involving additional machinery, and he regarded the new design as only an experiment at best. In November, 1838, he wrote to a correspondent that he did not think there was any advantage in the eight-wheeled engine. There being three points in contact, it could not turn a curve, he argued, without slipping one or the other pair of wheels sideways. Another objection was in the multiplicity of machinery and the difficulty in maintaining four driving-wheels all of exactly the same size. Some means, however, of getting more adhesion must be had, and the result of his reflections upon this subject was the project of a "geared engine." In August, 1839, he took steps to secure a patent for such a machine, and December 31, 1840, letters patent were granted him for the device. In this engine, an independent shaft or axle was placed between the two axles of the truck, and connected by cranks and coupling-rods with cranks on the outside of the driving-wheels. This shaft had a central cog-wheel engaging on each side with intermediate cog-wheels, which in turn geared into cog-wheels on each truck-axle. The intermediate cog-wheels had wide teeth, so that the truck could pivot while the main shaft remained parallel with the driving-axle. The diameters of the cog-wheels were, of course, in such proportion to the driving and truck wheels, that the latter should revolve as much oftener than the drivers as their smaller size might require. Of the success of this machine for freight service, Mr. Baldwin was very sanguine. One was put in hand at once, completed in August, 1841, and eventually sold to the Sugarloaf Coal Company. It was an outside-connected engine, weighing thirty thousand pounds, of which eleven thousand seven hundred and seventy-five pounds were on the drivers, and eighteen thousand three hundred and thirty-five on the truck. The driving-wheels were forty-four and the truck-wheels thirty-three inches in diameter. The cylinders were thirteen inches in diameter by sixteen inches stroke. On a trial of the engine upon the Philadelphia and Reading Railroad, it hauled five hundred and ninety tons from Reading to Philadelphia—a distance of fifty-four miles—in five hours and twenty-two minutes. The Superintendent of the road, in writing of the trial, remarked that this train was unprecedented in length and weight both in America and Europe. The performance was noticed in favorable terms by the Philadelphia newspapers, and was made the subject of a report by the Committee on Science and Arts of the Franklin Institute, who strongly recommended this plan of engine for freight service. The success of the trial led Mr. Baldwin at first to believe that the geared engine would be generally adopted for freight traffic; but in this he was disappointed. No further demand was made for such machines, and no more of them were built.

In 1840, Mr. Baldwin received an order, through August Belmont, Esq., of New York, for a locomotive for Austria, and had nearly completed one which was calculated to do the work required, when he learned that only sixty pounds pressure of steam was admissible, whereas his engine was designed to use steam at one hundred pounds and over. He accordingly constructed another, meeting this requirement, and shipped it in the following year. This engine, it may be noted, had a kind of link-motion, agreeably to the specification received, and was the first of his make upon which the link was introduced.

Mr. Baldwin's patent of December 31, 1840, already referred to as covering his geared engine, embraced several other devices, as follows:

1. A method of operating a fan, or blowing-wheel, for the purpose of blowing the fire. The fan was to be placed under the footboard, and driven by the friction of a grooved pulley in contact with the flange of the driving-wheel.

2. The substitution of a metallic stuffing, consisting of wire, for the hemp, wool, or other material which had been employed in stuffing-boxes.

3. The placing of the springs of the engine truck so as to obviate the evil of the locking of the wheels when the truck-frame vibrates from the centre-pin vertically. Spiral as well as semi-elliptic springs, placed at each end of the truck-frame, were specified. The spiral spring is described as received in two cups,—one above and one below. The cups were connected together at their centres by a pin upon one and a socket in the other, so that the cups could approach toward or recede from each other and still preserve their parallelism.

4. An improvement in the manner of constructing the iron frames of locomotives, by making the pedestals in one piece with, and constituting part of, the frames.

5. The employment of spiral springs in connection with cylindrical pedestals and boxes. A single spiral was at first used, but, not proving sufficiently strong, a combination or nest of spirals curving alternately in opposite directions was afterward employed. Each spiral had its bearing in a spiral recess in the pedestal.

In the specification of this patent a change in the method of making cylindrical pedestals and boxes is noted. Instead of boring and turning them in a lathe, they were cast to the required shape in chills. This method of construction was used for a time, but eventually a return was made to the original plan, as giving a more accurate job.

In 1842, Mr. Baldwin constructed, under an arrangement with Mr. Ross Winans, three locomotives for the Western Railroad of Massachusetts, on a plan which had been designed by that gentleman for freight traffic. These machines had upright boilers, and horizontal cylinders which worked cranks on a shaft bearing cog-wheels engaging with other cog-wheels on an intermediate shaft. This latter shaft had cranks coupled to four driving-wheels on each side. These engines were constructed to burn anthracite coal. Their peculiarly uncouth appearance earned for them the name of "crabs," and they were but short-lived in service.

Fig. 6.—Baldwin Six-Wheels-Connected Engine, 1842.

Fig. 7.—Baldwin Flexible-Beam Truck, 1842.—Elevation.

Half Plan.

But, to return to the progress of Mr. Baldwin's locomotive practice. The geared engine had not proved a success. It was unsatisfactory, as well to its designer as to the railroad community. The problem of utilizing more or all of the weight of the engine for adhesion remained, in Mr. Baldwin's view, yet to be solved. The plan of coupling four or six wheels had long before been adopted in England, but on the short curves prevalent on American railroads, he felt that something more was necessary. The wheels must not only be coupled, but at the same time must be free to adapt themselves to a curve. These two conditions were apparently incompatible, and to reconcile these inconsistencies was the task which Mr. Baldwin set himself to accomplish. He undertook it, too, at a time when his business had fallen off greatly and he was involved in the most serious financial embarrassments. The problem was constantly before him, and at length, during a sleepless night, its solution flashed across his mind. The plan so long sought for, and which, subsequently, more than any other of his improvements or inventions, contributed to the foundation of his fortune, was his well-known six-wheels-connected locomotive with the four front drivers combined in a flexible truck. For this machine Mr. Baldwin secured a patent, August 25, 1842. Its principal characteristic features are now matters of history, but they deserve here a brief mention. The engine was on six wheels, all connected as drivers. The rear wheels were placed rigidly in the frames, usually behind the fire-box, with inside bearings. The cylinders were inclined, and with outside connections. The four remaining wheels had inside journals running in boxes held by two wide and deep wrought-iron beams, one on each side. These beams were unconnected, and entirely independent of each other. The pedestals formed in them were bored out cylindrically, and into them cylindrical boxes, as patented by him in 1835, were fitted. The engine-frame on each side was directly over the beam, and a spherical pin, running down from the frame, bore in a socket in the beam midway between the two axles. It will thus be seen that each side-beam independently could turn horizontally or vertically under the spherical pin, and the cylindrical boxes could also turn in the pedestals. Hence, in passing a curve, the middle pair of drivers could move laterally in one direction—say to the right—while the front pair could move in the opposite direction, or to the left; the two axles all the while remaining parallel to each other and to the rear driving-axle. The operation of these beams was, therefore, like that of the parallel-ruler. On a straight line the two beams and the two axles formed a rectangle; on curves, a parallelogram, the angles varying with the degree of curvature. The coupling-rods were made with cylindrical brasses, thus forming ball-and-socket joints, to enable them to accommodate themselves to the lateral movements of the wheels. Colburn, in his "Locomotive Engineering," remarks of this arrangement of rods as follows:

"Geometrically, no doubt, this combination of wheels could only work properly around curves by a lengthening and shortening of the rods which served to couple the principal pair of driving-wheels with the hind truck-wheels. But if the coupling-rods from the principal pair of driving-wheels be five feet long, and if the beams of the truck-frame be four feet long (the radius of curve described by the axle-boxes around the spherical side bearings being two feet), then the total corresponding lengthening of the coupling-rods, in order to allow the hind truck-wheels to move one inch to one side, and the front wheels of the truck one inch to the other side of their normal position on a straight line, would be √60^2+1^2 - 60 + 24 - √24^2-1^2 = 0.0275 inch, or less than one thirty-second of an inch. And if only one pair of driving-wheels were thus coupled with a four-wheeled truck, the total wheel-base being nine feet, the motion permitted by this slight elongation of the coupling-rods (an elongation provided for by a trifling slackness in the brasses) would enable three pairs of wheels to stand without binding in a curve of only one hundred feet radius."

The first engine of the new plan was finished early in December, 1842, being one of fourteen engines constructed in that year, and was sent to the Georgia Railroad, on the order of Mr. J. Edgar Thomson, then Chief Engineer and Superintendent of that line. It weighed twelve tons, and drew, besides its own weight, two hundred and fifty tons up a grade of thirty-six feet to the mile.

Other orders soon followed. The new machine was received generally with great favor. The loads hauled by it exceeded anything so far known in American railroad practice, and sagacious managers hailed it as a means of largely reducing operating expenses. On the Central Railroad of Georgia, one of these twelve-ton engines drew nineteen eight-wheeled cars, with seven hundred and fifty bales of cotton, each bale weighing four hundred and fifty pounds, over maximum grades of thirty feet per mile, and the manager of the road declared that it could readily take one thousand bales. On the Philadelphia and Reading Railroad a similar engine of eighteen tons weight drew one hundred and fifty loaded cars (total weight of cars and lading, one thousand one hundred and thirty tons) from Schuylkill Haven to Philadelphia, at a speed of seven miles per hour. The regular load was one hundred loaded cars, which were hauled at a speed of from twelve to fifteen miles per hour on a level.

The following extract from a letter, dated August 10, 1844, of Mr. G. A. Nicolls, then Superintendent of that line, and still connected with its management, gives the particulars of the performance of these machines, and shows the estimation in which they were held:

"We have had two of these engines in operation for about four weeks. Each engine weighs about forty thousand pounds with water and fuel, equally distributed on six wheels, all of which are coupled, thus gaining the whole adhesion of the engine's weight. Their cylinders are fifteen by eighteen inches."

"The daily allotted load of each of these engines is one hundred coal cars, each loaded with three and six-tenths tons of coal, and weighing two and fifteen one-hundredths tons each, empty; making a net weight of three hundred and sixty tons of coal carried, and a gross weight of train of five hundred and seventy-five tons, all of two thousand two hundred and forty pounds."

"This train is hauled over the ninety-four miles of the road, half of which is level, at the rate of twelve miles per hour; and with it the engine is able to make fourteen to fifteen miles per hour on a level."

"Were all the cars on the road of sufficient strength, and making the trip by daylight, nearly one-half being now performed at night, I have no doubt of these engines being quite equal to a load of eight hundred tons gross, as their average daily performance on any of the levels of our road, some of which are eight miles long."

"In strength of make, quality of workmanship, finish, and proportion of parts, I consider them equal to any, and superior to most, freight engines I have seen. They are remarkably easy on the rail, either in their vertical or horizontal action, from the equalization of their weight, and the improved truck under the forward part of the engine. This latter adapts itself to all the curves of the road, including some of seven hundred and sixteen feet radius in the main track, and moves with great ease around our turning Y curves at Richmond, of about three hundred feet radius.

"I consider these engines as near perfection, in the arrangement of their parts, and their general efficiency, as the present improvements in machinery and the locomotive engine will admit of. They are saving us thirty per cent, in every trip, on the former cost of motive or engine power."

But the flexible-beam truck also enabled Mr. Baldwin to meet the demand for an engine with four drivers connected. Other builders were making engines with four drivers and a four-wheeled truck, of the present American standard type. To compete with this design, Mr. Baldwin modified his six-wheels-connected engine by connecting only two out of the three pairs of wheels as drivers, making the forward wheels of smaller diameter as leading wheels, but combining them with the front drivers in a flexible-beam truck. The first engine on this plan was sent to the Erie and Kalamazoo Railroad, in October, 1843, and gave great satisfaction. The Superintendent of the road was enthusiastic in its praise, and wrote to Mr. Baldwin that he doubted "if anything could be got up which would answer the business of the road so well." One was also sent to the Utica and Schenectady Railroad a few weeks later, of which the Superintendent remarked that "it worked beautifully, and there were not wagons enough to give it a full load." In this plan the leading wheels were usually made thirty-six and the drivers fifty-four inches in diameter.

This machine of course came in competition with the eight-wheeled engine having four drivers, and Mr. Baldwin claimed for his plan a decided superiority. In each case about two-thirds of the total weight was carried on the four drivers, and Mr. Baldwin maintained that his engine, having only six instead of eight wheels, was simpler and more effective.

At about this period Mr. Baldwin's attention was called by Mr. Levi Bissell to an "Air Spring" which the latter had devised, and which it was imagined was destined to be a cheap, effective, and perpetual spring. The device consisted of a small cylinder placed above the frame over the axle-box, and having a piston fitted air-tight into it. The piston-rod was to bear on the axle-box, and the proper quantity of air was to be pumped into the cylinder above the piston, and the cylinder then hermetically closed. The piston had a leather packing which was to be kept moist by some fluid (molasses was proposed) previously introduced into the cylinder. Mr. Baldwin at first proposed to equalize the weight between two pairs of drivers by connecting two air-springs on each side by a pipe, the use of an equalizing beam being covered by Messrs. Eastwick & Harrison's patent. The air-springs were found, however, not to work practically, and were never applied. It may be added that a model of an equalizing air-spring was exhibited by Mr. Joseph Harrison, Jr., at the Franklin Institute, in 1838 or 1839.

With the introduction of the new machine, business began at once to revive, and the tide of prosperity turned once more in Mr. Baldwin's favor. Twelve engines were constructed in 1843, all but four of them of the new pattern; twenty-two engines in 1844, all of the new pattern; and twenty-seven in 1845. Three of this number were of the old type, with one pair of drivers, but from that time forward the old pattern with the single pair of drivers disappeared from the practice of the establishment, save occasionally for exceptional purposes.

In 1842, the partnership with Mr. Vail was dissolved, and Mr. Asa Whitney, who had been Superintendent of the Mohawk and Hudson Railroad, became a partner with Mr. Baldwin, and the firm continued as Baldwin & Whitney until 1846, when the latter withdrew to engage in the manufacture of car-wheels, in which business he is still concerned as senior member of the firm of A. Whitney & Sons, Philadelphia.

Mr. Whitney brought to the firm a railroad experience and thorough business talent. He introduced a system in many details of the management of the business, which Mr. Baldwin, whose mind was devoted more exclusively to mechanical subjects, had failed to establish or wholly ignored. The method at present in use in the establishment, of giving to each class of locomotives a distinctive designation, composed of a number and a letter, originated very shortly after Mr. Whitney's connection with the business. For the purpose of representing the different designs, sheets with engravings of locomotives were employed. The sheet showing the engine with one pair of drivers was marked B; that with two pairs, C; that with three, D; and that with four, E. Taking its rise from this circumstance, it became customary to designate as B engines those with one pair of drivers; as C engines, those with two pairs; as D engines, those with three pairs; and as E engines, those with four pairs. Shortly afterwards, a number, indicating the weight in gross tons, was added. Thus, the 12 D engine was one with three pairs of drivers, and weighing twelve tons; the 12 C, an engine of same weight, but with only four wheels connected. Substantially this system of designating the several sizes and plans has been retained to the present time. The figures, however, are no longer used to express the weight, but merely to designate the class.

It will be observed that the classification as thus established began with the B engines. The letter A was reserved for an engine intended to run at very high speeds, and so designed that the driving-wheels should make two revolutions for each reciprocation of the pistons. This was to be accomplished by means of gearing. The general plan of the engine was determined in Mr. Baldwin's mind, but was never carried into execution.

The adoption of the plan of six-wheels-connected engines opened the way at once to increasing their size. The weight being almost evenly distributed on six points, heavier machines were admissible, the weight on any one pair of drivers being little, if any, greater than had been the practice with the old plan of engine having a single pair of drivers; Hence engines of eighteen and twenty tons weight were shortly introduced, and in 1844 three of twenty tons weight, with cylinders sixteen and one-half inches diameter by eighteen inches stroke, were constructed for the Western Railroad of Massachusetts, and six, of eighteen tons weight, with cylinders fifteen by eighteen, and drivers forty-six inches in diameter, were built for the Philadelphia and Reading Railroad. It should be noted that three of these latter engines had iron flues. This was the first instance in which Mr. Baldwin had employed tubes of this material. The advantage found to result from the use of iron tubes, apart from their less cost, was that the tubes and boiler-shell, being of the same material, expanded and contracted alike, while in the case of copper tubes the expansion of the metal by heat varied from that of the boiler-shell, and as a consequence there was greater liability to leakage at the joints with the tube-sheets. The opinion prevailed largely at that time that some advantage resulted in the evaporation of water, owing to the superiority of copper as a conductor of heat. To determine this question, an experiment was tried with two of the six engines referred to above, one of which, the "Ontario," had copper flues, and another, the "New England," iron flues. In other respects they were precisely alike. The two engines were run from Richmond to Mount Carbon, August 27, 1844, each drawing a train of one hundred and one empty cars, and, returning, from Mount Carbon to Richmond, on the following day, each with one hundred loaded cars. The quantity of water evaporated and wood consumed was noted, with the result shown in the following table:

| Up Trip, Aug. 27, 1844. | Down Trip, Aug. 28, 1844.
| "Ontario." (Copper Flues.) | "New England." (Iron Flues.) | "Ontario." (Copper Flues.) | "New England." (Iron Flues.)
Time, | running | 9h. 7m. | 7h. 41m. | 10h. 44m. | 8h. 19m.
" | standing at stations. | 4h. 2m. | 3h. 7m. | 2h. 12m. | 3h. 8m.
Cords of wood burned | 6.68 | 5.50 | 6.94 | 6.
Cubic feet of water evaporated | 925.75 | 757.26 | 837.46 | 656.39
Ratio, cubic feet of water to a cord of wood | 138.57 | 137.68 | 120.67 | 109.39

The conditions of the experiments not being absolutely the same in each case, the results could not of course be accepted as entirely accurate. They seemed to show, however, no considerable difference in the evaporative efficacy of copper and iron tubes.

The period under consideration was marked also by the introduction of the French & Baird stack, which proved at once to be one of the most successful spark-arresters thus far employed, and which was for years used almost exclusively wherever, as on the cotton-carrying railroads of the South, a thoroughly effective spark-arrester was required. This stack was introduced by Mr. Baird, then a foreman in the Works, who purchased the patent-right of what had been known as the Grimes stack, and combined with it some of the features of the stack made by Mr. Richard French, then Master Mechanic of the Germantown Railroad, together with certain improvements of his own. The cone over the straight inside pipe was made with volute flanges on its under side, which gave a rotary motion to the sparks. Around the cone was a casing about six inches smaller in diameter than the outside stack. Apertures were cut in the sides of this casing, through which the sparks in their rotary motion were discharged and thus fell to the bottom of the space between the straight inside pipe and the outside stack. The opening in the top of the stack was fitted with a series of V-shaped iron circles perforated with numerous holes, thus presenting an enlarged area, through which the smoke escaped. The patent-right for this stack was subsequently sold to Messrs. Radley & Hunter, and its essential principle is still used in the Radley & Hunter stack as at present made.

In 1845, Mr. Baldwin built three locomotives for the Royal Railroad Committee of Würtemberg. They were of fifteen tons weight, on six wheels, four of them being sixty inches in diameter and coupled. The front drivers were combined by the flexible beams into a truck with the smaller leading wheels. The cylinders were inclined and outside, and the connecting-rods took hold of a half-crank axle back of the fire-box. It was specified that these engines should have the link-motion which had shortly before been introduced in England by the Stephensons. Mr. Baldwin accordingly applied a link of a peculiar character to suit his own ideas of the device. The link was made solid, and of a truncated V-section, and the block was grooved so as to fit and slide on the outside of the link.

During the year 1845 another important feature in locomotive construction—the cut-off valve—was added to Mr. Baldwin's practice. Up to that time the valve-motion had been the two eccentrics, with the single flat hook for each cylinder. Since 1841 Mr. Baldwin had contemplated the addition of some device allowing the steam to be used expansively, and he now added the "half-stroke cut-off." In this device the steam-chest was separated by a horizontal plate into an upper and a lower compartment. In the upper compartment, a valve, worked by a separate eccentric, and having a single opening, admitted steam through a port in this plate to the lower steam-chamber. The valve-rod of the upper valve terminated in a notch or hook, which engaged with the upper arm of its rock-shaft. When thus working, it acted as a cut-off at a fixed part of the stroke, determined by the setting of the eccentric. This was usually at half the stroke. When it was desired to dispense with the cut-off and work steam for the full stroke, the hook of the valve-rod was lifted from the pin on the upper arm of the rock-shaft by a lever worked from the footboard, and the valve-rod was held in a notched rest fastened to the side of the boiler. This left the opening through the upper valve and the port in the partition plate open for the free passage of steam throughout the whole stroke. The first application of the half-stroke cut-off was made on the engine "Champlain" (20 D), built for the Philadelphia and Reading Railroad Company, in 1845. It at once became the practice to apply the cut-off on all passenger engines, while the six- and eight-wheels-connected freight engines were, with a few exceptions, built for a time longer with the single valve admitting steam for the full stroke.

After building, during the years 1843, 1844, and 1845, ten four-wheels-connected engines on the plan above described, viz., six wheels in all, the leading wheels and the front drivers being combined into a truck by the flexible beams, Mr. Baldwin finally adopted the present design of four drivers and a four-wheeled truck. Some of his customers who were favorable to the latter plan had ordered such machines of other builders, and Colonel Gadsden, President of the South Carolina Railroad Company, called on him in 1845 to build for that line some passenger engines of this pattern. He accordingly bought the patent-right for this plan of engine of Mr. H. R. Campbell, and for the equalizing beams used between the drivers, of Messrs. Eastwick & Harrison, and delivered to the South Carolina Railroad Company, in December, 1845, his first eight-wheeled engine with four drivers and a four-wheeled truck. This machine had cylinders thirteen and three-quarters by eighteen, and drivers sixty inches in diameter, with the springs between them arranged as equalizers. Its weight was fifteen tons. It had the half-crank axle, the cylinders being inside the frame but outside the smoke-box. The inside-connected engine, counterweighting being as yet unknown, was admitted to be steadier in running, and hence more suitable for passenger service. With the completion of the first eight-wheeled "C" engine, Mr. Baldwin's feelings underwent a revulsion in favor of this plan, and his partiality for it became as great as had been his antipathy before. Commenting on the machine, he recorded himself as "more pleased with its appearance and action than any engine he had turned out." In addition to the three engines of this description for the South Carolina Railroad Company, a duplicate was sent to the Camden and Amboy Railroad Company, and a similar but lighter one to the Wilmington and Baltimore Railroad Company, shortly afterwards. The engine for the Camden and Amboy Railroad Company, and perhaps the others, had the half-stroke cut-off.

From that time forward, all of his four-wheels-connected machines were built on this plan, and the six-wheeled "C" engine was abandoned, except in the case of one built for the Philadelphia, Germantown and Norristown Railroad Company in 1846, and this was afterwards rebuilt into a six-wheels-connected machine. Three methods of carrying out the general design were, however, subsequently followed. At first the half-crank was used; then horizontal cylinders inclosed in the chimney-seat and working a full-crank-axle, which form of construction had been practiced at the Lowell Works; and eventually, outside cylinders with outside connections.

Fig. 8.—Baldwin Eight-Wheels-Connected Engine, 1846.

Meanwhile the flexible truck machine maintained its popularity for heavy freight service. All the engines thus far built on this plan had been six-wheeled, some with the rear driving-axle back of the fire-box, and others with it in front. The next step, following logically after the adoption of the eight-wheeled "C" engine, was to increase the size of the freight machine, and distribute the weight on eight wheels all connected, the two rear pairs being rigid in the frame, and the two front pairs combined into the flexible-beam truck. This was first done in 1846, when seventeen engines on this plan were constructed on one order for the Philadelphia and Reading Railroad Company. Fifteen of these were of twenty tons weight, with cylinders fifteen and a half by twenty, and wheels forty-six inches in diameter; and two of twenty-five tons weight, with cylinders seventeen and a quarter by eighteen, and drivers forty-two inches in diameter. These engines were the first ones on which Mr. Baldwin placed sand-boxes, and they were also the first built by him with roofs. On all previous engines the footboard had only been inclosed by a railing. On these engines for the Reading Railroad, four iron posts were carried up, and a wooden roof supported by them. The engine-men added curtains at the sides and front, and Mr. Baldwin on subsequent engines added sides, with sash and glass. The cab proper, however, was of New England origin, where the severity of the climate demanded it, and where it had been used previous to this period.

Fig. 9.—Baldwin Engine for Rack-Rail, 1847.

Forty-two engines were completed in 1846, and thirty-nine in 1847. The only novelty to be noted among them was the engine "M. G. Bright," built for operating the inclined plane on the Madison and Indianapolis Railroad. The rise of this incline was one in seventeen, from the bank of the Ohio River at Madison. The engine had eight wheels, forty-two inches in diameter, connected, and worked in the usual manner by outside inclined cylinders, fifteen and one-half inches diameter by twenty inches stroke. A second pair of cylinders, seventeen inches in diameter with eighteen inches stroke of piston, was placed vertically over the boiler, midway between the furnace and smoke-arch. The connecting-rods worked by these cylinders connected with cranks on a shaft under the boiler. This shaft carried a single cog-wheel at its centre, and this cog-wheel engaged with another of about twice its diameter on a second shaft adjacent to it and in the same plane. The cog-wheel on this latter shaft worked in a rack-rail placed in the centre of the track. The shaft itself had its bearings in the lower ends of two vertical rods, one on each side of the boiler, and these rods were united over the boiler by a horizontal bar which was connected by means of a bent lever and connecting-rod to the piston worked by a small horizontal cylinder placed on top of the boiler. By means of this cylinder, the yoke carrying the shaft and cog-wheel could be depressed and held down so as to engage the cogs with the rack-rail, or raised out of the way when only the ordinary drivers were required. This device was designed by Mr. Andrew Cathcart, Master Mechanic of the Madison and Indianapolis Railroad. A similar machine, the "John Brough," for the same plane, was built by Mr. Baldwin in 1850. The incline was worked with a rack-rail and these engines until it was finally abandoned and a line with easy gradients substituted.

The use of iron tubes in freight engines grew in favor, and in October, 1847, Mr. Baldwin noted that he was fitting his flues with copper ends, "for riveting to the boiler."

The subject of burning coal continued to engage much attention, but the use of anthracite had not as yet been generally successful. In October, 1847, the Baltimore and Ohio Railroad Company advertised for proposals for four engines to burn Cumberland coal, and the order was taken and filled by Mr. Baldwin with four of his eight-wheels-connected machines.

The year 1848 showed a falling off in business, and only twenty engines were turned out. In the following year, however, there was a rapid recovery, and the production of the works increased to thirty, followed by thirty-seven in 1850, and fifty in 1851. These engines, with a few exceptions, were confined to three patterns, the eight-wheeled four-coupled engine, from twelve to nineteen tons in weight, for passengers and freight, and the six- and eight-wheels-connected engine, for freight exclusively, the six-wheeled machine weighing from twelve to seventeen tons, and the eight-wheeled, from eighteen to twenty-seven tons. The drivers of these six- and eight-wheels-connected machines were made generally forty-two, with occasional variations up to forty-eight, inches in diameter.

Fig. 10.—Baldwin Fast Passenger Engine, 1848.

The exceptions referred to in the practice of these years were the fast passenger engines built by Mr. Baldwin during this period. Early in 1848, the Vermont Central Railroad was approaching completion, and Governor Paine, the President of the Company, conceived the idea that the passenger service on the road required locomotives capable of running at very high velocities. Henry R. Campbell, Esq., was a contractor in building the line, and was authorized by Governor Paine to come to Philadelphia and offer Mr. Baldwin ten thousand dollars for a locomotive which could run with a passenger train at a speed of sixty miles per hour. Mr. Baldwin at once undertook to meet these conditions. The work was begun early in 1848, and in March of that year Mr. Baldwin filed a caveat for his design. The engine was completed in 1849, and was named the "Governor Paine." It had one pair of driving-wheels six and a half feet in diameter, placed back of the fire-box. Another pair of wheels, but smaller and unconnected, was placed directly in front of the fire-box, and a four-wheeled truck carried the front of the engine. The cylinders were seventeen and a quarter inches diameter and twenty inches stroke, and were placed horizontally between the frames and the boiler, at about the middle of the waist. The connecting-rods took hold of "half-cranks" inside of the driving-wheels. The object of placing the cylinders at the middle of the boiler was to lessen or obviate the lateral motion of the engine, produced when the cylinders were attached to the smoke-arch. The bearings on the two rear axles were so contrived that, by means of a lever, a part of the weight of the engine usually carried on the wheels in front of the fire-box could be transferred to the driving-axle. The "Governor Paine" was used for several years on the Vermont Central Railroad, and then rebuilt into a four-coupled machine. During its career, it was stated by the officers of the road that it could be started from a state of rest and run a mile in forty-three seconds. Three engines on the same plan, but with cylinders fourteen by twenty, and six-feet driving-wheels, the "Mifflin," "Blair," and "Indiana," were also built for the Pennsylvania Railroad Company, in 1849. They weighed each about forty-seven thousand pounds, distributed as follows: eighteen thousand on drivers, fourteen thousand on the pair of wheels in front of the fire-box, and fifteen thousand on the truck. By applying the lever, the weight on the drivers could be increased to about twenty-four thousand pounds, the weight on the wheels in front of the fire-box being correspondingly reduced. A speed of four miles in three minutes is recorded for them, and upon one occasion President Taylor was taken in a special train over the road by one of these machines at a speed of sixty miles an hour. One other engine of this pattern, the "Susquehanna," was built for the Hudson River Railroad Company, in 1850. Its cylinders were fifteen inches diameter by twenty inches stroke, and drivers six feet in diameter. All these engines, however, were short-lived, and died young, of insufficient adhesion.

Eight engines with four drivers connected and half-crank-axles, were built for the New York and Erie Railroad Company in 1849, with seventeen by twenty inch cylinders; one-half of the number with six-feet and the rest with five-feet drivers. These machines were among the last on which the half-crank-axle was used. Thereafter, outside-connected engines were constructed almost exclusively.

In May, 1848, Mr. Baldwin filed a caveat for a four-cylinder locomotive, but never carried the design into execution. The first instance of the use of steel axles in the practice of the establishment occurred during the same year,—a set being placed as an experiment under an engine constructed for the Pennsylvania Railroad Company. In 1850, the old form of dome boiler, which had characterized the Baldwin engine since 1834, was abandoned, and the wagon-top form substituted.

The business in 1851 had reached the full capacity of the shop, and the next year marked the completion of about an equal number of engines (forty-nine). Contracts for work extended a year ahead, and, to meet the demand, the facilities in the various departments were increased, and resulted in the construction of sixty engines in 1853, and sixty-two in 1854.

At the beginning of the latter year, Mr. Matthew Baird, who had been connected with the works since 1836 as one of its foremen, entered into partnership with Mr. Baldwin, and the style of the firm was made M. W. Baldwin & Co.

The only novelty in the general plan of engines during this period was the addition of the ten-wheeled engine to the patterns of the establishment. The success of Mr. Baldwin's engines with all six or eight wheels connected, and the two front pairs combined by the parallel beams into a flexible truck, had been so marked that it was natural that he should oppose any other plan for freight service. The ten-wheeled engine, with six drivers connected, had, however, now become a competitor. This plan of engine was first patented by Septimus Norris, of Philadelphia, in 1846, and the original design was apparently to produce an engine which should have equal tractive power with the Baldwin six-wheels-connected machine. This the Norris patent sought to accomplish by proposing an engine with six drivers connected, and so disposed as to carry substantially the whole weight, the forward drivers being in advance of the centre of gravity of the engine, and the truck only serving as a guide, the front of the engine being connected with it by a pivot-pin, but without a bearing on the centre-plate. Mr. Norris's first engine on this plan was tried in April, 1847, and was found not to pass curves so readily as was expected. As the truck carried little or no weight, it would not keep the track. The New York and Erie Railroad Company, of which John Brandt was then Master Mechanic, shortly afterwards adopted the ten-wheeled engine, modified in plan so as to carry a part of the weight on the truck. Mr. Baldwin filled an order for this company, in 1850, of four eight-wheels-connected engines, and in making the contract he agreed to substitute a truck for the front pair of wheels if desired after trial. This, however, he was not called upon to do.

In February, 1852, Mr. J. Edgar Thomson, President of the Pennsylvania Railroad Company, invited proposals for a number of freight locomotives of fifty-six thousand pounds weight each. They were to be adapted to burn bituminous coal, and to have six wheels connected and a truck in front, which might be either of two or four wheels. Mr. Baldwin secured the contract, and built twelve engines of the prescribed dimensions, viz., cylinders eighteen by twenty-two; drivers forty-four inches diameter, with chilled tires. Several of these engines were constructed with a single pair of truck-wheels in front of the drivers, but back of the cylinders. It was found, however, after the engines were put in service, that the two truck-wheels carried eighteen thousand or nineteen thousand pounds, and this was objected to by the company as too great a weight to be carried on a single pair of wheels. On the rest of the engines of the order, therefore, a four-wheeled truck in front was employed.

The ten wheeled engine thereafter assumed a place in the Baldwin classification. In 1855-56, two of twenty-seven tons weight, nineteen by twenty-two cylinders, forty-eight inches drivers, were built for the Portage Railroad, and three for the Pennsylvania Railroad. In 1855, '56, and '57, fourteen, of the same dimensions, were built for the Cleveland and Pittsburg Railroad; four for the Pittsburg, Fort Wayne and Chicago Railroad; and one for the Marietta and Cincinnati Railroad. In 1858 and '59, one was constructed for the South Carolina Railroad, of the same size, and six lighter ten-wheelers, with cylinders fifteen and a half by twenty-two, and four-feet drivers, and two with cylinders sixteen by twenty-two, and four-feet drivers, were sent out to railroads in Cuba.

It was some years—not until after 1860, however—before this pattern of engine wholly superseded in Mr. Baldwin's practice the old plan of freight engine on six or eight wheels, all connected.

On three locomotives—the "Clinton," "Athens," and "Sparta"—completed for the Central Railroad of Georgia in July, 1852, the driving-boxes were made with a slot or cavity in the line of the vertical bearing on the journal. The object was to produce a more uniform distribution of the wear over the entire surface of the bearing. This was the first instance in which this device, which has since come into general use, was employed in the Works, and the boxes were so made by direction of Mr. Charles Whiting, then Master Mechanic of the Central Railroad of Georgia. He subsequently informed Mr. Baldwin that this method of fitting up driving-boxes had been in use on the road for several years previous to his connection with the company. As this device was subsequently made the subject of a patent by Mr. David Matthew, these facts may not be without interest.

In 1853, Mr. Charles Ellet, Chief Engineer of the Virginia Central Railroad, laid a temporary track across the Blue Ridge, at Rock Fish Gap, for use during the construction of a tunnel through the mountain. This track was twelve thousand five hundred feet in length on the eastern slope, ascending in that distance six hundred and ten feet, or at the average rate of one in twenty and a half feet. The maximum grade was calculated for two hundred and ninety-six feet per mile, and prevailed for half a mile. It was found, however, in fact, that the grade in places exceeded three hundred feet per mile. The shortest radius of curvature was two hundred and thirty-eight feet. On the western slope, which was ten thousand six hundred and fifty feet in length, the maximum grade was two hundred and eighty feet per mile, and the ruling radius of curvature three hundred feet. This track was worked by two of the Baldwin six-wheels-connected flexible-beam truck locomotives constructed in 1853-54. From a description of this track, and the mode of working it, published by Mr. Ellet in 1856, the following is extracted:

"The locomotives mainly relied on for this severe duty were designed and constructed by the firm of M. W. Baldwin & Company, of Philadelphia. The slight modifications introduced at the instance of the writer to adapt them better to the particular service to be performed in crossing the Blue Ridge, did not touch the working proportions or principle of the engines, the merits of which are due to the patentee, M. W. Baldwin, Esq.

"These engines are mounted on six wheels, all of which are drivers, and coupled, and forty-two inches diameter. The wheels are set very close, so that the distance between the extreme points of contact of the wheels and the rail, of the front and rear drivers, is nine feet four inches. This closeness of the wheels, of course, greatly reduces the difficulty of turning the short curves of the road. The diameter of the cylinders is sixteen and a half inches, and the length of the stroke twenty inches. To increase the adhesion, and at the same time avoid the resistance of a tender, the engine carries its tank upon the boiler, and the footboard is lengthened out and provided with suspended side-boxes, where a supply of fuel may be stored. By this means the weight of wood and water, instead of abstracting from the effective power of the engine, contributes to its adhesion and consequent ability to climb the mountain. The total weight of these engines is fifty-five thousand pounds, or twenty-seven and a half tons, when the boiler and tank are supplied with water, and fuel enough for a trip of eight miles is on board. The capacity of the tank is sufficient to hold one hundred cubic feet of water, and it has storage-room on top for one hundred cubic feet of wood, in addition to what may be carried in the side-boxes and on the footboard.

"To enable the engines better to adapt themselves to the flexures of the road, the front and middle pairs of drivers are held in position by wrought-iron beams, having cylindrical boxes in each end for the journal-bearings, which beams vibrate on spherical pins fixed in the frame of the engine on each side, and resting on the centres of the beams. The object of this arrangement is to form a truck, somewhat flexible, which enables the drivers more readily to traverse the curves of the road.

"The writer has never permitted the power of the engines on this mountain road to be fully tested. The object has been to work the line regularly, economically, and, above all, safely; and these conditions are incompatible with experimental loads subjecting the machinery to severe strains. The regular daily service of each of the engines is to make four trips, of eight miles, over the mountain, drawing one eight-wheel baggage car, together with two eight-wheel passenger cars, in each direction.

"In conveying freight, the regular train on the mountain is three of the eight-wheel house-cars, fully loaded, or four of them when empty or partly loaded.

"These three cars, when full, weigh, with their loads, from forty to forty-three tons. Sometimes, though rarely, when the business has been unusually heavy, the loads have exceeded fifty tons.

"With such trains the engines are stopped on the track, ascending or descending, and are started again, on the steepest grades, at the discretion of the engineer.

"Water, for the supply of the engines, has been found difficult to obtain on the mountain; and, since the road was constructed, a tank has been established on the eastern slope, where the ascending engines stop daily on a grade of two hundred and eighty feet per mile, and are there held by the brakes while the tank is being filled, and started again at the signal and without any difficulty.

"The ordinary speed of the engines, when loaded, is seven and a half miles an hour on the ascending grades, and from five and a half to six miles an hour on the descent.

"When the road was first opened, it speedily appeared that the difference of forty-three feet on the western side, and fifty-eight feet on the eastern side, between the grades on curves of three hundred feet radii and those on straight lines, was not sufficient to compensate for the increased traction due to such curvature. The velocity, with a constant supply of steam, was promptly retarded on passing from a straight line to a curve, and promptly accelerated again on passing from the curve to the straight line. But, after a little experience in the working of the road, it was found advisable to supply a small amount of grease to the flange of the engine by means of a sponge, saturated with oil, which, when needed, is kept in contact with the wheel by a spring. Since the use of the oil was introduced, the difficulty of turning the curves has been so far diminished, that it is no longer possible to determine whether grades of two hundred and thirty-seven and six-tenths feet per mile on curves of three hundred feet radius, or grades of two hundred and ninety-six feet per mile on straight lines, are traversed most rapidly by the engine.

"When the track is in good condition, the brakes of only two of the cars possess sufficient power to control and regulate the movement of the train,—that is to say, they will hold back the two cars and the engine. When there are three or more cars in the train, the brakes on the cars, of course, command the train so much the more easily.

"But the safety of the train is not dependent on the brakes of the cars. There is also a valve or air-cock in the steam-chest, under the control of the engineer. This air-cock forms an independent brake, exclusively at the command of the engineer, and which can always be applied when the engine itself is in working order. The action of this power may be made ever so gradual, either slightly relieving the duty of the brakes on the cars, or bringing into play the entire power of the engine. The train is thus held in complete command."

The Mountain Top Track, it may be added, was worked successfully for several years, by the engines described in the above extract, until it was abandoned on the completion of the tunnel. The exceptionally steep grades and short curves which characterized the line, afforded a complete and satisfactory test of the adaptation of these machines to such peculiar service.

But the period now under consideration was marked by another, and a most important, step in the progress of American locomotive practice. We refer to the introduction of the link-motion. Although this device was first employed by William T. James, of New York, in 1832, and eleven years later by the Stephensons, in England, and was by them applied thenceforward on their engines, it was not until 1849 that it was adopted in this country. In that year Mr. Thomas Rogers, of the Rogers Locomotive and Machine Company, introduced it in his practice. Other builders, however, strenuously resisted the innovation, and none more so than Mr. Baldwin. The theoretical objections which confessedly apply to the device, but which practically have been proved to be unimportant, were urged from the first by Mr. Baldwin as arguments against its use. The strong claim of the advocates of the link-motion, that it gave a means of cutting off steam at any point of the stroke, could not be gainsaid, and this was admitted to be a consideration of the first importance. This very circumstance undoubtedly turned Mr. Baldwin's attention to the subject of methods for cutting off steam, and one of the first results was his "Variable Cut-off," patented April 27, 1852. This device consisted of two valves, the upper sliding upon the lower, and worked by an eccentric and rock-shaft in the usual manner. The lower valve fitted steam-tight to the sides of the steam-chest and the under surface of the upper valve. When the piston reached each end of its stroke, the full pressure of steam from the boiler was admitted around the upper valve, and transferred the lower valve instantaneously from one end of the steam-chest to the other. The openings through the two valves were so arranged that steam was admitted to the cylinder only for a part of the stroke. The effect was, therefore, to cut off steam at a given point, and to open the induction and exhaust ports substantially at the same instant and to their full extent. The exhaust port, in addition, remained fully open while the induction port was gradually closing, and after it had entirely closed. Although this device was never put in use, it may be noted in passing that it contained substantially the principle of the steam-pump, as since patented and constructed.

Early in 1853, Mr. Baldwin abandoned the half-stroke cut-off, previously described, and which he had been using since 1845, and adopted the variable cut-off, which was already employed by other builders. One of his letters, written in January, 1853, states his position, as follows:

"I shall put on an improvement in the shape of a variable cut-off, which can be operated by the engineer while the machine is running, and which will cut off anywhere from six to twelve inches, according to the load and amount of steam wanted, and this without the link-motion, which I could never be entirely satisfied with. I still have the independent cut-off, and the additional machinery to make it variable will be simple and not liable to be deranged."

This form of cut-off was a separate valve, sliding on a partition plate between it and the main steam-valve, and worked by an independent eccentric and rock-shaft. The upper arm of the rock-shaft was curved so as to form a radius-arm, on which a sliding-block, forming the termination of the upper valve-rod, could be adjusted and held at varying distances from the axis, thus producing a variable travel of the upper valve. This device did not give an absolutely perfect cut-off, as it was not operative in backward gear, but when running forward it would cut-off with great accuracy at any point of the stroke, was quick in its movement, and economical in the consumption of fuel.

After a short experience with this arrangement of the cut-off, the partition plate was omitted, and the upper valve was made to slide directly on the lower. This was eventually found objectionable, however, as the lower valve would soon cut a hollow in the valve-face. Several unsuccessful attempts were made to remedy this defect, by making the lower valve of brass, with long bearings, and making the valve-face of the cylinder of hardened steel; finally, however, the plan of one valve on the other was abandoned, and recourse was again had to an interposed partition plate, as in the original half-stroke cut-off.

Fig. 11.—Variable Cut-off Adjustment.

Mr. Baldwin did not adopt this form of cut-off without some modification of his own, and the modification in this instance consisted of a peculiar device, patented September 13, 1853, for raising and lowering the block on the radius-arm. A quadrant was placed so that its circumference bore nearly against a curved arm projecting down from the sliding-block, and which curved in the reverse direction from the quadrant. Two steel straps side by side were interposed between the quadrant and this curved arm. One of the straps was connected to the lower end of the quadrant and the upper end of the curved arm; the other, to the upper end of the quadrant and the lower end of the curved arm. The effect was the same as if the quadrant and arm geared into each other in any position by teeth, and theoretically the block was kept steady in whatever position placed on the radius-arm of the rock-shaft. This was the object sought to be accomplished, and was stated in the specification of the patent as follows:

"The principle of varying the cut-off by means of a vibrating arm and sliding pivot-block has long been known, but the contrivances for changing the position of the block upon the arm have been very defective. The radius of motion of the link by which the sliding-block is changed on the arm, and the radius of motion of that part of the vibrating arm on which the block is placed, have, in this kind of valve gear, as heretofore constructed, been different, which produced a continual rubbing of the sliding-block upon the arm while the arm is vibrating; and as the block for the greater part of the time occupies one position on the arm, and only has to be moved toward either extremity occasionally, that part of the arm on which the block is most used soon becomes so worn that the block is loose, and jars."

This method of varying the cut-off was first applied on the engine "Belle," delivered to the Pennsylvania Railroad Company, December 6, 1854, and thereafter was for some time employed by Mr. Baldwin. It was found, however, in practice, that the steel straps would stretch sufficiently to allow them to buckle and break, and hence they were soon abandoned, and chains substituted between the quadrant and curved arm of the sliding-block. These chains in turn proved little better, as they lengthened, allowing lost motion, or broke altogether, so that eventually the quadrant was wholly abandoned, and recourse was finally had to the lever and link for raising and lowering the sliding-block. As thus arranged, the cut-off was substantially what was known as the "Cuyahoga cut-off," as introduced by Mr. Ethan Rogers, of the Cuyahoga Works, Cleveland, Ohio, except that Mr. Baldwin used a partition plate between the upper and the lower valve.

But while Mr. Baldwin, in common with many other builders, was thus resolutely opposing the link-motion, it was nevertheless rapidly gaining favor with railroad managers. Engineers and master mechanics were everywhere learning to admire its simplicity, and were manifesting an enthusiastic preference for engines so constructed. At length, therefore, he was forced to succumb; and the link was applied to the "Pennsylvania," one of two engines completed for the Central Railroad of Georgia, in February, 1854. The other engine of the order, the "New Hampshire," had the variable cut-off, and Mr. Baldwin, while yielding to the demand in the former engine, was undoubtedly sanguine that the working of the latter would demonstrate the inferiority of the new device. In this, however, he was disappointed, for in the following year the same company ordered three more engines, on which they specified the link-motion. In 1856, seventeen engines for nine different companies had this form of valve gear, and its use was thus incorporated in his practice. It was not, however, until 1857 that he was induced to adopt it exclusively. This step was forced upon him, at that time, by the report of Mr. Parry, then Superintendent of the Works (now a member of the present firm), who, on returning from an extended tour in the South, brought back the intelligence that the link-motion was everywhere preferred, and that the Baldwin engines were losing ground rapidly, in consequence of their lack of this feature. Mr. Baldwin's characteristic reply was, "Then they shall have link-motion hereafter." And thenceforth the independent cut-off gradually disappeared, and the link reigned in its stead.

February 14, 1854, Mr. Baldwin and Mr. David Clark, Master Mechanic of the Mine Hill Railroad, took out conjointly a patent for a feed-water heater, placed at the base of a locomotive chimney, and consisting of one large vertical flue, surrounded by a number of smaller ones. The exhaust steam was discharged from the nozzles through the large central flue, creating a draft of the products of combustion through the smaller surrounding flues. The pumps forced the feed-water into the chamber around these flues, whence it passed to the boiler by a pipe from the back of the stack. This heater was applied on several engines for the Mine Hill Railroad, and on a few for other roads; but its use was exceptional, and lasted only for a year or two.

In December of the same year, Mr. Baldwin filed a caveat for a variable exhaust, operated automatically, by the pressure of steam, so as to close when the pressure was lowest in the boiler, and open with the increase of pressure. The device was never put in service.

The use of coal, both bituminous and anthracite, as a fuel for locomotives, had by this time become a practical success. The economical combustion of bituminous coal, however, engaged considerable attention. It was felt that much remained to be accomplished in consuming the smoke and deriving the maximum of useful effect from the fuel. Mr. Baird, who was now associated with Mr. Baldwin in the management of the business, made this matter a subject of careful study and investigation. An experiment was conducted under his direction, by placing a sheet-iron deflector in the fire-box of an engine on the Germantown and Norristown Railroad. The success of the trial was such as to show conclusively that a more complete combustion resulted. As, however, a deflector formed by a single plate of iron would soon be destroyed by the action of the fire, Mr. Baird proposed to use a water-leg projecting upward and backward from the front of the fire-box under the flues. Drawings and a model of the device were prepared, with a view of patenting it, but subsequently the intention was abandoned, Mr. Baird concluding that a fire-brick arch as a deflector to accomplish the same object was preferable. This was accordingly tried on two locomotives built for the Pennsylvania Railroad Company in 1854, and was found so valuable an appliance that its use was at once established, and it was put on a number of engines built for railroads in Cuba and elsewhere. For several years the fire-bricks were supported on side plugs; but in 1858, in the "Media," built for the West Chester and Philadelphia Railroad Company, water-pipes extending from the crown obliquely downward and curving to the sides of the fire-box at the bottom, were successfully used for the purpose.

The adoption of the link-motion may be regarded as the dividing line between the present and the early and transitional stage of locomotive practice. Changes since that event have been principally in matters of detail, but it is the gradual perfection of these details which has made the locomotive the symmetrical, efficient, and wonderfully complete piece of mechanism it is to-day. In perfecting these minutiæ, the Baldwin Locomotive Works has borne its part, and it only remains to state briefly its contributions in this direction.

The production of the establishment during the six years from 1855 to 1860, inclusive, was as follows: forty-seven engines in 1855; fifty-nine in 1856; sixty-six in 1857; thirty-three in 1858; seventy in 1859; and eighty-three in 1860. The greater number of these were of the ordinary type, four drivers coupled, and a four-wheeled truck, and varying in weight from fifteen ton engines, with cylinders twelve by twenty-two, to twenty-seven ton engines, with cylinders sixteen by twenty-four. A few ten-wheeled engines were built, as has been previously noted, and the remainder were the Baldwin flexible-truck six- and eight-wheels-connected engines. The demand for these, however, was now rapidly falling off, the ten-wheeled and heavy "C" engines taking their place, and by 1859 they ceased to be built, save in exceptional cases, as for some foreign roads, from which orders for this pattern were still occasionally received.

A few novelties characterizing the engines of this period may be mentioned. Several engines built in 1855 had cross-flues placed in the fire-box, under the crown, in order to increase the heating surface. This feature, however, was found impracticable, and was soon abandoned. The intense heat to which the flues were exposed converted the water contained in them into highly superheated steam, which would force its way out through the water around the fire-box with violent ebullitions. Four engines were built for the Pennsylvania Railroad Company, in 1856-57, with straight boilers and two domes. The "Delano" grate, by means of which the coal was forced into the fire-box from below, was applied on four ten-wheeled engines for the Cleveland and Pittsburg Railroad, in 1857. In 1859, several engines were built with the form of boiler introduced on the Cumberland Valley Railroad in 1851 by Mr. A. F. Smith, and which consisted of a combustion-chamber in the waist of the boiler, next the fire-box. This form of boiler was for some years thereafter largely used in engines for soft coal. It was at first constructed with the "water-leg," which was a vertical water-space, connecting the top and bottom sheets of the combustion-chamber, but eventually this feature was omitted, and an unobstructed combustion-chamber employed. Several engines were built for the Philadelphia, Wilmington and Baltimore Railroad Company in 1859, and thereafter, with the "Dimpfel" boiler, in which the tubes contain water, and, starting downward from the crown-sheet, are curved to the horizontal, and terminate in a narrow water-space next the smoke-box. The whole waist of the boiler, therefore, forms a combustion-chamber, and the heat and gases, after passing for their whole length along and around the tubes, emerge into the lower part of the smoke-box.

In 1860, an engine was built for the Mine Hill Railroad, with boiler of a peculiar form. The top sheets sloped upward from both ends toward the centre, thus making a raised part or hump in the centre. The engine was designed to work on heavy grades, and the object sought by Mr. Wilder, the Superintendent of the Mine Hill Railroad, was to have the water always at the same height in the space from which steam was drawn, whether going up or down grade.

All these experiments are indicative of the interest then prevailing upon the subject of coal-burning. The result of experience and study had meantime satisfied Mr. Baldwin that to burn soft coal successfully required no peculiar devices; that the ordinary form of boiler, with plain fire-box, was right, with perhaps the addition of a fire-brick deflector; and that the secret of the economical and successful use of coal was in the mode of firing, rather than in a different form of furnace.

The year 1861 witnessed a marked falling off in the production. The breaking out of the war at first unsettled business, and by many it was thought that railroad traffic would be so largely reduced that the demand for locomotives must cease altogether. A large number of hands were discharged from the works, and only forty locomotives were turned out during the year. It was even seriously contemplated to turn the resources of the establishment to the manufacture of shot and shell, and other munitions of war, the belief being entertained that the building of locomotives would have to be altogether suspended. So far, however, was this from being the case, that, after the first excitement had subsided, it was found that the demand for transportation by the general government, and by the branches of trade and production created by the war, was likely to tax the carrying capacity of the principal Northern railroads to the fullest extent. The government itself became a large purchaser of locomotives, and it is noticeable, as indicating the increase of travel and freight transportation, that heavier machines than had ever before been built became the rule. Seventy-five engines were sent from the works in 1862; ninety-six in 1863; one hundred and thirty in 1864; and one hundred and fifteen in 1865. During two years of this period, from May, 1862, to June, 1864, thirty-three engines were built for the United States Military Railroads. The demand from the various coal-carrying roads in Pennsylvania and vicinity was particularly active, and large numbers of ten-wheeled engines, and of the heaviest eight-wheeled four-coupled engines, were built. Of the latter class, the majority were with fifteen and sixteen inch cylinders, and of the former, seventeen and eighteen inch cylinders.

The introduction of several important features in construction marks this period. Early in 1861, four eighteen inch cylinder freight locomotives, with six coupled wheels, fifty-two inches in diameter, and a Bissell pony-truck with radius-bar in front, were sent to the Louisville and Nashville Railroad Company. This was the first instance of the use of the Bissell truck in the Baldwin Works. These engines, however, were not of the regular "Mogul" type, as they were only modifications of the ten-wheeler, the drivers retaining the same position, well back, and a pair of pony-wheels on the Bissell plan taking the place of the ordinary four-wheeled truck. Other engines of the same pattern, but with eighteen and one-half inch cylinders, were built in 1862-63, for the same company, and for the Don Pedro II. Railway of Brazil.

The introduction of steel in locomotive-construction was a distinguishing feature of the period. Steel tires were first used in the works in 1863, on some engines for the Don Pedro II. Railway of South America. Their general adoption on American railroads followed slowly. No tires of this material were then made in this country, and it was objected to their use that, as it took from sixty to ninety days to import them, an engine, in case of a breakage of one of its tires, might be laid up useless for several months. To obviate this objection, M. W. Baldwin & Co. imported five hundred steel tires, most of which were kept in stock, from which to fill orders.

Steel fire-boxes were first built for some engines for the Pennsylvania Railroad Company in 1861. English steel, of a high temper, was used, and at the first attempt the fire-boxes cracked in fitting them in the boilers, and it became necessary to take them out and substitute copper. American homogeneous cast-steel was then tried on engines 231 and 232, completed for the Pennsylvania Railroad in January, 1862, and it was found to work successfully. The fire-boxes of nearly all engines thereafter built for that road were of this material, and in 1866 its use for the purpose became general. It may be added that while all steel sheets for fire-boxes or boilers are required to be thoroughly annealed before delivery, those which are flanged or worked in the process of boiler-construction are a second time annealed before riveting.

Another feature of construction, gradually adopted, was the placing of the cylinders horizontally. This was first done in the case of an outside-connected engine, the "Ocmulgee," which was sent to the Southwestern Railroad Company of Georgia in January, 1858. This engine had a square smoke-box, and the cylinders were bolted horizontally to its sides. The plan of casting the cylinder and half-saddle in one piece and fitting it to the round smoke-box was introduced by Mr. Baldwin, and grew naturally out of his original method of construction. Mr. Baldwin was the first American builder to use an outside cylinder, and he made it for his early engines with a circular flange cast to it, by which it could be bolted to the boiler. The cylinders were gradually brought lower, and at a less angle, and the flanges prolonged and enlarged. In 1852, three six-wheels-connected engines, for the Mine Hill Railroad Company, were built with the cylinder flanges brought around under the smoke-box until they nearly met, the space between them being filled with a spark-box. This was practically equivalent to making the cylinder and half-saddle in one casting. Subsequently, on other engines on which the spark-box was not used, the half-saddles were cast so as almost to meet under the smoke-box, and, after the cylinders were adjusted in position, wedges were fitted in the interstices and the saddles bolted together. It was finally discovered that the faces of the two half-saddles might be planed and finished so that they could be bolted together and bring the cylinders accurately in position, thus avoiding the troublesome and tedious job of adjusting them by chipping and fitting to the boiler and frames. With this method of construction, the cylinders were placed at a less and less angle, until at length the truck-wheels were spread sufficiently, on all new or modified classes of locomotives in the Baldwin list, to admit of the cylinders being hung horizontally, as is the present almost universal American practice. By the year 1865, horizontal cylinders were made in all cases where the patterns would allow it. The advantages of this arrangement are manifestly in the interest of simplicity and economy, as the cylinders are thus rights or lefts, indiscriminately, and a single pattern answers for either side.

A distinguishing feature in the method of construction which characterizes these Works, is the extensive use of a system of standard gauges and templets, to which all work admitting of this process is required to be made. The importance of this arrangement, in securing absolute uniformity of essential parts in all engines of the same class, is manifest, and with the increased production since 1861 it became a necessity as well as a decided advantage. It has already been noted that as early as 1839 Mr. Baldwin felt the importance of making all like parts of similar engines absolutely uniform and interchangeable. It was not attempted to accomplish this object, however, by means of a complete system of standard gauges, until many years later. In 1861 a beginning was made of organizing all the departments of manufacture upon this basis, and from it has since grown an elaborate and perfected system, embracing all the essential details of construction. An independent department of the Works, having a separate foreman and an adequate force of skilled workmen, with special tools adapted to the purpose, is organized as the Department of Standard Gauges. A system of standard gauges and templets for every description of work to be done, is made and kept by this department. The original templets are kept as "standards," and are never used on the work itself, but from them exact duplicates are made, which are issued to the foremen of the various departments, and to which all work is required to conform. The working gauges are compared with the standards at regular intervals, and absolute uniformity is thus maintained. The system is carried into every possible important detail. Frames are planed and slotted to gauges, and drilled to steel bushed templets. Cylinders are bored and planed, and steam-ports, with valves and steam-chests, finished and fitted, to gauges. Tires are bored, centres turned, axles finished, and crossheads, guides, guide-bearers, pistons, connecting- and parallel-rods planed, slotted, or finished, by the same method. Every bolt about the engine is made to a gauge, and every hole drilled and reamed to a templet. The result of the system is an absolute uniformity and interchangeableness of parts in engines of the same class, insuring to the purchaser the minimum cost of repairs, and rendering possible, by the application of this method, the large production which these Works have accomplished.

Thus had been developed and perfected the various essential details of existing locomotive practice, when Mr. Baldwin died, September 7, 1866. He had been permitted, in a life of unusual activity and energy, to witness the rise and wonderful increase of a material interest which had become the distinguishing feature of the century. He had done much, by his own mechanical skill and inventive genius, to contribute to the development of that interest. His name was as "familiar as household words" wherever on the American continent the locomotive had penetrated. An ordinary ambition might well have been satisfied with this achievement. But Mr. Baldwin's claim to the remembrance of his fellow-men rests not alone on the results of his mechanical labors. A merely technical history, such as this, is not the place to do justice to his memory as a man, as a Christian, and as a philanthropist; yet the record would be manifestly imperfect, and would fail properly to reflect the sentiments of his business associates who so long knew him in all relations of life, were no reference made to his many virtues and noble traits of character. Mr. Baldwin was a man of sterling integrity and singular conscientiousness. To do right, absolutely and unreservedly, in all his relations with men, was an instinctive rule of his nature. His heroic struggle to meet every dollar of his liabilities, principal and interest, after his failure, consequent upon the general financial crash in 1837, constitutes a chapter of personal self-denial and determined effort which is seldom paralleled in the annals of commercial experience. When most men would have felt that an equitable compromise with creditors was all that could be demanded in view of the general financial embarrassment, Mr. Baldwin insisted upon paying all claims in full, and succeeded in doing so only after nearly five years of unremitting industry, close economy, and absolute personal sacrifices. As a philanthropist and a sincere and earnest Christian, zealous in every good work, his memory is cherished by many to whom his contributions to locomotive improvement are comparatively unknown. From the earliest years of his business life the practice of systematic benevolence was made a duty and a pleasure. His liberality constantly increased with his means. Indeed, he would unhesitatingly give his notes, in large sums, for charitable purposes, when money was absolutely wanted to carry on his business. Apart from the thousands which he expended in private charities, and of which, of course, little can be known, Philadelphia contains many monuments of his munificence. Early taking a deep interest in all Christian effort, his contributions to missionary enterprise and church extension were on the grandest scale, and grew with increasing wealth. Numerous church edifices in this city, of the denomination to which he belonged, owe their existence largely to his liberality, and two at least were projected and built by him entirely at his own cost. In his mental character, Mr. Baldwin was a man of remarkable firmness of purpose. This trait was strongly shown during his mechanical career, in the persistency with which he would work at a new improvement or resist an innovation. If he was led sometimes to assume an attitude of antagonism to features of locomotive-construction which after-experience showed to be valuable,—and a desire for historical accuracy has required the mention, in previous pages, of several instances of this kind,—it is at least certain that his opposition was based upon a conscientious belief in the mechanical impolicy of the proposed changes.

After the death of Mr. Baldwin, the business was reorganized, in 1867, under the title of "The Baldwin Locomotive Works," M. Baird & Co., Proprietors. Messrs. George Burnham and Charles T. Parry, who had been connected with the establishment from an early period, the former in charge of the finances, and the latter as General Superintendent, were associated with Mr. Baird in the copartnership. Three years later, Messrs. Edward H. Williams, William P. Henszey, and Edward Longstreth became members of the firm. Mr. Williams had been connected with railway management on various lines since 1850. Mr. Henszey had been Mechanical Engineer, and Mr. Longstreth the General Superintendent of the Works for several years previously.

The production of the Baldwin Locomotive Works from 1866 to 1871, both years inclusive, has been as follows:

1866, one hundred and eighteen | locomotives.
1867, one hundred and twenty-seven | "
1868, one hundred and twenty-four | "
1869, two hundred and thirty-five | "
1870, two hundred and eighty | "
1871, three hundred and thirty-one | "

In July, 1866, the engine "Consolidation" was built for the Lehigh Valley Railroad, on the plan and specification furnished by Mr. Alexander Mitchell, Master Mechanic of the Mahanoy Division of that railroad. This engine was intended for working the Mahanoy plane, which rises at the rate of one hundred and thirty-three feet per mile. The "Consolidation" had cylinders twenty by twenty-four, four pairs of drivers connected, forty-eight inches in diameter, and a Bissell pony-truck in front, equalized with the front drivers. The weight of the engine, in working order, was ninety thousand pounds, of which all but about ten thousand pounds was on the drivers. This engine has constituted the first of a class to which it has given its name, and over thirty "Consolidation" engines have since been constructed.

A class of engines known as "Moguls," with three pairs of drivers connected and a swing pony-truck in front equalized with the front drivers, took its rise in the practice of this establishment from the "E. A. Douglas," built for the Thomas Iron Company in 1867. These engines are fully illustrated in the Catalogue. Several sizes of "Moguls" have been built, but principally with cylinders sixteen, seventeen, and eighteen inches in diameter, respectively, and twenty-two or twenty-four inches stroke, and with drivers from forty-four to fifty-seven inches in diameter. This plan of engine has rapidly grown in favor for freight service on heavy grades or where maximum loads are to be moved, and has been adopted by several leading lines. Utilizing, as it does, nearly the entire weight of the engine for adhesion, the main and back pairs of drivers being equalized together, as also the front drivers and the pony-wheels, and the construction of the engine with swing-truck and one pair of drivers without flanges allowing it to pass short curves without difficulty, the "Mogul" is generally accepted as a type of engine especially adapted to the economical working of heavy freight traffic.

In 1867, on a number of eight-wheeled four-coupled engines, for the Pennsylvania Railroad, the four-wheeled swing-bolster-truck was first applied, and thereafter nearly all the engines built in the establishment with a two- or four-wheeled truck in front have been so constructed. The two-wheeled or "pony" truck has been built both on the Bissell plan, with double inclined slides, and with the ordinary swing-bolster, and in both cases with the radius-bar pivoting from a point about four feet back from the centre of the truck. The four-wheeled truck has been made with swing-bolster exclusively and without the radius-bar. Of the engines above referred to as the first on which the swing-bolster-truck was applied, four were for express passenger service, with drivers sixty-seven inches in diameter, and cylinders seventeen by twenty-four. One of them, placed on the road September 9, 1867, was in constant service until May 14, 1871, without ever being off its wheels for repairs, making a total mileage of one hundred and fifty-three thousand two hundred and eighty miles. All of these engines have their driving-wheels spread eight and one-half feet between centres, thus increasing the adhesive weight, and with the use of the swing-truck they have been found to work readily on the shortest curves on the road.

Steel flues were put in three ten-wheeled freight engines, numbers 211, 338, and 368, completed for the Pennsylvania Railroad in August, 1868, and up to the present time have been in constant use without requiring renewal. Flues of the same material have also been used in a number of engines for South American railroads. Experience with tubes of this metal, however, has not yet been sufficiently extended to show whether they give any advantages commensurate with their increased cost over iron.

Steel boilers have been built, to a considerable extent, for the Pennsylvania, Lehigh Valley, Central of New Jersey, and some other railroad companies, since 1868, and with good results thus far. Where this metal is used for boilers, the plates may be somewhat thinner than if of iron, but at the same time, as shown by careful tests, giving a greater tensile strength. The thoroughly homogeneous character of the steel boiler-plate made in this country recommends it strongly for the purpose.

In 1854, four engines for the Pennsylvania Railroad Company, the "Tiger," "Leopard," "Hornet," and "Wasp," were built with straight boilers and two domes each, and in 1866 this method of construction was revived. Since that date, the practice of the establishment has included both the wagon-top boiler with single dome, and the straight boiler with two domes. When the straight boiler is used, the waist is made about two inches larger in diameter than that of the wagon-top form. About equal space for water and steam is thus given in either case, and, as the number of flues is the same in both forms, more room for the circulation of water between the flues is afforded in the straight boiler, on account of its larger diameter, than in the wagon-top shape. The preference of many railroad officers for the straight boiler is based on the consideration of the greater strength which this form confessedly gives. The top and side lines being of equal length, the expansion is uniform throughout, and hence there is less liability to leak on the sides, at the junction of the waist and fire-box. The throttle-valve is placed in the forward dome, from which point drier steam can be drawn than from over the crown-sheet, where the most violent ebullitions in a boiler occur. For these reasons, as well as on account of its greater symmetry, the straight boiler with two domes is largely accepted as preferable to the wagon-top form.

Early in 1870, the success of the various narrow-gauge railway enterprises in Europe aroused a lively interest in the subject, and numerous similar lines were projected on this side of the Atlantic. Several classes of engines for working railroads of this character were designed and built, and are illustrated in full in Division VII of the Catalogue.

The history of the Baldwin Locomotive Works has thus been traced from its inception to the present time. Over twenty-six hundred locomotives have been built in the establishment since the completion of the "Old Ironsides," in 1832. Its capacity is now equal to the production of over four hundred locomotives annually, and it has attained the rank of the largest locomotive works in the world. It owes this position not only to the character of the work it has turned out, but largely also to the peculiar facilities for manufacture which it possesses. Situated close to the great iron and coal region of the country, the principal materials required for its work are readily available. It numbers among its managers and workmen men who have had the training of a lifetime in the various specialties of locomotive-manufacture, and whose experience has embraced the successive stages of American locomotive progress. Its location, in the largest manufacturing city of the country, is an advantage of no ordinary importance. In 1870, Philadelphia, with a total population of nearly seven hundred thousand souls, gave employment in its manufactures to over one hundred and twenty thousand persons. In other words, more than one-sixth of its population is concerned in production. The extent of territory covered by the city, embracing one hundred and twenty-seven square miles, with unsurpassed facilities for ready intercommunication by street railways, renders possible separate comfortable homes for the working population, and thus tends to elevate their condition and increase their efficiency. Such and so vast a class of skilled mechanics is therefore available from which to recruit the forces of the establishment when necessary. Under their command are special tools, which have been created from time to time with reference to every detail of locomotive-manufacture; and an organized system of production, perfected by long years of experience, governs the operation of all.

With such a record for the past, and such facilities at its command for the future, the Baldwin Locomotive Works submits the following Catalogue of the principal classes of locomotives embraced in its present practice.

CIRCULAR.

In the following pages we present and illustrate a system of STANDARD LOCOMOTIVES, in which, it is believed, will be found designs suited to all the requirements of ordinary service.

These patterns admit of modifications, to suit the preferences of railroad managers, and where machines of peculiar construction for special service are required, we are prepared to make and submit designs, or to build to specifications furnished.

All the locomotives of the system herewith presented are adapted to the consumption of wood, coke, or bituminous or anthracite coal as fuel.

All work is accurately fitted to gauges, which are made from a system of standards kept exclusively for the purpose. Like parts will, therefore, fit accurately in all locomotives of the same class.

This system of manufacture, together with the large number of locomotives at all times in progress, and embracing the principal classes, insures unusual and especial facilities for filling at once, or with the least possible delay, orders for duplicate parts.

Full specifications of locomotives will be furnished on application.

M. BAIRD & CO.

EXPLANATION OF TERMS.

The several classes of locomotives manufactured by the Baldwin Locomotive Works have their respective distinguishing names, which are derived and applied as follows:

All locomotives having one pair of driving-wheels are designated as | B engines.
Those having two pairs of drivers, as | C engines.
Those having three pairs of drivers, as | D engines.
Those having four pairs of drivers, as | E engines.

One or more figures united with one of these letters, B, C, D, or E, and preceding it, indicates the dimensions of cylinders, boiler, and other parts, and also the general plan of the locomotive: thus, 27½ C designates the class of eight-wheeled locomotives (illustrated on pages 56 and 60) with two pairs of drivers and a four-wheeled truck, and with cylinders sixteen inches in diameter and twenty-two or twenty-four inches stroke. 34 E designates another class (illustrated on page 80), with four pairs of drivers and a pony truck, and with cylinders twenty inches in diameter and twenty-four inches stroke.

In like manner all the other classes are designated by a combination of certain letters and figures.

All corresponding important parts of locomotives of the same class are made interchangeable and exact duplicates.

The following table gives a summary of the principal classes of locomotives of our manufacture:

GENERAL CLASSIFICATION.

Designation of Class. | SERVICE. | Gauge. | Cylinders. | | DRIVERS. | Truck. No. Wheels. | Weight in Working Order.
No. | Diameter.
| | | | | | INCHES. | | POUNDS.
8½ C | Narrow Gauge Passenger and Freight. | 3 feet and over. | 9 × 16 | | 4 | 36 to 40 | 2 | 25,000
9½ C | do. | " | 10 × 16 | | 4 | 36 to 40 | 2 | 30,000
12 D | Narrow Gauge Freight. | " | 11 × 16 | | 6 | 36 to 40 | 2 | 35,000
14 D | do. | " | 12 × 16 | | 6 | 36 to 40 | 2 | 40,000
8 C | Tank Switching. | 4 ft. 8½ and over | 9 × 16 | | 4 | 36 | .... | 25,000
10½ C | do. | " | 11 × 16 | | 4 | 36 | .... | 38,000
11½ C | do. | " | 11 × 16 | | 4 | 36 | 2 | 40,000
12 C | do. | " | 12 × 22 | | 4 | 44 | .... | 43,000
14 C | do. | " | 14 × 22 | | 4 | 48 | .... | 48,000
14½ C | do. | " | 14 × 22 | | 4 | 48 | 2 | 50,000
18½ C | do. | " | 15 × 22 | | 4 | 48 to 54 | .... | 55,000
15½ C | do. | " | 15 × 22 | | 4 | 48 to 54 | 2 | 57,000
21 D | do. | " | 15 × 22 | | 6 | 44 | .... | 60,000
27½ D | do. | " | 16 × 22 | | 6 | 44 to 48 | .... | 66,000
8 C | Switching, with separate Tender. | " | 9 × 16 | | 4 | 36 | .... | 22,000
10½ C | do. | " | 11 × 16 | | 4 | 36 | .... | 34,000
11½ C | do. | " | 11 × 16 | | 4 | 36 | 2 | 36,000
12 C | do. | " | 12 × 22 | | 4 | 44 | .... | 38,000
14 C | do. | " | 14 × 22 | | 4 | 48 | .... | 42,000
14½ C | do. | " | 14 × 22 | | 4 | 48 | 2 | 44,000
18½ C | do. | " | 15 × 22 | | 4 | 48 to 54 | .... | 49,000
15½ C | do. | " | 15 × 22 | | 4 | 48 to 54 | 2 | 51,000
19½ C | do. | " | 16 × 22 | | 4 | 48 to 54 | .... | 56,000
21 D | do. | " | 15 × 22 | | 6 | 44 | .... | 52,000
27½ D | do. | " | 16 × 22 | } | 6 | 44 to 48 | .... | 60,000
24
25½ D | do. | " | 17 × 22 | } | 6 | 48 to 54 | .... | 66,000
24
15 C | Passenger and Freight. | " | 10 × 20 | | 4 | 54 | 4 | 38,000
16½ C | do. | " | 12 × 22 | | 4 | 54 to 60 | 4 | 44,000
20½ C | do. | " | 13 × 22 | } | 4 | 56 to 66 | 4 | 50,000
24
22½ C | do. | " | 14 × 22 | } | 4 | 56 to 66 | 4 | 55,000
24
24½ C | do. | " | 15 × 22 | } | 4 | 56 to 66 | 4 | 60,000
24
27½ C | do. | " | 16 × 22 | } | 4 | 56 to 66 | 4 | 65,000
24
28 | do. | " | 17 × 22 | } | 4 | 56 to 66 | 4 | 70,000
24
24½ D | Freight. | " | 16 × 22 | } | 6 | 48 to 54 | 4 | 67,000
24
26½ D | do. | " | 17 × 22 | } | 6 | 48 to 54 | 4 | 72,000
24
28½ D | do. | " | 18 × 22 | } | 6 | 48 to 54 | 4 | 77,000
24
27½ D | Freight and pushing. | " | 17 × 22 | } | 6 | 48 to 54 | 4 | 71,000
24
25½ D | do. | " | 17 × 22 | } | 6 | 48 to 54 | 2 | 71,000
24
30 D | do. | " | 18 × 22 | } | 6 | 48 to 54 | 2 | 76,000
24
34 E | Freight and Pushing. | " | 20 × 24 | | 8 | 48 | 2 | 96,000

PREFATORY.

The dimensions given in the following Catalogue are for locomotives of four feet eight and a half inches gauge, unless otherwise stated.

The loads given under each class are invariably in gross tons of twenty-two hundred and forty pounds, and include both cars and lading.

All the locomotives described in this Catalogue are sold with the guarantee that they will haul, on a straight track in good condition, the loads stated. Their actual performance under favorable circumstances may be relied upon largely to exceed the figures given in the guarantee.

The feed-water for all locomotives specified is supplied by two pumps, or one pump and one injector. One or more injectors can also be supplied in addition to the two pumps, if desired.

DIVISION I.
ROAD LOCOMOTIVES FOR PASSENGER OR FREIGHT SERVICE.

CLASS 15 C.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 52.

CYLINDERS.

- Diameter of cylinders 10 inches.

- Length of stroke 20 inches.

DRIVING-WHEELS.

- Diameter of drivers 54 inches.

TRUCK.
FOUR-WHEELED TRUCK, WITH CENTRE-BEARING BOLSTER.

- Diameter of wheels 24 inches.

WHEEL-BASE.

- Total wheel-base 16 ft. 3¾ inches.

TENDER.
ON FOUR WHEELS.

- Capacity of tank 900 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

On drivers | 23,000 | pounds.
On truck | 15,000 | "
| ——— |
Total weight of engine, about | | 38,000 | "

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 550 | gross tons.
" | 20 | ft. grade | 250 | " "
" | 40 | " | 160 | " "
" | 60 | " | 115 | " "
" | 80 | " | 85 | " "
" | 100 | " | 65 | " "

DIVISION I.
ROAD LOCOMOTIVES FOR PASSENGER OR FREIGHT SERVICE.

CLASS 16½ C.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 52.

CYLINDERS.

- Diameter of cylinders 12 inches.

- Length of stroke 22 inches.

DRIVING-WHEELS.

- Diameter of drivers 54 to 60 inches.

TRUCK.
FOUR-WHEELED TRUCK, WITH CENTRE-BEARING BOLSTER.

- Diameter of wheels 24 to 26 inches.

WHEEL-BASE.

- Total wheel-base 19 ft. 1 inch.

TENDER.
ON TWO FOUR-WHEELED TRUCKS.

- Capacity of tank 1200 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

On drivers | 28,000 | pounds.
On truck | 16,000 | "
| ——— |
Total weight of engine, about | | 44,000 | "

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 665 | gross tons.
" | 20 | ft. grade | 305 | " "
" | 40 | " | 190 | " "
" | 60 | " | 135 | " "
" | 80 | " | 100 | " "
" | 100 | " | 75 | " "

DIVISION I.
ROAD LOCOMOTIVES FOR PASSENGER OR FREIGHT SERVICE.

CLASS 20½ C
GENERAL DESIGN ILLUSTRATED BY PRINTS ON PAGES 52 AND 56.

CYLINDERS.

- Diameter of cylinders 13 inches.

- Length of stroke 22 or 24 inches.

DRIVING-WHEELS.

- Diameter of drivers 56 to 66 inches.

TRUCK.
FOUR-WHEELED CENTRE-BEARING TRUCK, WITH SWING BOLSTER.

- Diameter of wheels 24 to 30 inches.

WHEEL-BASE.

- Total wheel-base 20 ft. 1¾ inches.

- Rigid "
(distance between driving-wheel-centres) 6 ft. 6 inches.

TENDER.
ON TWO FOUR-WHEELED TRUCKS.

- Capacity of tank 1400 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

On drivers | 30,000 | pounds.
On truck | 20,000 | "
| ——— |
Total weight of engine, about | | 50,000 | "

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 710 | gross tons.
" | 20 | ft. grade | 325 | " "
" | 40 | " | 200 | " "
" | 60 | " | 140 | " "
" | 80 | " | 105 | " "
" | 100 | " | 80 | " "

DIVISION I.
ROAD LOCOMOTIVES FOR PASSENGER OR FREIGHT SERVICE.

CLASS 22½ C.
GENERAL DESIGN ILLUSTRATED BY PRINTS ON PAGES 52 AND 56.

CYLINDERS.

- Diameter of cylinders 14 inches.

- Length of stroke 22 or 24 inches.

DRIVING-WHEELS.

- Diameter of drivers 56 to 66 inches.

TRUCK.
FOUR-WHEELED CENTRE-BEARING TRUCK, WITH SWING BOLSTER.

- Diameter of wheels 24 to 30 inches.

WHEEL-BASE.

- Total wheel-base 20 ft. 7¾ inches.

- Rigid "
(distance between driving-wheel-centres) 7 ft.

TENDER.
ON TWO FOUR-WHEELED TRUCKS.

- Capacity of tank 1600 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

On drivers | 35,000 | pounds.
On truck | 20,000 | "
| ——— |
Total weight of engine, about | | 55,000 | "

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 835 | gross tons.
" | 20 | ft. grade | 380 | " "
" | 40 | " | 240 | " "
" | 60 | " | 170 | " "
" | 80 | " | 125 | " "
" | 100 | " | 100 | " "

DIVISION I.
ROAD LOCOMOTIVES FOR PASSENGER OR FREIGHT SERVICE.

CLASS 24½ C
GENERAL DESIGN ILLUSTRATED BY PRINTS ON PAGES 56 AND 60.

CYLINDERS.

- Diameter of cylinders 15 inches.

- Length of stroke 22 or 24 inches.

DRIVING-WHEELS.

- Diameter of drivers 56 to 66 inches.

TRUCK.
FOUR-WHEELED CENTRE-BEARING TRUCK, WITH SWING BOLSTER.

- Diameter of wheels 24 to 30 inches.

WHEEL-BASE.

- Total wheel-base 21 ft. 3 inches.

- Rigid "
(distance between driving-wheel-centres) 7 ft. 8 inches.

TENDER.
ON TWO FOUR-WHEELED TRUCKS.

- Capacity of tank 1800 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

On drivers | 39,000 | pounds.
On truck | 21,000 | "
| ——— |
Total weight of engine, about | | 60,000 | "

LOAD.
IN ADDITION TO WEIGHT OF ENGINE AND TENDER.

On a | level | | 930 | gross tons.
" | 20 | ft. grade | 430 | " "
" | 40 | " | 270 | " "
" | 60 | " | 190 | " "
" | 80 | " | 140 | " "
" | 100 | " | 110 | " "

DIVISION I.
ROAD LOCOMOTIVES FOR PASSENGER OR FREIGHT SERVICE.

CLASS 27½ C.
GENERAL DESIGN ILLUSTRATED BY PRINTS ON PAGES 56 AND 60.

CYLINDERS.

- Diameter of cylinders 16 inches.

- Length of stroke 22 or 24 inches.

DRIVING-WHEELS.

- Diameter of drivers 56 to 66 inches.

TRUCK.
FOUR-WHEELED CENTRE-BEARING TRUCK, WITH SWING BOLSTER.

- Diameter of wheels 24 to 30 inches.

WHEEL-BASE.

- Total wheel-base 21 ft. 9 inches.

- Rigid "
(distance between driving-wheel-centres) 8 ft.

TENDER.
ON TWO FOUR-WHEELED TRUCKS.

- Capacity of tank 2000 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

On drivers | 42,000 | pounds.
On truck | 23,000 | "
| ——— |
Total weight of engine, about | | 65,000 | "

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 1000 | gross tons.
" | 20 | ft. grade | 460 | " "
" | 40 | " | 290 | " "
" | 60 | " | 205 | " "
" | 80 | " | 150 | " "
" | 100 | " | 120 | " "

The distance between centres of drivers (rigid wheel-base) can be made 8 ft. 6 in., if preferred to 8 ft. as given above. This greater spread of wheels, throwing more weight on the drivers, gives the engine greater adhesion, and thus adds to its efficiency for freight service. Owing to the peculiar construction of the truck, the engine is found to pass short curves without difficulty, even with this greater distance between driving-wheel-centres.

DIVISION I.
ROAD LOCOMOTIVES FOR PASSENGER OR FREIGHT SERVICE.

CLASS 28 C.
GENERAL DESIGN ILLUSTRATED BY PRINTS ON PAGES 56, 60, AND 64.

CYLINDERS.

- Diameter of cylinders 17 inches.

- Length of stroke 22 or 24 inches.

DRIVING-WHEELS.

- Diameter of drivers 56 to 66 inches.

TRUCK.
FOUR-WHEELED CENTRE-BEARING TRUCK, WITH SWING BOLSTER.

- Diameter of wheels 24 to 30 inches.

WHEEL-BASE.

- Total wheel-base 22 ft. 6¼ inches.

- Rigid "
(distance between driving-wheel-centres) 8 ft.

TENDER.
ON TWO FOUR-WHEELED TRUCKS.

- Capacity of tank 2200 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

On drivers | 45,000 | pounds.
On truck | 25,000 | "
| ——— |
Total weight of engine, about | | 70,000 | "

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 1075 | gross tons.
" | 20 | ft. grade | 495 | " "
" | 40 | " | 310 | " "
" | 60 | " | 220 | " "
" | 80 | " | 165 | " "
" | 100 | " | 130 | " "

The distance between centres of drivers (rigid wheel-base) can be made 8 ft. 6 in., if preferred to 8 ft. as given above. This greater spread of wheels, throwing more weight on the drivers, gives the engine greater adhesion, and thus adds to its efficiency for freight service. Owing to the peculiar construction of the truck, the engine is found to pass short curves without difficulty, even with this greater distance between driving-wheel-centres.

ADDENDA.

ADAPTATION FOR EITHER PASSENGER OR FREIGHT SERVICE.

The five preceding classes, embracing road locomotives with cylinders from thirteen to seventeen inches in diameter, admit of construction with either a twenty-two or a twenty-four inches stroke, and with driving-wheels of any diameter from fifty-six to sixty-six inches. Each class can, therefore, be adapted to either passenger or freight service, by giving the shorter stroke and the larger wheel for the former use, and the longer stroke and smaller wheel for the latter. The same cylinder pattern is used for both the twenty-two and the twenty-four inches stroke, the difference in length being made by recessing the cylinder heads.

ANTHRACITE COAL BURNERS.

The illustrations and figures given for engines in this Division are all for soft coal or wood burners. For anthracite coal the form of the furnace is changed, giving a longer grate and shallower fire-box. The barrel of boiler, length of connecting-rods, number and length of flues, etc., remain the same, so that no change in principal patterns results. The change in shape and dimensions of fire-box, however, alters the distribution of weight, throwing more load on the drivers and less on the truck, while the total weight of engine remains nearly the same. The hard coal burners, accordingly, having from this cause somewhat more adhesion than the soft coal burners of the same class, have proportionately more tractive power, and will haul loads from ten to fifteen per cent. greater than those given for the corresponding soft coal or wood burning engines.

STRAIGHT AND WAGON-TOP BOILERS.

All the engines of this division are built with wagon-top boilers or with straight boilers and two domes, as preferred. Where the latter form is made, the throttle-valve is placed in the forward dome. The wagon-top and straight boilers for the same class are so proportioned as to give equal steam space and the same number of flues in both forms of construction.

DIVISION II.
TEN-WHEELED FREIGHT LOCOMOTIVES.

CLASS 24½ D.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 68.

CYLINDERS.

- Diameter of cylinders 16 inches.

- Length of stroke 22 or 24 inches.

DRIVING-WHEELS.
REAR AND FRONT PAIRS WITH FLANGED TIRES 5½ INCHES WIDE. MAIN PAIR WITH PLAIN TIRES 6 INCHES WIDE.

- Diameter of drivers 48 to 54 inches.

TRUCK.
FOUR-WHEELED CENTRE-BEARING TRUCK, WITH SWING BOLSTER.

- Diameter of wheels 24 to 26 inches.

WHEEL-BASE.

- Total wheel-base 23 feet.

- Rigid "
(distance between centres of rear and front drivers) 12 ft. 1 inch.

TENDER.
ON TWO FOUR-WHEELED TRUCKS.

- Capacity of tank 1600 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

On drivers | 51,000 | pounds.
On truck | 16,000 | "
| ——— |
Total weight of engine, about | | 67,000 | "

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 1230 | gross tons.
" | 20 | ft. grade | 570 | " "
" | 40 | " | 360 | " "
" | 60 | " | 260 | " "
" | 80 | " | 195 | " "
" | 100 | " | 155 | " "

DIVISION II.
TEN-WHEELED FREIGHT LOCOMOTIVES.

CLASS 26½ D.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 68.

CYLINDERS.

- Diameter of cylinders 17 inches.

- Length of stroke 22 or 24 inches.

DRIVING-WHEELS.
REAR AND FRONT PAIRS WITH FLANGED TIRES 5½ INCHES WIDE. MAIN PAIR WITH PLAIN TIRES 6 INCHES WIDE.

- Diameter of drivers 48 to 54 inches.

TRUCK.
FOUR-WHEELED CENTRE-BEARING TRUCK, WITH SWING BOLSTER.

- Diameter of wheels 24 to 26 inches.

WHEEL-BASE.

- Total wheel-base 23 ft. 2¾ inches.

- Rigid "
(distance between centres of rear and front drivers) 12 ft. 8 inches.

TENDER.
ON TWO FOUR-WHEELED TRUCKS.

- Capacity of tank 1800 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

On drivers | 54,000 | pounds.
On truck | 18,000 | "
| ——— |
Total weight of engine, about | | 72,000 | "

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 1300 | gross tons.
" | 20 | ft. grade | 600 | " "
" | 40 | " | 380 | " "
" | 60 | " | 270 | " "
" | 80 | " | 205 | " "
" | 100 | " | 160 | " "

DIVISION II.
TEN-WHEELED FREIGHT LOCOMOTIVES.

CLASS 28½ D.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 68.

CYLINDERS.

- Diameter of cylinders 18 inches.

- Length of stroke 22 or 24 inches.

DRIVING-WHEELS.
REAR AND FRONT PAIRS WITH FLANGED TIRES 5½ INCHES WIDE. MAIN PAIR WITH PLAIN TIRES 6 INCHES WIDE.

- Diameter of drivers 48 to 54 inches.

TRUCK.
FOUR-WHEELED CENTRE-BEARING TRUCK, WITH SWING BOLSTER.

- Diameter of wheels 24 to 26 inches.

WHEEL-BASE.

- Total wheel-base 23 ft. 2¾ inches.

- Rigid "
(distance between centres of rear and front drivers) 12 ft. 8 inches.

TENDER.
ON TWO FOUR-WHEELED TRUCKS.

- Capacity of tank 2000 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

On drivers | 58,000 | pounds.
On truck | 19,000 | "
| ——— |
Total weight of engine, about | | 77,000 | "

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 1400 | gross tons.
" | 20 | ft. grade | 645 | " "
" | 40 | " | 410 | " "
" | 60 | " | 290 | " "
" | 80 | " | 220 | " "
" | 100 | " | 175 | " "

ADDENDA.

HARD AND SOFT COAL BURNERS

In the three classes of engines of Division II. certain differences occur between hard and soft coal burners. The print on page 68 illustrates the plan of the soft coal or wood burner. In the hard coal burner the fire-box is made longer and shallower; the rear drivers are brought farther forward, and the three pairs of drivers are arranged so that the distance between centres of rear and main drivers is the same as the distance between centres of main and front drivers. The point of suspension of the back part of the engine being thus brought forward, a greater proportion of the total weight is carried on the drivers and rendered available for adhesion, and the tractive power of the hard coal burner is accordingly somewhat greater than that of the soft coal engine. The rigid wheel-base of the hard coal burner is also lessened from 17 to 24 inches by the same modification.

CURVING.

All engines of this Division are built with a swing-bolster truck. The middle pair of drivers have tires without flanges. The engine is accordingly guided on the rails by the truck and the flanges of the front driving-wheels, and is found to pass curves without difficulty.

If preferred, however, the front instead of the main pair of drivers can have the plain tires. Both methods are in use.

STRAIGHT AND WAGON-TOP BOILERS.

All the engines of this Division are built with wagon-top boilers or with straight boilers and two domes, as preferred. Where the latter form is made, the throttle-valve is placed in the forward dome. The wagon-top and straight boilers for the same class are so proportioned as to give equal steam space and the same number of flues in both forms of construction.

DIVISION III.
FREIGHT OR PUSHING ENGINES.—"MOGUL" PATTERN.

CLASS 27½ D.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 74.

CYLINDERS.

- Diameter of cylinders 16 inches.

- Length of stroke 22 or 24 inches.

DRIVING-WHEELS.
REAR AND FRONT PAIRS WITH FLANGED TIRES 5½ INCHES WIDE. MAIN PAIR WITH PLAIN TIRES 6 INCHES WIDE.

- Diameter of drivers 48 to 54 inches.

TRUCK.
ONE PAIR OF LEADING WHEELS, WITH SWING BOLSTER AND RADIUS-BAR, EQUALIZED WITH FRONT DRIVERS.

- Diameter of wheels 30 inches.

WHEEL-BASE.

- Total wheel-base 21 ft. 4 inches.

- Rigid "
(distance between centres of rear and front drivers) 14 ft.

TENDER.
ON TWO FOUR-WHEELED TRUCKS.

- Capacity of tank 1600 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

On drivers | 57,000 | pounds.
On leading wheels | 9,000 | "
| ——— |
Total weight of engine, about | | 66,000 | "

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 1400 | gross tons.
" | 20 | ft. grade | 655 | " "
" | 40 | " | 415 | " "
" | 60 | " | 300 | " "
" | 80 | " | 230 | " "
" | 100 | " | 180 | " "

DIVISION III.
FREIGHT OR PUSHING ENGINES—"MOGUL" PATTERN.

CLASS 25½ D.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 74.

CYLINDERS.

- Diameter of cylinders 17 inches.

- Length of stroke 22 or 24 inches.

DRIVING-WHEELS.
REAR AND FRONT PAIRS WITH FLANGED TIRES 5½ INCHES WIDE. MAIN PAIR WITH PLAIN TIRES 6 INCHES WIDE.

- Diameter of drivers 48 to 54 inches.

TRUCK.
ONE PAIR OF LEADING WHEELS, WITH SWING BOLSTER AND RADIUS-BAR, EQUALIZED WITH FRONT DRIVERS.

- Diameter of wheels 30 inches.

WHEEL-BASE.

- Total wheel-base 21 ft. 10 inches.

- Rigid "
(distance between centres of rear and front drivers) 14 ft. 6 inches.

TENDER.
ON TWO FOUR-WHEELED TRUCKS.

- Capacity of tank 1800 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

On drivers | 62,000 | pounds.
On leading wheels | 9,000 | "
| ——— |
Total weight of engine, about | | 71,000 | "

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 1500 | gross tons.
" | 20 | ft. grade | 695 | " "
" | 40 | " | 445 | " "
" | 60 | " | 320 | " "
" | 80 | " | 245 | " "
" | 100 | " | 195 | " "

DIVISION III.
FREIGHT OR PUSHING ENGINES—"MOGUL" PATTERN.

CLASS 30 D.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 74.

CYLINDERS.

- Diameter of cylinders 18 inches.

- Length of stroke 22 or 24 inches.

DRIVING-WHEELS.
REAR AND FRONT PAIRS WITH FLANGED TIRES 5½ INCHES WIDE. MAIN PAIR WITH PLAIN TIRES 6 INCHES WIDE.

- Diameter of drivers 48 to 54 inches.

TRUCK.
ONE PAIR OF LEADING WHEELS, WITH SWING BOLSTER AND RADIUS-BAR, EQUALIZED WITH FRONT DRIVERS.

- Diameter of wheels 30 inches.

WHEEL-BASE.

- Total wheel-base 22 ft. 5 inches.

- Rigid "
(distance between centres of rear and front drivers) 15 ft.

TENDER.
ON TWO FOUR-WHEELED TRUCKS.

- Capacity of tank 2000 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

On drivers | 66,000 | pounds.
On leading wheels | 10,000 | "
| ——— |
Total weight of engine, about | | 76,000 | "

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 1600 | gross tons.
" | 20 | ft. grade | 740 | " "
" | 40 | " | 470 | " "
" | 60 | " | 340 | " "
" | 80 | " | 260 | " "
" | 100 | " | 205 | " "

ADDENDA.

ANTHRACITE COAL BURNERS.

For anthracite coal, a long and shallow fire-box is constructed, and the back driving-wheels are placed at the same distance from the main pair as the latter are from the front drivers. This reduces the rigid wheel-base to some extent, but retains the same weight on drivers.

CURVING.

The leading wheels having a swing bolster, and the middle pair of drivers having no flanges, the engine is guided by the truck and the front drivers, and is found to pass short curves without difficulty.

TRACTIVE POWER.

It will be seen that in engines of this pattern nearly all the weight of the machine is utilized for adhesion, only enough load being thrown on the leading wheels to steady the engine on the track. The tractive power of these engines is accordingly greater in comparison with their total weight than that of either the eight-wheeled C or the ten-wheeled D patterns, and they are, therefore, especially suited to working steep grades and hauling heavy loads at low speeds.

STRAIGHT AND WAGON-TOP BOILERS.

All the engines of this Division are built with wagon-top boilers or with straight boilers and two domes, as preferred. Where the latter form is made, the throttle-valve is placed in the forward dome. The wagon-top and straight boilers for the same class are so proportioned as to give equal steam space and the same number of flues in both forms of construction.

DIVISION IV.
FREIGHT OR PUSHING ENGINES.—"CONSOLIDATION" PATTERN.

CLASS 34 E.
ILLUSTRATED BY PRINT ON PAGE 80.

CYLINDERS.

- Diameter of cylinders 20 inches.

- Length of stroke 24 inches.

DRIVING-WHEELS.
REAR AND SECOND PAIRS WITH FLANGED TIRES 5½ INCHES WIDE. FRONT AND MAIN PAIRS WITH PLAIN TIRES 6 INCHES WIDE.

- Diameter of drivers 48 inches.

TRUCK.
ONE PAIR OF LEADING WHEELS, WITH SWING BOLSTER AND RADIUS-BAR, EQUALIZED WITH FRONT DRIVERS.

- Diameter of wheels 30 inches.

WHEEL-BASE.

- Total wheel-base 21 ft. 10 inches.

- Rigid "
(distance between centres of rear and second pair of drivers) 9 ft. 10 inches.

TENDER.
ON TWO FOUR-WHEELED TRUCKS.

- Capacity of tank 2400 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

On drivers | 87,000 | pounds.
On leading wheels | 9,000 | "
| ——— |
Total weight of engine, about | | 96,000 | "

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 2000 | gross tons.
" | 20 | ft. grade | 990 | " "
" | 40 | " | 635 | " "
" | 60 | " | 460 | " "
" | 80 | " | 355 | " "
" | 100 | " | 285 | " "

ADDENDA.

GENERAL DESIGN.

The plan of this engine admits of either straight or wagon-top boiler, and of the use, with the proper form of grate, of either anthracite or bituminous coal or of wood.

WHEEL-BASE.

The arrangement of the wheels is such as to permit the engine to traverse curves with nearly as much facility as an engine of the ordinary type with only four drivers. The leading wheels having a swing bolster, and the front and main drivers having no flanges, the engine is guided on the rails by the leading wheels and by the flanges of the rear and second pairs of drivers. It is, therefore, impossible for the wheels to bind on the rails. Engines of this class are run around curves of 400 feet radius and less.

TRACTIVE POWER.

The distribution of the total weight of the engine gives about twenty-two thousand pounds for each pair of drivers,—a weight no greater than is carried on each pair of drivers of the larger sizes of ordinary eight-wheeled C engines. The single pair of leading wheels carries only nine thousand pounds. This arrangement renders available for adhesion a total weight of 87,000 pounds. One of these engines on a recent trial hauled one hundred and fifty gross tons of cars and load up a grade of one hundred and forty-five feet with sharp curves, and two hundred and sixty-eight gross tons of cars and load up a grade of one hundred and sixteen feet to the mile. The pressure in the first case was one hundred and ten pounds, and the speed six minutes to the mile; in the second case, the pressure was one hundred and twenty pounds, and the speed seven and one-half minutes to the mile.

These engines are especially adapted to the working of steep gradients or where heavy loads are to be moved.

DIVISION V.
SWITCHING ENGINES WITH SEPARATE TENDERS.

CLASS 8 C.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 84.

CYLINDERS.

- Diameter of cylinders 9 inches.

- Length of stroke 16 inches.

DRIVING-WHEELS.

- Diameter of drivers 36 inches.

- Distance between centres 6 feet.

TENDER.
ON FOUR WHEELS, 30 INCHES IN DIAMETER.

- Capacity of tank 750 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

- Total weight of engine, about 22,000 pounds.

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 530 | gross tons.
" | 20 | ft. grade | 245 | " "
" | 40 | " | 155 | " "
" | 60 | " | 110 | " "
" | 80 | " | 85 | " "
" | 100 | " | 70 | " "

DIVISION V.
SWITCHING ENGINES WITH SEPARATE TENDERS.

CLASS 10½ C.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 84.

CYLINDERS.

- Diameter of cylinders 11 inches.

- Length of stroke 16 inches.

DRIVING-WHEELS.

- Diameter of drivers 36 inches.

- Distance between centres 6 feet.

TENDER.
ON FOUR WHEELS, 30 INCHES IN DIAMETER.

- Capacity of tank 750 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

- Total weight of engine, about 34,000 pounds.

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 825 | gross tons.
" | 20 | ft. grade | 385 | " "
" | 40 | " | 250 | " "
" | 60 | " | 180 | " "
" | 80 | " | 140 | " "
" | 100 | " | 110 | " "

DIVISION V.
SWITCHING ENGINES WITH SEPARATE TENDERS.

CLASS 12 C.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 88.

CYLINDERS.

- Diameter of cylinders 12 inches.

- Length of stroke 22 inches.

DRIVING-WHEELS.

- Diameter of drivers 44 inches.

- Distance between centres 7 feet.

TENDER.
ON FOUR, SIX, OR EIGHT WHEELS, 30 INCHES IN DIAMETER.

- Capacity of tank 900 to 1400 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

- Total weight of engine, about 38,000 pounds.

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 925 | gross tons.
" | 20 | ft. grade | 435 | " "
" | 40 | " | 280 | " "
" | 60 | " | 200 | " "
" | 80 | " | 155 | " "
" | 100 | " | 125 | " "

DIVISION V.
SWITCHING ENGINES WITH SEPARATE TENDERS.

CLASS 14 C.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 88.

CYLINDERS.

- Diameter of cylinders 14 inches.

- Length of stroke 22 inches.

DRIVING-WHEELS.

- Diameter of drivers 48 inches.

- Distance between centres 7 feet.

TENDER.
ON FOUR, SIX, OR EIGHT WHEELS, 30 INCHES IN DIAMETER.

- Capacity of tank 900 to 1400 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

- Total weight of engine, about 42,000 pounds.

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 1020 | gross tons.
" | 20 | ft. grade | 480 | " "
" | 40 | " | 305 | " "
" | 60 | " | 225 | " "
" | 80 | " | 170 | " "
" | 100 | " | 135 | " "

DIVISION V.
SWITCHING ENGINES WITH SEPARATE TENDERS.

CLASS 18½ C.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 88.

CYLINDERS.

- Diameter of cylinders 15 inches.

- Length of stroke 22 inches.

DRIVING-WHEELS.

- Diameter of drivers 48 to 54 inches.

- Distance between centres 7 feet.

TENDER.
ON EIGHT WHEELS, 30 INCHES IN DIAMETER.

- Capacity of tank 1600 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

- Total weight of engine, about 49,000 pounds.

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 1200 | gross tons.
" | 20 | ft. grade | 560 | " "
" | 40 | " | 360 | " "
" | 60 | " | 260 | " "
" | 80 | " | 200 | " "
" | 100 | " | 160 | " "

DIVISION V.
SWITCHING ENGINES WITH SEPARATE TENDERS.

CLASS 19½ C.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 88.

CYLINDERS.

- Diameter of cylinders 16 inches.

- Length of stroke 22 inches.

DRIVING-WHEELS.

- Diameter of drivers 48 to 54 inches.

- Length of stroke 22 inches.

WHEEL-BASE.

- Total wheel-base 7 ft. 6 inches.

- Rigid " 7 ft. 6 inches.

TENDER.
ON EIGHT WHEELS, 30 INCHES IN DIAMETER.

- Capacity of tank 1600 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

- Total weight of engine, about 56,000 pounds.

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 1360 | gross tons.
" | 20 | ft. grade | 640 | " "
" | 40 | " | 410 | " "
" | 60 | " | 300 | " "
" | 80 | " | 230 | " "
" | 100 | " | 180 | " "

DIVISION V.
SWITCHING ENGINES WITH SEPARATE TENDERS.

CLASS 11½ C
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 94.

CYLINDERS.

- Diameter of cylinders 11 inches.

- Length of stroke 16 inches.

DRIVING-WHEELS.

- Diameter of drivers 36 inches.

TRUCK.
TWO-WHEELED, WITH SWING BOLSTER AND RADIUS-BAR.

- Diameter of wheels 24 inches.

WHEEL-BASE.

- Total wheel-base 11 ft. 3 inches.

- Rigid " 4 ft. 8 inches.

TENDER.
ON FOUR WHEELS, 30 INCHES IN DIAMETER.

- Capacity of tank 750 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

On drivers | 30,000 | pounds.
On truck | 5,000 | "
| ——— |
Total weight of engine, about | | 35,000 | "

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 725 | gross tons.
" | 20 | ft. grade | 335 | " "
" | 40 | " | 215 | " "
" | 60 | " | 155 | " "
" | 80 | " | 120 | " "
" | 100 | " | 95 | " "

DIVISION V.
SWITCHING ENGINES WITH SEPARATE TENDERS.

CLASS 14½ C.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 94.

CYLINDERS.

- Diameter of cylinders 14 inches.

- Length of stroke 22 inches.

DRIVING-WHEELS.

- Diameter of drivers 48 inches.

TRUCK.
TWO-WHEELED, WITH SWING BOLSTER AND RADIUS-BAR.

- Diameter of wheels 24 inches.

WHEEL-BASE.

- Total wheel-base 13 ft. 8½ inches.

- Rigid " 6 ft. 6 inches.

TENDER.
ON FOUR WHEELS, OR TWO FOUR-WHEELED TRUCKS.

- Capacity of tank 1200 to 1600 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

On drivers | 38,000 | pounds.
On truck | 6,000 | "
| ——— |
Total weight of engine, about | | 44,000 | "

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 865 | gross tons.
" | 20 | ft. grade | 400 | " "
" | 40 | " | 255 | " "
" | 60 | " | 180 | " "
" | 80 | " | 140 | " "
" | 100 | " | 110 | " "

DIVISION V.
SWITCHING ENGINES WITH SEPARATE TENDERS.

CLASS 15½ C.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 94.

CYLINDERS.

- Diameter of cylinders 15 inches.

- Length of stroke 22 inches.

DRIVING-WHEELS.

- Diameter of drivers 48 to 54 inches.

TRUCK.
TWO-WHEELED, WITH SWING BOLSTER AND RADIUS-BAR.

- Diameter of wheels 24 inches.

WHEEL-BASE.

- Total wheel-base 14 ft. 9 inches.

- Rigid "
(distance between driving-wheel centres) 7 ft.

TENDER.
ON TWO FOUR-WHEELED TRUCKS.

- Capacity of tank 1600 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

On drivers | 44,000 | pounds.
On truck | 6,000 | "
| ——— |
Total weight of engine, about | | 50,000 | "

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 1060 | gross tons.
" | 20 | ft. grade | 495 | " "
" | 40 | " | 315 | " "
" | 60 | " | 230 | " "
" | 80 | " | 170 | " "
" | 100 | " | 135 | " "

DIVISION V.
SWITCHING ENGINES WITH SEPARATE TENDERS.

CLASS 21 D.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 100.

CYLINDERS.

- Diameter of cylinders 15 inches.

- Length of stroke 22 inches.

DRIVING-WHEELS.

- Diameter of drivers 44 inches.

WHEEL-BASE.

- Total wheel-base 9 ft. 9 inches.

- Rigid " 9 ft. 9 inches.

TENDER.
ON TWO FOUR-WHEELED TRUCKS.

- Capacity of tank 1600 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

- Total weight of engine, about 52,000 pounds.

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 1260 | gross tons.
" | 20 | ft. grade | 590 | " "
" | 40 | " | 375 | " "
" | 60 | " | 270 | " "
" | 80 | " | 210 | " "
" | 100 | " | 165 | " "

DIVISION V.
SWITCHING ENGINES WITH SEPARATE TENDERS.

CLASS 27½ D.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 100.

CYLINDERS.

- Diameter of cylinders 16 inches.

- Length of stroke 22 or 24 inches.

DRIVING-WHEELS.

- Diameter of drivers 44 to 48 inches.

WHEEL-BASE.

- Total wheel-base 10 feet.

- Rigid " 10 feet.

TENDER.
ON TWO FOUR-WHEELED TRUCKS.

- Capacity of tank 1600 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

- Total weight of engine, about 60,000 pounds.

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 1460 | gross tons.
" | 20 | ft. grade | 685 | " "
" | 40 | " | 440 | " "
" | 60 | " | 320 | " "
" | 80 | " | 245 | " "
" | 100 | " | 200 | " "

DIVISION V.
SWITCHING ENGINES WITH SEPARATE TENDERS.

CLASS 25½ D.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 100.

CYLINDERS.

- Diameter of cylinders 17 inches.

- Length of stroke 22 or 24 inches.

DRIVING-WHEELS.

- Diameter of drivers 48 inches.

WHEEL-BASE.

- Total wheel-base 10 feet.

- Rigid " 10 feet.

TENDER.
ON TWO FOUR-WHEELED TRUCKS.

- Capacity of tank 1800 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

- Total weight of engine, about 66,000 pounds.

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 1600 | gross tons.
" | 20 | ft. grade | 755 | " "
" | 40 | " | 485 | " "
" | 60 | " | 350 | " "
" | 80 | " | 270 | " "
" | 100 | " | 215 | " "

DIVISION VI.
TANK SWITCHING ENGINES.

CLASS 8 C.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 106.

CYLINDERS.

- Diameter of cylinders 9 inches.

- Length of stroke 16 inches.

DRIVING-WHEELS.

- Diameter of drivers 36 inches.

WHEEL-BASE.

- Total wheel-base 6 ft. 6 inches.

- Rigid " 6 ft. 6 inches.

TANK.

- Capacity 250 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

- Total weight of engine, about 25,000 pounds.

LOAD.
IN ADDITION TO WEIGHT OF ENGINE.

On a | level | | 565 | gross tons.
" | 20 | ft. grade | 265 | " "
" | 40 | " | 170 | " "
" | 60 | " | 125 | " "
" | 80 | " | 100 | " "
" | 100 | " | 80 | " "

DIVISION VI.
TANK SWITCHING ENGINES.

CLASS 10½ C.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 106.

CYLINDERS

- Diameter of cylinders 11 inches.

- Length of stroke 16 inches.

DRIVING-WHEELS.

- Diameter of drivers 36 inches.

WHEEL-BASE.

- Total wheel-base 6 ft. 6 inches.

- Rigid " 6 ft. 6 inches.

TANK.

- Capacity 400 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

- Total weight of engine, about 38,000 pounds.

LOAD.
IN ADDITION TO WEIGHT OF ENGINE.

On a | level | | 855 | gross tons.
" | 20 | ft. grade | 405 | " "
" | 40 | " | 265 | " "
" | 60 | " | 195 | " "
" | 80 | " | 150 | " "
" | 100 | " | 120 | " "

DIVISION VI.
TANK SWITCHING ENGINES.

CLASS 12 C.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 106.

CYLINDERS.

- Diameter of cylinders 12 inches.

- Length of stroke 22 inches.

DRIVING-WHEELS.

- Diameter of drivers 44 inches.

WHEEL-BASE.

- Total wheel-base 7 feet.

- Rigid " 7 feet.

TANK.

- Capacity 500 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

- Total weight of engine, about 43,000 pounds.

LOAD.
IN ADDITION TO WEIGHT OF ENGINE.

On a | level | | 960 | gross tons.
" | 20 | ft. grade | 455 | " "
" | 40 | " | 295 | " "
" | 60 | " | 215 | " "
" | 80 | " | 170 | " "
" | 100 | " | 135 | " "

DIVISION VI.
TANK SWITCHING ENGINES.

CLASS 14 C.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 106.

CYLINDERS.

- Diameter of cylinders 14 inches.

- Length of stroke 22 inches.

DRIVING-WHEELS.

- Diameter of drivers 48 inches.

WHEEL-BASE.

- Total wheel-base 7 feet.

- Rigid " 7 feet.

TANK.

- Capacity 600 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

- Total weight of engine, about 49,000 pounds.

LOAD.
IN ADDITION TO WEIGHT OF ENGINE.

On a | level | | 1100 | gross tons.
" | 20 | ft. grade | 525 | " "
" | 40 | " | 340 | " "
" | 60 | " | 250 | " "
" | 80 | " | 195 | " "
" | 100 | " | 155 | " "

DIVISION VI.
TANK SWITCHING ENGINES.

CLASS 18½ C.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 106.

CYLINDERS.

- Diameter of cylinders 15 inches.

- Length of stroke 22 inches.

DRIVING-WHEELS.

- Diameter of drivers 48 inches.

WHEEL-BASE.

- Total wheel-base 7 feet.

- Rigid " 7 feet.

TANK.

- Capacity 700 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

- Total weight of engine, about 56,000 pounds.

LOAD.
IN ADDITION TO WEIGHT OF ENGINE.

On a | level | | 1230 | gross tons.
" | 20 | ft. grade | 585 | " "
" | 40 | " | 380 | " "
" | 60 | " | 280 | " "
" | 80 | " | 215 | " "
" | 100 | " | 175 | " "

DIVISION VI.
TANK SWITCHING ENGINES.

CLASS 11½ C.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 114.

CYLINDERS.

- Diameter of cylinders 11 inches.

- Length of stroke 16 inches.

DRIVING-WHEELS.

- Diameter of drivers 36 inches.

TRUCK.
TWO-WHEELED, WITH SWING BOLSTER AND RADIUS-BAR.

- Diameter of wheels 24 inches.

WHEEL-BASE.

- Total wheel-base 11 ft. 3 inches.

- Rigid " 4 ft. 8 inches.

TANK.

- Capacity 400 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

On drivers | 35,000 | pounds.
On truck | 5,000 | "
| ——— |
Total weight of engine, about | | 40,000 | "

LOAD.
IN ADDITION TO WEIGHT OF ENGINE.

On a | level | | 785 | gross tons.
" | 20 | ft. grade | 370 | " "
" | 40 | " | 240 | " "
" | 60 | " | 175 | " "
" | 80 | " | 135 | " "
" | 100 | " | 110 | " "

DIVISION VI.
TANK SWITCHING ENGINES.

CLASS 14½ C.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 114.

CYLINDERS.

- Diameter of cylinders 14 inches.

- Length of stroke 22 inches.

DRIVING-WHEELS.

- Diameter of drivers 48 inches.

TRUCK.
TWO-WHEELED, WITH SWING BOLSTER AND RADIUS-BAR.

- Diameter of wheels 24 inches.

WHEEL-BASE.

- Total wheel-base 13 ft. 8½ inches.

- Rigid " 6 ft. 6 inches.

TANK.

- Capacity 600 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

On drivers | 44,000 | pounds.
On truck | 6,000 | "
| ——— |
Total weight of engine, about | | 50,000 | "

LOAD.
IN ADDITION TO WEIGHT OF ENGINE.

On a | level | | 980 | gross tons.
" | 20 | ft. grade | 465 | " "
" | 40 | " | 300 | " "
" | 60 | " | 220 | " "
" | 80 | " | 170 | " "
" | 100 | " | 140 | " "

DIVISION VI.
TANK SWITCHING ENGINES.

CLASS 15½ C.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 114.

CYLINDERS.

- Diameter of cylinders 15 inches.

- Length of stroke 22 inches.

DRIVING-WHEELS.

- Diameter of drivers 48 to 54 inches.

TRUCK.
TWO-WHEELED, WITH SWING BOLSTER AND RADIUS-BAR.

- Diameter of wheels 24 inches.

WHEEL-BASE.

- Total wheel-base 14 ft. 7½ inches.

- Rigid " 7 ft.

TANK.

- Capacity 700 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

On drivers | 50,000 | pounds.
On truck | 6,000 | "
| ——— |
Total weight of engine, about | | 56,000 | "

LOAD.
IN ADDITION TO WEIGHT OF ENGINE.

On a | level | | 1120 | gross tons.
" | 20 | ft. grade | 535 | " "
" | 40 | " | 345 | " "
" | 60 | " | 255 | " "
" | 80 | " | 195 | " "
" | 100 | " | 160 | " "

DIVISION VI.
TANK SWITCHING ENGINES.

CLASS 21 D.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 120.

CYLINDERS.

- Diameter of cylinders 15 inches.

- Length of stroke 22 inches.

DRIVING-WHEELS.

- Diameter of drivers 44 inches.

WHEEL-BASE.

- Total wheel-base 9 ft. 9 inches.

- Rigid " 9 ft. 9 inches.

TANK.

- Capacity 750 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

- Total weight of engine, about 60,000 pounds.

LOAD.
IN ADDITION TO WEIGHT OF ENGINE.

On a | level | | 1375 | gross tons.
" | 20 | ft. grade | 650 | " "
" | 40 | " | 420 | " "
" | 60 | " | 310 | " "
" | 80 | " | 240 | " "
" | 100 | " | 195 | " "

DIVISION VI.
TANK SWITCHING ENGINES.

CLASS 27½ D.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 120.

CYLINDERS.

- Diameter of cylinders 16 inches.

- Length of stroke 22 inches.

DRIVING-WHEELS.

- Diameter of drivers 44 to 48 inches.

WHEEL-BASE.

- Total wheel-base 10 feet.

- Rigid " 10 feet.

TANK.

- Capacity 900 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

- Total weight of engine, about 66,000 pounds.

LOAD.
IN ADDITION TO WEIGHT OF ENGINE.

On a | level | | 1470 | gross tons.
" | 20 | ft. grade | 700 | " "
" | 40 | " | 455 | " "
" | 60 | " | 335 | " "
" | 80 | " | 260 | " "
" | 100 | " | 210 | " "

DIVISION VII.
NARROW-GAUGE PASSENGER AND FREIGHT LOCOMOTIVES.

CLASS 8½ C.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 124.

CYLINDERS.

- Diameter of cylinders 9 inches.

- Length of stroke 16 inches.

DRIVING-WHEELS.

- Diameter of drivers 36 to 40 inches.

TRUCK.
TWO-WHEELED, WITH SWING BOLSTER AND RADIUS-BAR.

- Diameter of wheels 24 inches.

WHEEL-BASE.

- Total wheel-base 11 ft. 11½ inches.

- Rigid " 6 ft. 3 inches.

TENDER.
ON FOUR OR SIX WHEELS.

- Capacity of tank 500 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

On drivers | 20,000 | pounds.
On truck | 5,000 | "
| ——— |
Total weight of engine, about | | 25,000 | "

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 480 | gross tons.
" | 20 | ft. grade | 225 | " "
" | 40 | " | 140 | " "
" | 60 | " | 105 | " "
" | 80 | " | 75 | " "
" | 100 | " | 60 | " "

Engines of this class can be adapted to a gauge of 3 feet or upward.

DIVISION VII.
NARROW-GAUGE PASSENGER AND FREIGHT LOCOMOTIVES.

CLASS 9½ C.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 124.

CYLINDERS.

- Diameter of cylinders 10 inches.

- Length of stroke 16 inches.

DRIVING-WHEELS.

- Diameter of drivers 36 to 40 inches.

TRUCK.
TWO-WHEELED-WITH SWING BOLSTER AND RADIUS-BAR.

- Diameter of wheels 24 inches.

WHEEL-BASE.

- Total wheel-base 12 ft. 4½ inches.

- Rigid " 6 ft. 6 inches.

TENDER.
ON FOUR OR SIX WHEELS.

- Capacity of tank 600 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

On drivers | 25,000 | pounds.
On pony truck | 5,000 | "
| ——— |
Total weight of engine, about | | 30,000 | "

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 605 | gross tons.
" | 20 | ft. grade | 285 | " "
" | 40 | " | 175 | " "
" | 60 | " | 125 | " "
" | 80 | " | 95 | " "
" | 100 | " | 75 | " "

Engines of this class can be adapted to a gauge of 3 feet or upward.

DIVISION VIII.
NARROW-GAUGE FREIGHT LOCOMOTIVES.

CLASS 12 D.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 128.

CYLINDERS.

- Diameter of cylinders 11 inches.

- Length of stroke 16 inches.

DRIVING-WHEELS.

- Diameter of drivers 36 inches.

TRUCK.
TWO-WHEELED, WITH SWING BOLSTER AND RADIUS-BAR.

- Diameter of wheels 24 inches.

WHEEL-BASE.

- Total wheel-base 14 ft. 3 inches.

- Rigid " 8 ft. 7 inches.

TENDER.
ON FOUR OR SIX WHEELS.

- Capacity of tank 750 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

On drivers | 31,000 | pounds.
On truck | 4,000 | "
| ——— |
Total weight of engine, about | | 35,000 | "

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 730 | gross tons.
" | 20 | ft. grade | 340 | " "
" | 40 | " | 220 | " "
" | 60 | " | 160 | " "
" | 80 | " | 120 | " "
" | 100 | " | 100 | " "

Engines of this class can be adapted to a gauge of 3 feet or upward.

DIVISION VIII.
NARROW-GAUGE FREIGHT LOCOMOTIVES.

CLASS 14 D.
GENERAL DESIGN ILLUSTRATED BY PRINT ON PAGE 128.

CYLINDERS.

- Diameter of cylinders 12 inches.

- Length of stroke 16 inches.

DRIVING-WHEELS.

- Diameter of drivers 36 to 40 inches.

TRUCK.
TWO-WHEELED, WITH SWING BOLSTER AND RADIUS-BAR.

- Diameter of wheels 24 inches.

WHEEL-BASE.

- Total wheel-base 15 ft. 4 inches.

- Rigid " 9 ft. 4 inches.

TENDER.
ON FOUR OR SIX WHEELS.

- Capacity of tank 900 gallons.

WEIGHT OF ENGINE IN WORKING ORDER.

On drivers | 36,000 | pounds.
On truck | 4,000 | "
| ——— |
Total weight of engine, about | | 40,000 | "

LOAD.
IN ADDITION TO ENGINE AND TENDER.

On a | level | | 870 | gross tons.
" | 20 | ft. grade | 405 | " "
" | 40 | " | 255 | " "
" | 60 | " | 185 | " "
" | 80 | " | 140 | " "
" | 100 | " | 110 | " "

Engines of this class can be adapted to a gauge of 3 feet or upward.

GENERAL SPECIFICATION.

The following general specification of an ordinary freight or passenger locomotive is given to show principal features of construction.

BOILER.

Of the best Pennsylvania cold-blast charcoal iron, three-eighths inch thick, or of best homogeneous cast-steel, five-sixteenths inch thick; all horizontal seams and junction of waist and fire-box double-riveted. Boiler well and thoroughly stayed in all its parts, provided with cleaning holes, etc. Extra welt-pieces riveted to inside of side-sheets, providing double thickness of metal for studs of expansion braces. Iron sheets three-eighths inch thick riveted with three-fourths inch rivets, placed two inches from centre to centre. Steel sheets five-sixteenths inch thick riveted with five-eighths inch rivets, placed one and seven-eighths inches from centre to centre.

Waist made straight, with two domes, steam being taken from the forward dome; or with wagon-top and one dome.

Flues of iron, lap-welded, with copper ferrules on fire-box ends; or of seamless drawn copper or brass.

Fire-box of best homogeneous cast-steel; side- and back-sheets five-sixteenths inch thick; crown-sheet three-eighths inch thick; flue-sheet one-half inch thick. Water space three inches sides and back, four inches front. Stay bolts seven-eighths inch diameter, screwed and riveted to sheets, and not over four and one-half inches from centre to centre. Crown bars made of two pieces of wrought-iron four and one-half inches by five-eighths inch, set one and one-half inches above crown, bearing on side-sheets, placed not over four and one-half inches from centre to centre, and secured by bolts fitted to taper hole in crown-sheet, with head on under side of bolt, and nut on top bearing on crown bars. Crown stayed by braces to dome and outside shell of boiler. Fire-door opening formed by flanging and riveting together the inner and outer sheets. Blow-off cock in back or side of furnace operated from the footboard.

Grates of cast-iron, plain or rocking, for wood and soft coal; and of water tubes, for hard coal.

Ash-pan, with double dampers, operated from the footboard, for wood and soft coal; and with hopper with slide in bottom, for hard coal.

Smoke-stack of approved pattern suitable for the fuel.

CYLINDERS.

Placed horizontally; each cylinder cast in one piece with half-saddle; right and left hand cylinders reversible and interchangeable; accurately planed, fitted and bolted together in the most approved manner. Oil valves to cylinders placed in cab and connected to steam-chests by pipes running under jacket. Pipes proved to two hundred pounds pressure.

PISTONS.

Heads and followers of cast-iron, fitted with two brass rings babbited. Piston-rods of cold-rolled iron, fitted and keyed to pistons and crossheads.

GUIDES.

Of steel, or iron case-hardened, fitted to guide-yoke extending across, or secured to boiler and frames.

VALVE MOTION.

Most approved shifting link motion, graduated to cut off equally at all points of the stroke. Links made of the best hammered iron well case-hardened. Sliding block four and one-half inches long, with flanges seven inches long. Rock shafts of wrought-iron. Reverse shaft of wrought-iron, made with arms forged on.

THROTTLE-VALVE.

Balanced poppet throttle-valve of cast-iron, with double seats in vertical arm of dry-pipe.

DRIVING-WHEELS.

Centres of cast-iron, with hollow spokes and rims.

Tires of cast-steel, shrunk on wheel-centres. Flanged tires five and one-half inches wide and two and three-eighths inches thick when finished. Plain tires six inches wide and two and three-eighths inches thick when finished.

Axles of hammered iron.

Wrist-pins of cast-steel, or iron case-hardened. Springs of best quality of cast-steel.

Connecting-Rods of best hammered iron, furnished with all necessary straps, keys, and brasses, well fitted and finished. Equalizing Beams of most approved arrangement, with steel bearings. Driving-boxes of cast-iron with brass bearings babbited.

FRAMES.

Of hammered iron, forged solid, or with pedestals separate and bolted and keyed to place. Pedestals cased with cast-iron gibs and wedges to prevent wear by boxes. Braces bolted between pedestals, or welded in.

FEED WATER.

Supplied by one injector and one pump, or two brass pumps, with valves and cages of best hard metal accurately fitted. Plunger of hollow iron. Cock in feed-pipe regulated from footboard.

ENGINE TRUCK.

Square wrought-iron frame, with centre-bearing swing bolster.

Wheels of best spoke or plate pattern.

Axles of best hammered iron, with inside journals.

Springs of cast-steel, connected by equalizing beams.

HOUSE.

Of good pattern, substantially built of hard wood, fitted together with joint-bolts. Roof finished to carlines in strips of ash and walnut. Backboards with windows to raise and lower.

PILOT.

Of wood or iron.

FURNITURE.

Engine furnished with sand-box, alarm and signal bells, whistle, two safety-valves, steam and water gauges, heater and gauge cocks, oil-cans, etc. Also a complete set of tools, consisting of two jack-screws, pinch-bar, monkey, packing, and flat wrenches, hammer, chisels, etc.

FINISH.

Cylinders lagged with wood and cased with brass, or iron painted. Heads of cast-iron polished, or of cast-brass.

Steam-chests with cast-iron tops; bodies cased with brass, or iron painted.

Domes lagged with wood, with brass or iron casing on bodies, and cast-iron top and bottom rings.

Boiler lagged with wood and jacketed with Russia iron secured by brass bands polished.

GENERAL FEATURES OF CONSTRUCTION.

All principal parts of engine accurately fitted to gauges and thoroughly interchangeable. All movable bolts and nuts and all wearing surfaces made of steel or iron case-hardened. All wearing brasses made of ingot copper and tin, alloyed in the proportion of seven parts of the former to one of the latter. All bolts and threads to U. S. standard.

TENDER.

On two four-wheeled trucks. Wheels of best plate pattern, thirty inches in diameter. Truck frames of square wrought-iron with equalizers between springs, or of bar-iron with wooden bolsters. Axles of best hammered iron. Oil-tight boxes with brass bearings. Tank put together with angle iron corners and strongly braced. Top and bottom plates of No. 6 iron; side plates of No. 8 iron. Tender frame of wood or iron.

PAINTING.

Engine and tender to be well painted and varnished.

*** END OF THE PROJECT GUTENBERG EBOOK ILLUSTRATED CATALOGUE OF LOCOMOTIVES; BALDWIN LOCOMOTIVE WORKS ***

Updated editions will replace the previous one—the old editions will be renamed.

Creating the works from print editions not protected by U.S. copyright law means that no one owns a United States copyright in these works, so the Foundation (and you!) can copy and distribute it in the United States without permission and without paying copyright royalties. Special rules, set forth in the General Terms of Use part of this license, apply to copying and distributing Project Gutenberg™ electronic works to protect the PROJECT GUTENBERG™ concept and trademark. Project Gutenberg is a registered trademark, and may not be used if you charge for an eBook, except by following the terms of the trademark license, including paying royalties for use of the Project Gutenberg trademark. If you do not charge anything for copies of this eBook, complying with the trademark license is very easy. You may use this eBook for nearly any purpose such as creation of derivative works, reports, performances and research. Project Gutenberg eBooks may be modified and printed and given away—you may do practically ANYTHING in the United States with eBooks not protected by U.S. copyright law. Redistribution is subject to the trademark license, especially commercial redistribution.

START: FULL LICENSE

THE FULL PROJECT GUTENBERG LICENSE

PLEASE READ THIS BEFORE YOU DISTRIBUTE OR USE THIS WORK

To protect the Project Gutenberg™ mission of promoting the free distribution of electronic works, by using or distributing this work (or any other work associated in any way with the phrase “Project Gutenberg”), you agree to comply with all the terms of the Full Project Gutenberg™ License available with this file or online at www.gutenberg.org/license.

Section 1. General Terms of Use and Redistributing Project Gutenberg™ electronic works

1.A. By reading or using any part of this Project Gutenberg™ electronic work, you indicate that you have read, understand, agree to and accept all the terms of this license and intellectual property (trademark/copyright) agreement. If you do not agree to abide by all the terms of this agreement, you must cease using and return or destroy all copies of Project Gutenberg™ electronic works in your possession. If you paid a fee for obtaining a copy of or access to a Project Gutenberg™ electronic work and you do not agree to be bound by the terms of this agreement, you may obtain a refund from the person or entity to whom you paid the fee as set forth in paragraph 1.E.8.

1.B. “Project Gutenberg” is a registered trademark. It may only be used on or associated in any way with an electronic work by people who agree to be bound by the terms of this agreement. There are a few things that you can do with most Project Gutenberg™ electronic works even without complying with the full terms of this agreement. See paragraph 1.C below. There are a lot of things you can do with Project Gutenberg™ electronic works if you follow the terms of this agreement and help preserve free future access to Project Gutenberg™ electronic works. See paragraph 1.E below.

1.C. The Project Gutenberg Literary Archive Foundation (“the Foundation” or PGLAF), owns a compilation copyright in the collection of Project Gutenberg™ electronic works. Nearly all the individual works in the collection are in the public domain in the United States. If an individual work is unprotected by copyright law in the United States and you are located in the United States, we do not claim a right to prevent you from copying, distributing, performing, displaying or creating derivative works based on the work as long as all references to Project Gutenberg are removed. Of course, we hope that you will support the Project Gutenberg™ mission of promoting free access to electronic works by freely sharing Project Gutenberg™ works in compliance with the terms of this agreement for keeping the Project Gutenberg™ name associated with the work. You can easily comply with the terms of this agreement by keeping this work in the same format with its attached full Project Gutenberg™ License when you share it without charge with others.

1.D. The copyright laws of the place where you are located also govern what you can do with this work. Copyright laws in most countries are in a constant state of change. If you are outside the United States, check the laws of your country in addition to the terms of this agreement before downloading, copying, displaying, performing, distributing or creating derivative works based on this work or any other Project Gutenberg™ work. The Foundation makes no representations concerning the copyright status of any work in any country other than the United States.

1.E. Unless you have removed all references to Project Gutenberg:

1.E.1. The following sentence, with active links to, or other immediate access to, the full Project Gutenberg™ License must appear prominently whenever any copy of a Project Gutenberg™ work (any work on which the phrase “Project Gutenberg” appears, or with which the phrase “Project Gutenberg” is associated) is accessed, displayed, performed, viewed, copied or distributed:

This eBook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this eBook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

1.E.2. If an individual Project Gutenberg™ electronic work is derived from texts not protected by U.S. copyright law (does not contain a notice indicating that it is posted with permission of the copyright holder), the work can be copied and distributed to anyone in the United States without paying any fees or charges. If you are redistributing or providing access to a work with the phrase “Project Gutenberg” associated with or appearing on the work, you must comply either with the requirements of paragraphs 1.E.1 through 1.E.7 or obtain permission for the use of the work and the Project Gutenberg™ trademark as set forth in paragraphs 1.E.8 or 1.E.9.

1.E.3. If an individual Project Gutenberg™ electronic work is posted with the permission of the copyright holder, your use and distribution must comply with both paragraphs 1.E.1 through 1.E.7 and any additional terms imposed by the copyright holder. Additional terms will be linked to the Project Gutenberg™ License for all works posted with the permission of the copyright holder found at the beginning of this work.

1.E.4. Do not unlink or detach or remove the full Project Gutenberg™ License terms from this work, or any files containing a part of this work or any other work associated with Project Gutenberg™.

1.E.5. Do not copy, display, perform, distribute or redistribute this electronic work, or any part of this electronic work, without prominently displaying the sentence set forth in paragraph 1.E.1 with active links or immediate access to the full terms of the Project Gutenberg™ License.

1.E.6. You may convert to and distribute this work in any binary, compressed, marked up, nonproprietary or proprietary form, including any word processing or hypertext form. However, if you provide access to or distribute copies of a Project Gutenberg™ work in a format other than “Plain Vanilla ASCII” or other format used in the official version posted on the official Project Gutenberg™ website (www.gutenberg.org), you must, at no additional cost, fee or expense to the user, provide a copy, a means of exporting a copy, or a means of obtaining a copy upon request, of the work in its original “Plain Vanilla ASCII” or other form. Any alternate format must include the full Project Gutenberg™ License as specified in paragraph 1.E.1.

1.E.7. Do not charge a fee for access to, viewing, displaying, performing, copying or distributing any Project Gutenberg™ works unless you comply with paragraph 1.E.8 or 1.E.9.

1.E.8. You may charge a reasonable fee for copies of or providing access to or distributing Project Gutenberg™ electronic works provided that:

- • You pay a royalty fee of 20% of the gross profits you derive from the use of Project Gutenberg™ works calculated using the method you already use to calculate your applicable taxes. The fee is owed to the owner of the Project Gutenberg™ trademark, but he has agreed to donate royalties under this paragraph to the Project Gutenberg Literary Archive Foundation. Royalty payments must be paid within 60 days following each date on which you prepare (or are legally required to prepare) your periodic tax returns. Royalty payments should be clearly marked as such and sent to the Project Gutenberg Literary Archive Foundation at the address specified in Section 4, “Information about donations to the Project Gutenberg Literary Archive Foundation.”

- • You provide a full refund of any money paid by a user who notifies you in writing (or by e-mail) within 30 days of receipt that s/he does not agree to the terms of the full Project Gutenberg™ License. You must require such a user to return or destroy all copies of the works possessed in a physical medium and discontinue all use of and all access to other copies of Project Gutenberg™ works.

- • You provide, in accordance with paragraph 1.F.3, a full refund of any money paid for a work or a replacement copy, if a defect in the electronic work is discovered and reported to you within 90 days of receipt of the work.

- • You comply with all other terms of this agreement for free distribution of Project Gutenberg™ works.

1.E.9. If you wish to charge a fee or distribute a Project Gutenberg™ electronic work or group of works on different terms than are set forth in this agreement, you must obtain permission in writing from the Project Gutenberg Literary Archive Foundation, the manager of the Project Gutenberg™ trademark. Contact the Foundation as set forth in Section 3 below.

1.F.

1.F.1. Project Gutenberg volunteers and employees expend considerable effort to identify, do copyright research on, transcribe and proofread works not protected by U.S. copyright law in creating the Project Gutenberg™ collection. Despite these efforts, Project Gutenberg™ electronic works, and the medium on which they may be stored, may contain “Defects,” such as, but not limited to, incomplete, inaccurate or corrupt data, transcription errors, a copyright or other intellectual property infringement, a defective or damaged disk or other medium, a computer virus, or computer codes that damage or cannot be read by your equipment.

1.F.2. LIMITED WARRANTY, DISCLAIMER OF DAMAGES - Except for the “Right of Replacement or Refund” described in paragraph 1.F.3, the Project Gutenberg Literary Archive Foundation, the owner of the Project Gutenberg™ trademark, and any other party distributing a Project Gutenberg™ electronic work under this agreement, disclaim all liability to you for damages, costs and expenses, including legal fees. YOU AGREE THAT YOU HAVE NO REMEDIES FOR NEGLIGENCE, STRICT LIABILITY, BREACH OF WARRANTY OR BREACH OF CONTRACT EXCEPT THOSE PROVIDED IN PARAGRAPH 1.F.3. YOU AGREE THAT THE FOUNDATION, THE TRADEMARK OWNER, AND ANY DISTRIBUTOR UNDER THIS AGREEMENT WILL NOT BE LIABLE TO YOU FOR ACTUAL, DIRECT, INDIRECT, CONSEQUENTIAL, PUNITIVE OR INCIDENTAL DAMAGES EVEN IF YOU GIVE NOTICE OF THE POSSIBILITY OF SUCH DAMAGE.

1.F.3. LIMITED RIGHT OF REPLACEMENT OR REFUND - If you discover a defect in this electronic work within 90 days of receiving it, you can receive a refund of the money (if any) you paid for it by sending a written explanation to the person you received the work from. If you received the work on a physical medium, you must return the medium with your written explanation. The person or entity that provided you with the defective work may elect to provide a replacement copy in lieu of a refund. If you received the work electronically, the person or entity providing it to you may choose to give you a second opportunity to receive the work electronically in lieu of a refund. If the second copy is also defective, you may demand a refund in writing without further opportunities to fix the problem.

1.F.4. Except for the limited right of replacement or refund set forth in paragraph 1.F.3, this work is provided to you ‘AS-IS’, WITH NO OTHER WARRANTIES OF ANY KIND, EXPRESS OR IMPLIED, INCLUDING BUT NOT LIMITED TO WARRANTIES OF MERCHANTABILITY OR FITNESS FOR ANY PURPOSE.

1.F.5. Some states do not allow disclaimers of certain implied warranties or the exclusion or limitation of certain types of damages. If any disclaimer or limitation set forth in this agreement violates the law of the state applicable to this agreement, the agreement shall be interpreted to make the maximum disclaimer or limitation permitted by the applicable state law. The invalidity or unenforceability of any provision of this agreement shall not void the remaining provisions.

1.F.6. INDEMNITY - You agree to indemnify and hold the Foundation, the trademark owner, any agent or employee of the Foundation, anyone providing copies of Project Gutenberg™ electronic works in accordance with this agreement, and any volunteers associated with the production, promotion and distribution of Project Gutenberg™ electronic works, harmless from all liability, costs and expenses, including legal fees, that arise directly or indirectly from any of the following which you do or cause to occur: (a) distribution of this or any Project Gutenberg™ work, (b) alteration, modification, or additions or deletions to any Project Gutenberg™ work, and (c) any Defect you cause.

Section 2. Information about the Mission of Project Gutenberg™

Project Gutenberg™ is synonymous with the free distribution of electronic works in formats readable by the widest variety of computers including obsolete, old, middle-aged and new computers. It exists because of the efforts of hundreds of volunteers and donations from people in all walks of life.

Volunteers and financial support to provide volunteers with the assistance they need are critical to reaching Project Gutenberg™’s goals and ensuring that the Project Gutenberg™ collection will remain freely available for generations to come. In 2001, the Project Gutenberg Literary Archive Foundation was created to provide a secure and permanent future for Project Gutenberg™ and future generations. To learn more about the Project Gutenberg Literary Archive Foundation and how your efforts and donations can help, see Sections 3 and 4 and the Foundation information page at www.gutenberg.org.

Section 3. Information about the Project Gutenberg Literary Archive Foundation

The Project Gutenberg Literary Archive Foundation is a non-profit 501(c)(3) educational corporation organized under the laws of the state of Mississippi and granted tax exempt status by the Internal Revenue Service. The Foundation’s EIN or federal tax identification number is 64-6221541. Contributions to the Project Gutenberg Literary Archive Foundation are tax deductible to the full extent permitted by U.S. federal laws and your state’s laws.

The Foundation’s business office is located at 809 North 1500 West, Salt Lake City, UT 84116, (801) 596-1887. Email contact links and up to date contact information can be found at the Foundation’s website and official page at www.gutenberg.org/contact

Section 4. Information about Donations to the Project Gutenberg Literary Archive Foundation

Project Gutenberg™ depends upon and cannot survive without widespread public support and donations to carry out its mission of increasing the number of public domain and licensed works that can be freely distributed in machine-readable form accessible by the widest array of equipment including outdated equipment. Many small donations ($1 to $5,000) are particularly important to maintaining tax exempt status with the IRS.

The Foundation is committed to complying with the laws regulating charities and charitable donations in all 50 states of the United States. Compliance requirements are not uniform and it takes a considerable effort, much paperwork and many fees to meet and keep up with these requirements. We do not solicit donations in locations where we have not received written confirmation of compliance. To SEND DONATIONS or determine the status of compliance for any particular state visit www.gutenberg.org/donate.

While we cannot and do not solicit contributions from states where we have not met the solicitation requirements, we know of no prohibition against accepting unsolicited donations from donors in such states who approach us with offers to donate.

International donations are gratefully accepted, but we cannot make any statements concerning tax treatment of donations received from outside the United States. U.S. laws alone swamp our small staff.

Please check the Project Gutenberg web pages for current donation methods and addresses. Donations are accepted in a number of other ways including checks, online payments and credit card donations. To donate, please visit: www.gutenberg.org/donate.

Section 5. General Information About Project Gutenberg™ electronic works

Professor Michael S. Hart was the originator of the Project Gutenberg™ concept of a library of electronic works that could be freely shared with anyone. For forty years, he produced and distributed Project Gutenberg™ eBooks with only a loose network of volunteer support.

Project Gutenberg™ eBooks are often created from several printed editions, all of which are confirmed as not protected by copyright in the U.S. unless a copyright notice is included. Thus, we do not necessarily keep eBooks in compliance with any particular paper edition.

Most people start at our website which has the main PG search facility: www.gutenberg.org.

This website includes information about Project Gutenberg™, including how to make donations to the Project Gutenberg Literary Archive Foundation, how to help produce our new eBooks, and how to subscribe to our email newsletter to hear about new eBooks.

Table of Contents

ILLUSTRATED CATALOGUE OF LOCOMOTIVES.

SKETCH OF THE BALDWIN LOCOMOTIVE WORKS.

CIRCULAR.

EXPLANATION OF TERMS.

GENERAL CLASSIFICATION.

PREFATORY.

DIVISION I. ROAD LOCOMOTIVES FOR PASSENGER OR FREIGHT SERVICE.

DIVISION I. ROAD LOCOMOTIVES FOR PASSENGER OR FREIGHT SERVICE.

DIVISION I. ROAD LOCOMOTIVES FOR PASSENGER OR FREIGHT SERVICE.

DIVISION I. ROAD LOCOMOTIVES FOR PASSENGER OR FREIGHT SERVICE.

DIVISION I. ROAD LOCOMOTIVES FOR PASSENGER OR FREIGHT SERVICE.

DIVISION I. ROAD LOCOMOTIVES FOR PASSENGER OR FREIGHT SERVICE.

DIVISION I. ROAD LOCOMOTIVES FOR PASSENGER OR FREIGHT SERVICE.

ADDENDA.

- ADAPTATION FOR EITHER PASSENGER OR FREIGHT SERVICE.

- ANTHRACITE COAL BURNERS.

- STRAIGHT AND WAGON-TOP BOILERS.

DIVISION II. TEN-WHEELED FREIGHT LOCOMOTIVES.

DIVISION II. TEN-WHEELED FREIGHT LOCOMOTIVES.

DIVISION II. TEN-WHEELED FREIGHT LOCOMOTIVES.

ADDENDA.

- HARD AND SOFT COAL BURNERS

- CURVING.

- STRAIGHT AND WAGON-TOP BOILERS.

DIVISION III. FREIGHT OR PUSHING ENGINES.—"MOGUL" PATTERN.

DIVISION III. FREIGHT OR PUSHING ENGINES—"MOGUL" PATTERN.

DIVISION III. FREIGHT OR PUSHING ENGINES—"MOGUL" PATTERN.

ADDENDA.

- ANTHRACITE COAL BURNERS.

- CURVING.

- TRACTIVE POWER.

- STRAIGHT AND WAGON-TOP BOILERS.

DIVISION IV. FREIGHT OR PUSHING ENGINES.—"CONSOLIDATION" PATTERN.

ADDENDA.

- GENERAL DESIGN.

- WHEEL-BASE.

- TRACTIVE POWER.

DIVISION V. SWITCHING ENGINES WITH SEPARATE TENDERS.

DIVISION V. SWITCHING ENGINES WITH SEPARATE TENDERS.

DIVISION V. SWITCHING ENGINES WITH SEPARATE TENDERS.

DIVISION V. SWITCHING ENGINES WITH SEPARATE TENDERS.

DIVISION V. SWITCHING ENGINES WITH SEPARATE TENDERS.

DIVISION V. SWITCHING ENGINES WITH SEPARATE TENDERS.

DIVISION V. SWITCHING ENGINES WITH SEPARATE TENDERS.

DIVISION V. SWITCHING ENGINES WITH SEPARATE TENDERS.

DIVISION V. SWITCHING ENGINES WITH SEPARATE TENDERS.

DIVISION V. SWITCHING ENGINES WITH SEPARATE TENDERS.

DIVISION V. SWITCHING ENGINES WITH SEPARATE TENDERS.

DIVISION V. SWITCHING ENGINES WITH SEPARATE TENDERS.

DIVISION VI. TANK SWITCHING ENGINES.

DIVISION VI. TANK SWITCHING ENGINES.

DIVISION VI. TANK SWITCHING ENGINES.

DIVISION VI. TANK SWITCHING ENGINES.

DIVISION VI. TANK SWITCHING ENGINES.

DIVISION VI. TANK SWITCHING ENGINES.

DIVISION VI. TANK SWITCHING ENGINES.

DIVISION VI. TANK SWITCHING ENGINES.

DIVISION VI. TANK SWITCHING ENGINES.

DIVISION VI. TANK SWITCHING ENGINES.

DIVISION VII. NARROW-GAUGE PASSENGER AND FREIGHT LOCOMOTIVES.

DIVISION VII. NARROW-GAUGE PASSENGER AND FREIGHT LOCOMOTIVES.

DIVISION VIII. NARROW-GAUGE FREIGHT LOCOMOTIVES.

DIVISION VIII. NARROW-GAUGE FREIGHT LOCOMOTIVES.

GENERAL SPECIFICATION.

- BOILER.

- CYLINDERS.

- PISTONS.

- GUIDES.

- VALVE MOTION.

- THROTTLE-VALVE.

- DRIVING-WHEELS.

- FRAMES.

- FEED WATER.

- ENGINE TRUCK.

- HOUSE.

- PILOT.

- FURNITURE.

- FINISH.

- GENERAL FEATURES OF CONSTRUCTION.

- TENDER.

- PAINTING.

THE FULL PROJECT GUTENBERG LICENSE