A Description of a New-Invented Stove-Grate / Shewing Its Uses and Advantages Over All Others, Both in Point of Expence, and Every Purpose of a Chamber Fire
Date: 2020-12-18T00:00:00+00:00
Keywords: Furnaces; Heating; Stoves

The Project Gutenberg eBook of A Description of a New-Invented Stove-Grate

This ebook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this ebook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

Title: A Description of a New-Invented Stove-Grate

Author: J. Durno

Release date: December 18, 2020 [eBook #64077]

Language: English

Credits: Produced by Charlene Taylor, Craig Kirkwood, and the Online
Distributed Proofreading Team at https://www.pgdp.net (This
file was produced from images generously made available
by The Internet Archive)

*** START OF THE PROJECT GUTENBERG EBOOK A DESCRIPTION OF A NEW-INVENTED STOVE-GRATE ***

A
DESCRIPTION
Of a New-Invented
Stove-Grate,

SHEWING ITS
Uses and Advantages
OVER ALL OTHERS;
Both in Point of Expence, and every
Purpose of a ChamberFire.

LONDON:
Printed by J. Towers in Piccadilly;

And published by the Inventor, J. Durno,
and sold by him at his House in Jermyn-Street;
R. Davis, the Corner of Sackville-Street,
Piccadilly; and M. Cooper in
Paternoster-Row. 1753.

[Price Six-pence.]

A
DESCRIPTION
Of a New-Invented
Stove-Grate.

The State of the Weather in this Island is so extremely variable and uncertain, that the Inhabitants are obliged to keep Fires to sit by near Eight Months in the Year.

And ever since the Duty laid upon Coals, the Article of Fire has been so very expensive in many Parts of the Kingdom, particularly in this Metropolis, that it is to be hoped, any Attempt to make our Rooms more warm and comfortable, and that at a much less Expence than usual; always free from Smoke, and equally chearful as with the common Fires; will meet with the Favour of the Publick.

These are some of the Advantages proposed by a new-invented Stove-Grate, the Description and Uses whereof are contained in the following Sheets.

And surely, if ever any Invention, discovered by a Mechanick, deserved the Attention of the Publick, this may justly lay claim to it; since not only every Family, but every Individual, is in some degree interested in it; and more especially as it is not offered as uncertain Theory, but its Uses and Advantages, over all others, have been confirmed by Trial and Experience: For one of the smallest Size of these Stove-Grates has been set up, ever since the beginning of last Winter, in a common Room at the Inventor’s House, where several curious and ingenious Persons have been to see and observe the Effects of it; and it has appeared to the Satisfaction of the best Judges, that this same Room, built of common Quartering, and covered with Laths and Plaister,

| Feet. | Inches.
Long | 26 | : | 6 | : | 0
Broad | 13 | : | 0 | : | 0
High | 10 | : | 6 | : | 0

with a Pair of large folding Doors at one End, and a Door opening to the Stair Case at the other End, in which four or five Pecks of Coals had usually been consumed every Day in a common Grate and Chimney, has been kept warm, ever since the New Stove was erected, with no greater Quantity than one Peck of Coals a Day; and with this singular Advantage, that the Warmth is diffused, more regularly and uniformly, over the whole Room, than it was before.

Those who will take the Trouble of calling, will be able to form a more distinct Idea of the Construction and Use of this Machine, than can be conveyed by Writing: But as many People have neither the Curiosity or Opportunity for occular Inspection, I shall give a particular Description of it, as well as of all the other Machines, that have been contrived for the like Purposes; and it will appear, by a fair and impartial Comparison, that this is attended with greater Advantages, and fewer Inconveniences, than any that has ever yet been offered to the Publick.

But, for the better understanding of what follows, it will be necessary to explain some of the Properties of Air and Fire.

The chief Properties of Air, are Fluidity, Gravity, and Elasticity.

First, The Air is a Fluid, consisting of Parts which have not any sensible Attraction or Cohesion betwixt themselves; but of such a Shape or Form, as to glide one over another, and yield to the slightest Impression: Of this we need no other Proof, than the Ease and Freedom with which Animals breathe this Element, and pass through it, without any sensible Resistance.

Secondly, That the Air does gravitate, or act upon inferior Bodies by its Weight, is demonstrable by a great many Experiments, and particularly the Barometer, which by the rising and falling of the Mercury, shews the greater or lesser Weight of the Column of Air incumbent upon it.

Thirdly, Nor is the Elasticity of the Air less demonstrable than either its Fluidity or Gravity.

Air is an elastick Body, for if it be confined or compressed within a less Space than its natural State requires, it will, the Moment the Restraint is removed, dilate and expand itself so as to fill the same Space as before; and that too with such Force, as to break in Pieces the Glass or Earthen Vessel that contained it; as may be seen by the common Experiment of a Bottle full of common Air, strongly cork’d, and put under the Receiver on the Air-Pump, when the Air surrounding the Bottle is pump’d out. But what is particularly remarkable with reference to the Subject we are treating of, is, That Air is rarified by Heat, and condensed by Cold; First, Air rarified and expanded by Heat, becomes specifically lighter than it was before, and will ascend in Air of greater Density: As Matter specifically lighter than Water, Cork for Instance, if placed at the bottom of an empty Vessel, will, if Water be poured into the Vessel, ascend above the Surface of the Water; so rarified Air will rise in common Air till it comes to Air of equal Weight, or is by Cold reduced to its former Density.

For the same Reason, if a Fire be kindled in an open Place, the Heat thereof will rarify the next circumambient Air; and that which is more remote being heavier, will press every where, and in all Directions, upon the Air that is rarified, and drive it to the Fire; the Flame and Sparks whereof will, together with the rarified Air, ascend in a conic Form, like the Flame of a Candle, in a trembling Motion, as it is more or less acted upon by the Pressure of the cold Air: And the Reason why the Flame is more contracted at the Top than Bottom, is, that the Heat at Top being less intense, the next adjacent Air is less rarified, and the gross Air confines it more.

Therefore, when a Fire is lighted in a Chimney, the Heat rarifies the Air over and next the Fire, and makes it rise in the Funnel, and the common Air in the Room immediately supplies its Place, is rarified in its turn, and rises also.

This Motion being thus generated, is continued by small Inlets of Air, through the Doors and Windows of the Room; and the larger the Fire, the greater will be the current of Air through their Crevices. If the Doors and Windows are so well fitted in their Frames, that all the Inlets together cannot supply so much Air as is wanted to carry off the Smoke, it will then hang about the Fire, gradually diminish, and at length totally extinguish it.

Various are the Improvements that have been made in the Construction of Chimneys, to increase the Degree of Heat, to prevent Smoke, and to save in the Article of Fuel.

And notwithstanding the many Attempts to remedy the Defects in one or other of these Respects, the same have hitherto come short of the End proposed. Take the Article of Smoke for Instance: No Builder of Character will pretend to insure all the Rooms in a new-built House from smoking, appears from this, that they generally at first finish the Chimney Tops with what they call Roundings, and if, upon Trial, those do not answer, they either Hovel, or fix Earthen Pots, like a hollow Cylinder, or plant Tin Tubes on the Tops, not much unlike Organ-Pipes inverted; all which Methods, not only spoil the Symmetry of the Building, but what is still worse, they often leave the Chimnies as Smoky as they were at first, after a considerable Sum has been spent on a Cure.

In order to remedy all, or some of the Inconveniences already mentioned, a great Variety of Chimnies, Stove-Grates, and Close-Stoves have been invented. I shall describe some of the principal ones that have fallen under my Observation; and shall endeavour, as I go along, to point out their Advantages and Defects.

First, Mons. Gauger has described seven sorts of Chimnies, which, however, all agree in general as to the Construction and Disposition of the principal Parts.

His Manner of Performance is by Plates of Iron, Copper, and Brass, placed in the Chimney, after its being prepared to receive them, at four Inches from the Back, Jambs, and Hearth, with a Communication to the external Air; which first entered under the Hearth-Plate, and made several Turnings and Windings, through Partitions between the inside of the Chimney, and those Plates representing, as it were, a re-curved Canal; one End whereof joins the outward Air, and the other comes out of the Top of one of the Jambs of the Chimney. The Use and Intent of these Chimnies is only for burning of Wood, the Heat whereof is more diffused than that of Turf or Peat.

The Invention was extremely ingenious, the Room was warmed, in all its Parts, with great Equality; cold Air was prevented rushing through Crevices; the Funnel was supplied by a Trap-Door, or Bellows, upon the Hearth-Plate; and much less Wood served to make a Fire: but the Expence was found to be so great, especially in old Chimnies, that they never came into much use, and are now entirely laid aside: The upright Heat was likewise all lost in all those Chimnies.

Secondly, the ingenious Dr. Desaguliers gives the Construction of two kinds of Chimnies; one for burning Turf and Peat upon the Hearth, and the other for Sea-Coal in a Stove-Grate, made in a particular Manner.

In the Description of the First, he says, That in Chimnies where Wood is burnt the Cavities behind the Back and Sides, after the Manner that the French Author directs, are very useful; but where you have the Heat very strong, it will be proper to make the Cavities as near the Fire as possible; and tho’ the Course of the Air will be shorter, yet the great Heat it acquires in that Case will make Amends for the Shortness of the Passage.

The Shape and Manner of the Chimney is the same as directed by Mons. Gauger, with this difference, that the Doctor’s has no Cavity under the Hearth; only a divided Box made of Plate-Iron, upon which the Fire is placed, and an horizontal Cavity behind the Back, faced with Plate-Iron; so low, that the Fire lies against it: Through this Preparation comes a Stream of external Air, in several Turnings and Windings, and from thence is carried up a Passage within the Brick-Work in one of the Corners, as high as the Mantle-Piece; from the Corner it is brought forward to the under side of the Mantle-Piece, where it makes several Turnings in a Tin Canal, from which it is at last convey’d into the Room.

He likewise recommends the Trap-Bellows in this Construction of Stoves.

The Construction of the Second Sort consists of a Grate of a particular Make, with a Box of Plate-Iron behind the Back, that has only three Cavities; one End communicates with the outward Air to bring it through those Cavities, obliquely, to the Corner in the Brick-Work; from thence it is brought forward in the upper part of the Jamb, quite into the Tin Canal, behind the Mantle-Piece, as in the last Construction; but the same Inconvenience attends both these sort of Chimnies, that the upright Heat, which is at least three-fourths of what proceeds from the Fire, is almost wholly lost; as it is in all the open Fire-Places.

Thirdly, the Dutch and German Stoves, which are very different.

The Dutch Stove has a Flue proceeding from the Top, which is sometimes bent downwards, and then goes into the Chimney, through a false Back, at about four Inches from the true Back: That Space has a Communication with the Funnel, and all the other Parts of the Chimney are wholly closed up.

And there are others which have the Flue straight upward, that goes into the Chimney, and all the Funnel closed up round the Flue of the Stove. The First Sort, in my Opinion, is the best; for there is not so much of the upright Heat lost as in this, and the Chimney cannot so readily smoke; because the Space between the false Back and the true Back obstruct, in some degree, the Passage of the Air down the Chimney. Both these sorts have a small Iron Door into the Room, which in some degree changes the Air as it flows to that Opening; part of which goes off with the Smoke, and its Place is supplied by the entering Air from Doors, Windows, and Crevices. But as there is so small a Change of Air, the Room will soon be warm, the Chimney being wholly closed up; very little Air is required to supply the small Door of the Stove, and that only can enter at the Door or Windows of the Room: Little Fuel serves, for almost all the Heat is saved. This small change of Air makes these Stoves wholesomer, or at least pleasanter, than the German Stoves, but there is little sight of the Fire; and no other Use can be made of it but to warm the Room: And if any ill Smell should happen in the Room, it is not easily carried off, by Reason of the slow change of Air at the little Iron Door; and the Room is always somewhat suffocating, especially to those who are not accustomed to it.

The German Stove is not unlike a Chest for Cloaths set upon one End, and is fixed into the Wall, with the Top turned outwards, or into another Room, which open and shut as there is occasion for making and mending the Fire: it warms a Room all over in a very little Time, with little Fuel to make a Fire; no fresh Air can enter the Room if the Door be left open, no more than it would in an open Oven, because there is not the least Discharge of Air in the Room. But there is not any Appearance of Fire to be seen in these Stoves, and they who used them were obliged to breathe the same unchanged elemental Air, mixed with that inspired by all the Company.

Fourthly, the Chimney, in the House of Lords, which was designed by way of an Improvement upon the Sieur Gauger’s Chimnies.

For First, the outward Air, from below the House, in the Passage, enters under the Iron Plate, (commonly called the Hearth-Plate) which is prepared to receive it into a re-curved Canal, and from thence passes up the back Plate of Iron, in the like Turnings and Windings, near to the Top, where it is divided, and enters into two Tubes of Copper, one placed on each side of the Funnel, of a sufficient Length to appear above the Cornish; there they are joined to other Conveyances; one of which is carried round the Throne, and ends over-against the Fire; and the other Conveyance is continued to the Window, above the Cornish, made of Tin, in form of a right-angled Triangle, and is perforated to let out the Air. There is likewise a Valve in each of these Copper Pipes or Tubes, placed at a considerable distance from the Fire, to open and shut at pleasure, by a Thumb-Latch, which being shut, imprisons the Air in its Passage upwards, until it be hot, and when opened, discharges this warmed Air near the Cieling, through those perforated Conveyances.

According to the Construction of this Fire-Place, it is next to an Impossibility to warm that House with the greatest Fire that can be made in it: For all the upright Heat is lost, occasioned by the continual Current of Air coming in at the Doors and Crevices, which forcibly drives almost all the Heat up the Chimney.

Secondly, The Streams of cold Air which enters under the Hearth and Back Plates, (where a large Stove-Grate stands) in its various Turnings and Windings, behind these Plates, and through those Tubes, is but very little warmed in its Passage above the Fire in the Conveyances to the Cieling; and it cannot receive any Heat from the Hearth-Plate, unless the Fire was made upon it, as mentioned before; for the bottom Bars of the Stove-Grate are at so great a distance from the Iron Hearth-Plate, that the Fire, with its downward Heat, cannot reach it; and not above Eight superficial Feet of the Back-Plate is warmed by the Fire, and considering the distance from the hot part, to where the warm Air is discharged into the House, nothing is clearer, than that it cannot receive any considerable degree of Heat, in its Passage through the Copper Pipes, that convey it to the Cieling; and where it is suspended, and mixes slowly and imperceptibly with the colder Air in the lower part of the House, so that little or no Warmth can be obtained by this Conveyance.

Thirdly, From hence it appears, that it would have been of much greater Use to have discharged the hot Air immediately from the hot Iron Back-Plate into the Room; its Effects in that Case would have been sensibly felt, and it would then have ascended naturally, without the help of Pipes, and warmed the circumambient Air as was intended; and likewise would have supported the Fire, without the Assistance of any Air from the Doors and Crevices.

Fifthly, Stoves, placed at the End of long Rooms, Coffee-Houses, and Tradesmen’s Shops, warm the Room in a little Time; but the Smoke and upright Heat are both conveyed thro’ one and the same Tube of Iron, jointed in several Pieces, to bring them round the Wall and Turnings of the Chimney, where they are discharged: but never fail to send out some part of the Air impregnated with Sulphur, so as to occasion a disagreeable Smell, and often, Head-achs and Lowness of Spirits to those that are not accustomed to these Stoves.

Sixthly, The French Stoves are much the same as the Dutch; and I am informed, that they have many from Holland and Germany; but they have another Sort, which is the Mode at present; it resembles an old-fashion’d low Chest of Drawers with a flat Top, and has swelling or rising Mouldings on all Sides, which represent the Drawers: It is composed of several Pieces of burnt Earth, in the manner of our Earthen Ware, and is placed upon a Frame of Iron at Bottom, and all the Parts are luted together to complete the Body: It is likewise bound about with two Iron Belts to keep all tight, and has a little Door at one End like a Dutch Stove, where the Fire is put into it; it projects into the Room some distance from the Chimney, and gives Heat from the four Sides as well as the Top; There is a Flue proceeds from the back Part, and an Iron Pipe fixed upon it, to reach the Chimney; which carries the Smoke up the Funnel, and the Chimney is closed up all round the Iron Pipe; it is on the same Principles as the Dutch Stove, and is subject to many more Inconveniences, which are not necessary to be mentioned.

Seventhly, The Pensilvanian Stove-Grate comes lastly to be considered, which is a curious Invention indeed, contrived about Twelve or Fourteen Years ago, and particularly described by Mr. Franklin of Philadelphia, in a Treatise intitled, An Account of the New-Invented Pensilvanian Fire-Places, printed at Philadelphia in 1744. I have lately examined one that was made in that Country, all of cast Iron, which I believe to be the only one in England; and at the same time I saw a perfect Model of it, which discovered the whole Work at one View.

This Stove-Grate must infallibly cure most of the Inconveniences, with which the other sorts before-mentioned are attended, if the Smoke Passages can be kept clean. You have a full Sight of the Fire, nor does it lose any of the upright Heat, as in common Fire-Places, and smoky Chimnies will be often cured by it. This Stove has likewise the Advantage of a constant Supply of fresh Air, coming in warm through a Canal, in the Manner before described by Dr. Desaguliers, with this difference, that here the warm Air comes out on each Side of the Stove, and is better adapted to warm the lower Air of the Room, than if it came out higher in the Chimney.

In this Machine the Smoke first ascends, and then passing over the Iron Plates that compose the warm Air Box, descends to the Bottom, where it passes under a false Back, about three or four Inches from the true Back of the Chimney; then ascends a second time up the Funnel of the Chimney, and passes out at the Top. The Chimney is closed up on all Sides, between the false Back and Breast of the Chimney, except only in one Place, where is an Opening, with an Iron Door, large enough for a Chimney-Sweeper to creep through, to sweep the Funnel; but at all other times this Door is kept shut. There is also a Register fixed in the Smoke-Passage, to give more or less Vent, as shall be required.

The whole is a compleat Piece of Machinery, and was first intended for burning of Wood, which is the common Fuel of that Country; but, for that Reason, is not so well adapted to burn Sea-Coal, whose bituminous Quality would soon close up the narrow Smoke-Passage, and would often require cleaning, and become very troublesome, it being difficult to come at the Smoke-Passage; for if there be a Trap-Door made upon the Hearth, you cannot clean the Smoke-Passage any farther than to the Register, and there is no coming at the upper part without lifting up the Top of the Machine, which is always luted down, and fastened with Screw Nuts.

The Defects and Inconveniences that I have occasionally pointed out, in the Chimneys and Stoves already described, put me upon contriving a new Machine-Grate, which, upon Trial, answers all the Ends that I proposed by it.

It is built, indeed, and constructed upon almost the same Principles with the Pensilvanian Stove, but with greater Advantages; for instead of the narrow Passage for the Smoke in the Pensilvanian Stove, there is a Chamber made in the Brick-Work which effectually warms the Air-Box, and is all covered over like an Oven, except a narrow Passage made of Plate-Iron, with a Register in it, which has a Handle into the Room, and may be turned upon its Axis to such a Degree of Vent, as either to support or diminish, or even to extinguish the Fire. The Register is so contrived, that it will probably want no cleaning in two or three Years; but if it should, by lifting up the Chimney-Sweeper’s Door, it is done in one Minute; and is equally adapted to burn Coals or Wood, with more Safety and Ease than in a common Fire-Place. The Chamber behind the Stove is cleaned when the Chimney is swept, by taking out a Piece of concealed Iron, rabited into the Brick-Work at the Side of the Stove, and always whiten’d over with the Brick Back. The Chamber behind is of greater Use than warming the Air Box; for being almost all closed up, it is not only Proof against the Influence of the Houses and Chimnies about it that stand higher, but even against Eddy, or Whirl-winds, if they should come down the Chimney; the Force whereof is broke by the Top of the Chamber; and what comes through the small Opening where the Register is placed, is immediately expanded and loses its Force.

The whole of my Machine is less complex, and of more easy Construction than any others I have mentioned, and which is all I have ever seen or heard of; but has Advantages besides that, which no former Invention can pretend to.

First, It warms the Room equally all over, and the Fire appears the same as in a common Stove-Grate; yet any Place in the Room will be as warm as that by the Side of the Fire.

For this there is occular Demonstration, because Thermometers placed in the remotest Parts of the Room will not differ above one Degree, (a Difference which every body knows has scarce any Effect) from one placed by the Side of the Chimney.

Secondly, The Chimney is so intirely closed up, that if you sit near the Fire-Place, there is not the least cold Air from the Door, Window, or any Crevice, that can offend you, as in common Fire-Places; where, at the same time that you are burnt before, you are ready to freeze behind: but, on the contrary, the warm Air here goes out at the Door when opened, and will make you sensible of its Approach at Four or Five Feet distance before you enter the Door.

The Doors, indeed, ought to be kept shut; because otherwise the warm Air will be wasted, as with common Fires; but there is no manner of Occasion for Skreens of any sort, because the Fire cannot hurt the Face; neither can the cold Air offend the Back, as in common Rooms, where there is a common Stove-Grate, and a large Draught up the Chimney.

Thirdly, To be soon and agreeably warmed, is not the only Advantage we have from this Invention; but we are better warmed, at less than one Third of the usual Expence, at a moderate Computation. When the Mercury in my Thermometer, that was placed without Doors, stood the last Winter at Four Degrees below the Freezing Point, a Peck of Coals (i. e. the 144th Part of a Chaldron,) was sufficient to warm the Room for the whole Day, from Eight in the Morning to Eleven at Night. During all that Time the Mercury within the Room stood from 60 to 64 Degrees; much the same Degree of Heat with that of the 25th Day of last June, 1752, at Two o’Clock in the Afternoon; and, when that Observation was made, the Weather was as warm as usual at that Time of the Year.

But before I set up this Stove, which is one of the smallest, there was seldom spent, in the Room, less than a Bushel of Coals, and sometimes more, in one Day, according to the Degree of Cold; and then we were obliged to have a Skreen to keep off the cold Air from the Backs of those who sat near the Fire; and only that Part of the Room was warm which was nearest the Fire.

The Air that enters the Room, through the Iron Canal of the Air-Box, is both fresh and warm; and computing the Swiftness of its Motion with the Area of its Passage, it will appear, that Ten Barrels, or near 60 Cubic Feet of Air is hourly introduced from the external Air, if the Door of the Room be shut.

This warm Air comes into the Room with such Rapidity from the hot Iron Canal, that it turns several Paper Wheels with great Velocity, which are placed near the Opening that lets it into the Room. But as soon as the Door of the Room is opened, all the Wheels stand still; which proves what has been said before, That much warm Air is wasted in opening the Door; because the warm, or rarified Air, rushes through the cold Air with great Force: And the cold Air that comes in at the Door, being an over-balance to the Air entering from the hot Iron Canal of the Stove, entirely stops it from coming into the Room while the Door is open.

In like manner, if the Door of the Room be shut, and the Register that is fixed in the Smoke-Passage be turned so near as almost to shut it up, which may be done when the Coals upon the Fire are burnt to a Coke, then the whole Heat of the Fire will be forced into the Room, the warm Air will be stopt from coming through the hot Canal, and the Paper Wheels will stand still, as they did when the Door of the Room was open.

This may seem a little unaccountable, but, when considered, it is plain, that the warm Air from the hot Canal cannot come into the Room, which is already full of Air, and in a perfect State of Rest, because there is no Passage for it to go out at; the Register having closed up the Funnel, and the Doors and Windows of the Room being shut.

The Room, in this Case, will soon become suffocating, in the manner of a German Stove Room, and does exactly point out the Difference between that Stove and mine.

Whereas, on the contrary, when the Doors of the Room are shut, and the Register gives a proper Vent to the Fire, the warm Air, in this Case, is at Liberty to act as before, by warming the circumambient Air in its Passage from the Mantle-Piece to the Cieling, where it mixes slowly and imperceptibly with the grosser Air of the Room, which, in its turn, flows towards the Stove and Fire; part whereof feeds the Fire, and passes off with the Smoke; and the other part, after being rarified by the Heat of the Stove and Fire, ascends by the Mantle-piece to the Cieling, as it did before; repeating the like Circulation as long as there is any Heat in the Stove. By which it appears, that the warm Air that comes from the hot Iron Canal of the heated Air-Box, is sufficient to support the Fire, and carry off the Smoke, without the Assistance of any Air from the Crevices of the Doors and Windows of the Room.

By this Means, the Air in the Room is continually changed, and an Advantage gained that could never be obtained by any former Contrivance of the Kind; that at all Times the Air in the Room is as wholesome as the external Air; and, in some Respects, more so: For it is apparent, that the Air issuing into the Room through a hot Canal of Iron, can never acquire any noxious Quality; and, on the contrary, in damp Weather, when the Air is replete with Moisture, and noxious Particles, it will be purified in its Passage, and the Moisture and Vapours will be condensed, fall, and stick upon the Sides of the hot Canal.

Upon this, as well as other Accounts, this Stove will be extremely useful in Hospitals, and the Rooms of sick Persons, with great Advantage to the Patients: But this I submit to those who are better qualified to judge of such Matters.

Fourthly, In Common Stoves and Chimnies, the upright Heat (which has been computed to be Three Fourths of the whole) is intirely lost, as to the Purpose of warming the Room, or those that are in it. On the contrary, in this Stove-Grate, a very inconsiderable part of the Heat ascends with the Smoke, and all the rest is diffused gradually, and equally, over the whole Room.

Fifthly, This Fire-Place, thus prepared, prevents Smoke so effectually, and so certainly, in all Degrees and Variations of Wind and Weather, that the Inventor is willing to give his Machine, Gratis, if ever the least Smoke is perceived in any Room where it is erected; unless it may happen at the first lighting of the Fire, before the Air in the Funnel is put in Motion; but I have never yet seen that happen.

There is no Occasion for Chimney-Boards in Summer, for by turning the Register, the Air is shut out; so that both in Summer and Winter, the Furniture and Gilding, is preserved from Smoke and damp Air; which are the chief Causes of the one and the other’s being spoiled.

Sixthly, It will be obvious to every Person, who examines the Construction of this Machine, that the Chimney will not require sweeping in less than two or three Years; and that it is morally impossible the Chimney can ever take Fire.

Seventhly, It has been already observed, that no part of the current of Air, that passes continually through the Fire, is supplied from the Doors, Windows, or Crevices of the Room: For the same Reason, the Candles, in all sorts of Weather, will burn clear; the Light will be pleasant, equal, and steady; and there will be a considerable Saving in that Article.

Eighthly, When the Room is thoroughly warmed in the Day-time, it will cool but a few Degrees during the Night; and by shutting up the Fire-Place over Night, and excluding the external Air, the Fire will be found in the Morning without any sensible Diminution, ready to blaze out, by the Addition of a Stick of Wood, or a few Coals; which every body knows is an Advantage, that never could be obtained in common Chimnies, with a Coal Fire, without a great Expence, and much Danger.

These, and many other Advantages, that would be tedious to enumerate at present, will be found to result from this useful Invention. Several of the Stove-Grates are already set up; and Orders given for the erecting others in many Houses in London and the Country.

Some are of Cast Iron, in its plain, natural Colour; and others have a Case, richly ornamented, that is put on, and taken off, at Pleasure. The Inventor hopes he shall be permitted to publish the Names and Places of Abode, of those Noblemen and Gentlemen, who have encouraged this undertaking.

By this Method it will be in the Power of those who incline to become Purchasers, to inform themselves of the Truth of every Particular, by Persons of undoubted Credit and Veracity; and to know, with Certainty, what they are to expect, without laying out their Money, upon what they might suppose, an unexperimented Project; the Success whereof might otherwise be uncertain.

There are Three Sizes of these Stove-Grates, adapted to the Dimensions of the Rooms where they are set up. They are all made of Cast Iron, which will endure longer, and come much cheaper, than if they were made of wrought Iron.

| Ft. | In. | Pts.
The smallest Size, Price 7l. 7s. set up | High | 2 | 3 | 0 | over all
Broad in Front | 1 | 5 | 0
Depth from Front to Back | 1 | 0 | 0
The Space that contains the Fire within this Stove,
Broad in Front | 1 | 3 | 0
Depth of the Bars | 0 | 5 | 6
From Front to Back | 0 | 5 | 6
Middle Size, Pr. 10l. 10l. set up | High | 2 | 4 | 6 | over all
Broad in Front | 1 | 9 | 0
Depth from Front to Back | 1 | 0 | 0
The Space that contains the Fire within this Stove,
Broad in Front | 1 | 7 | 6
Depth of the Bars | 0 | 8 | 0
From Front to Back | 0 | 8 | 0
Largest Size, Pr. 13l. 13l. set up | High | 2 | 10 | 0 | over all
Broad in Front | 0 | 2 | 4
Depth from Front to Back | 1 | 4 | 6
The Space that contains the Fire within this Stove,
Broad in Front | 2 | 3 | 0
Depth of the Bars | 0 | 10 | 6
From Front to Back | 1 | 0 | 0 |

I find, by my own Experience, that the smallest Size of these Stoves, will warm a Room of Twelve or Fourteen Foot Square, or the largest Dressing Closet. The Middle-sized Grate will warm a Room of 20 Feet + 26, and 12 or 14 Feet high. The largest Size will warm a Room of 50 Feet by 25, and about 20 or 22 Feet high.

As I have not advanced any thing, but what I have proved from my own Experience, I shall omit what might be said from the Testimony of others, to Time, and the real Merit of the Machine; which, in all Respects, will answer for itself. For the Beginning of this Attempt was founded upon Theory and Mechanick Principles, supported by Observation and Experience of what had happened before.

But had not the same Observation and Experience, likewise confirmed the Use of this, and all the Advantages mentioned, I should not have offered it to the Publick.

Jermyn-Street, March 22, 1753.

ADVERTISEMENT.

The Inventor of this Stove-Grate has contrived a Stove for a Laundry, which answers all the Ends desirable, without any other Fire, and at one Third part of the usual Expence that keeps a Fire in the common Way. It is moveable to any part of the Room; and stands on a boarded Floor with the greatest Safety. It likewise may be placed in a Room where there is no Chimney, and will serve for Airing large Rooms, far preferable to the common Braziers; it warms a Room sooner, with greater Safety, and much less Expence: For Half a Bushel of Coals will go farther than a Bushel of Charcoal in the common Way.

FINIS.

Transcriber’s Notes:

Punctuation has been made consistent.

Variations in spelling and hyphenation were retained as they appear in the original publication, except that obvious typographical errors have been corrected.

*** END OF THE PROJECT GUTENBERG EBOOK A DESCRIPTION OF A NEW-INVENTED STOVE-GRATE ***

Updated editions will replace the previous one—the old editions will be renamed.

Creating the works from print editions not protected by U.S. copyright law means that no one owns a United States copyright in these works, so the Foundation (and you!) can copy and distribute it in the United States without permission and without paying copyright royalties. Special rules, set forth in the General Terms of Use part of this license, apply to copying and distributing Project Gutenberg™ electronic works to protect the PROJECT GUTENBERG™ concept and trademark. Project Gutenberg is a registered trademark, and may not be used if you charge for an eBook, except by following the terms of the trademark license, including paying royalties for use of the Project Gutenberg trademark. If you do not charge anything for copies of this eBook, complying with the trademark license is very easy. You may use this eBook for nearly any purpose such as creation of derivative works, reports, performances and research. Project Gutenberg eBooks may be modified and printed and given away—you may do practically ANYTHING in the United States with eBooks not protected by U.S. copyright law. Redistribution is subject to the trademark license, especially commercial redistribution.

START: FULL LICENSE

THE FULL PROJECT GUTENBERG LICENSE

PLEASE READ THIS BEFORE YOU DISTRIBUTE OR USE THIS WORK

To protect the Project Gutenberg™ mission of promoting the free distribution of electronic works, by using or distributing this work (or any other work associated in any way with the phrase “Project Gutenberg”), you agree to comply with all the terms of the Full Project Gutenberg™ License available with this file or online at www.gutenberg.org/license.

Section 1. General Terms of Use and Redistributing Project Gutenberg™ electronic works

1.A. By reading or using any part of this Project Gutenberg™ electronic work, you indicate that you have read, understand, agree to and accept all the terms of this license and intellectual property (trademark/copyright) agreement. If you do not agree to abide by all the terms of this agreement, you must cease using and return or destroy all copies of Project Gutenberg™ electronic works in your possession. If you paid a fee for obtaining a copy of or access to a Project Gutenberg™ electronic work and you do not agree to be bound by the terms of this agreement, you may obtain a refund from the person or entity to whom you paid the fee as set forth in paragraph 1.E.8.

1.B. “Project Gutenberg” is a registered trademark. It may only be used on or associated in any way with an electronic work by people who agree to be bound by the terms of this agreement. There are a few things that you can do with most Project Gutenberg™ electronic works even without complying with the full terms of this agreement. See paragraph 1.C below. There are a lot of things you can do with Project Gutenberg™ electronic works if you follow the terms of this agreement and help preserve free future access to Project Gutenberg™ electronic works. See paragraph 1.E below.

1.C. The Project Gutenberg Literary Archive Foundation (“the Foundation” or PGLAF), owns a compilation copyright in the collection of Project Gutenberg™ electronic works. Nearly all the individual works in the collection are in the public domain in the United States. If an individual work is unprotected by copyright law in the United States and you are located in the United States, we do not claim a right to prevent you from copying, distributing, performing, displaying or creating derivative works based on the work as long as all references to Project Gutenberg are removed. Of course, we hope that you will support the Project Gutenberg™ mission of promoting free access to electronic works by freely sharing Project Gutenberg™ works in compliance with the terms of this agreement for keeping the Project Gutenberg™ name associated with the work. You can easily comply with the terms of this agreement by keeping this work in the same format with its attached full Project Gutenberg™ License when you share it without charge with others.

1.D. The copyright laws of the place where you are located also govern what you can do with this work. Copyright laws in most countries are in a constant state of change. If you are outside the United States, check the laws of your country in addition to the terms of this agreement before downloading, copying, displaying, performing, distributing or creating derivative works based on this work or any other Project Gutenberg™ work. The Foundation makes no representations concerning the copyright status of any work in any country other than the United States.

1.E. Unless you have removed all references to Project Gutenberg:

1.E.1. The following sentence, with active links to, or other immediate access to, the full Project Gutenberg™ License must appear prominently whenever any copy of a Project Gutenberg™ work (any work on which the phrase “Project Gutenberg” appears, or with which the phrase “Project Gutenberg” is associated) is accessed, displayed, performed, viewed, copied or distributed:

This eBook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this eBook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

1.E.2. If an individual Project Gutenberg™ electronic work is derived from texts not protected by U.S. copyright law (does not contain a notice indicating that it is posted with permission of the copyright holder), the work can be copied and distributed to anyone in the United States without paying any fees or charges. If you are redistributing or providing access to a work with the phrase “Project Gutenberg” associated with or appearing on the work, you must comply either with the requirements of paragraphs 1.E.1 through 1.E.7 or obtain permission for the use of the work and the Project Gutenberg™ trademark as set forth in paragraphs 1.E.8 or 1.E.9.

1.E.3. If an individual Project Gutenberg™ electronic work is posted with the permission of the copyright holder, your use and distribution must comply with both paragraphs 1.E.1 through 1.E.7 and any additional terms imposed by the copyright holder. Additional terms will be linked to the Project Gutenberg™ License for all works posted with the permission of the copyright holder found at the beginning of this work.

1.E.4. Do not unlink or detach or remove the full Project Gutenberg™ License terms from this work, or any files containing a part of this work or any other work associated with Project Gutenberg™.

1.E.5. Do not copy, display, perform, distribute or redistribute this electronic work, or any part of this electronic work, without prominently displaying the sentence set forth in paragraph 1.E.1 with active links or immediate access to the full terms of the Project Gutenberg™ License.

1.E.6. You may convert to and distribute this work in any binary, compressed, marked up, nonproprietary or proprietary form, including any word processing or hypertext form. However, if you provide access to or distribute copies of a Project Gutenberg™ work in a format other than “Plain Vanilla ASCII” or other format used in the official version posted on the official Project Gutenberg™ website (www.gutenberg.org), you must, at no additional cost, fee or expense to the user, provide a copy, a means of exporting a copy, or a means of obtaining a copy upon request, of the work in its original “Plain Vanilla ASCII” or other form. Any alternate format must include the full Project Gutenberg™ License as specified in paragraph 1.E.1.

1.E.7. Do not charge a fee for access to, viewing, displaying, performing, copying or distributing any Project Gutenberg™ works unless you comply with paragraph 1.E.8 or 1.E.9.

1.E.8. You may charge a reasonable fee for copies of or providing access to or distributing Project Gutenberg™ electronic works provided that:

- • You pay a royalty fee of 20% of the gross profits you derive from the use of Project Gutenberg™ works calculated using the method you already use to calculate your applicable taxes. The fee is owed to the owner of the Project Gutenberg™ trademark, but he has agreed to donate royalties under this paragraph to the Project Gutenberg Literary Archive Foundation. Royalty payments must be paid within 60 days following each date on which you prepare (or are legally required to prepare) your periodic tax returns. Royalty payments should be clearly marked as such and sent to the Project Gutenberg Literary Archive Foundation at the address specified in Section 4, “Information about donations to the Project Gutenberg Literary Archive Foundation.”

- • You provide a full refund of any money paid by a user who notifies you in writing (or by e-mail) within 30 days of receipt that s/he does not agree to the terms of the full Project Gutenberg™ License. You must require such a user to return or destroy all copies of the works possessed in a physical medium and discontinue all use of and all access to other copies of Project Gutenberg™ works.

- • You provide, in accordance with paragraph 1.F.3, a full refund of any money paid for a work or a replacement copy, if a defect in the electronic work is discovered and reported to you within 90 days of receipt of the work.

- • You comply with all other terms of this agreement for free distribution of Project Gutenberg™ works.

1.E.9. If you wish to charge a fee or distribute a Project Gutenberg™ electronic work or group of works on different terms than are set forth in this agreement, you must obtain permission in writing from the Project Gutenberg Literary Archive Foundation, the manager of the Project Gutenberg™ trademark. Contact the Foundation as set forth in Section 3 below.

1.F.

1.F.1. Project Gutenberg volunteers and employees expend considerable effort to identify, do copyright research on, transcribe and proofread works not protected by U.S. copyright law in creating the Project Gutenberg™ collection. Despite these efforts, Project Gutenberg™ electronic works, and the medium on which they may be stored, may contain “Defects,” such as, but not limited to, incomplete, inaccurate or corrupt data, transcription errors, a copyright or other intellectual property infringement, a defective or damaged disk or other medium, a computer virus, or computer codes that damage or cannot be read by your equipment.

1.F.2. LIMITED WARRANTY, DISCLAIMER OF DAMAGES - Except for the “Right of Replacement or Refund” described in paragraph 1.F.3, the Project Gutenberg Literary Archive Foundation, the owner of the Project Gutenberg™ trademark, and any other party distributing a Project Gutenberg™ electronic work under this agreement, disclaim all liability to you for damages, costs and expenses, including legal fees. YOU AGREE THAT YOU HAVE NO REMEDIES FOR NEGLIGENCE, STRICT LIABILITY, BREACH OF WARRANTY OR BREACH OF CONTRACT EXCEPT THOSE PROVIDED IN PARAGRAPH 1.F.3. YOU AGREE THAT THE FOUNDATION, THE TRADEMARK OWNER, AND ANY DISTRIBUTOR UNDER THIS AGREEMENT WILL NOT BE LIABLE TO YOU FOR ACTUAL, DIRECT, INDIRECT, CONSEQUENTIAL, PUNITIVE OR INCIDENTAL DAMAGES EVEN IF YOU GIVE NOTICE OF THE POSSIBILITY OF SUCH DAMAGE.

1.F.3. LIMITED RIGHT OF REPLACEMENT OR REFUND - If you discover a defect in this electronic work within 90 days of receiving it, you can receive a refund of the money (if any) you paid for it by sending a written explanation to the person you received the work from. If you received the work on a physical medium, you must return the medium with your written explanation. The person or entity that provided you with the defective work may elect to provide a replacement copy in lieu of a refund. If you received the work electronically, the person or entity providing it to you may choose to give you a second opportunity to receive the work electronically in lieu of a refund. If the second copy is also defective, you may demand a refund in writing without further opportunities to fix the problem.

1.F.4. Except for the limited right of replacement or refund set forth in paragraph 1.F.3, this work is provided to you ‘AS-IS’, WITH NO OTHER WARRANTIES OF ANY KIND, EXPRESS OR IMPLIED, INCLUDING BUT NOT LIMITED TO WARRANTIES OF MERCHANTABILITY OR FITNESS FOR ANY PURPOSE.

1.F.5. Some states do not allow disclaimers of certain implied warranties or the exclusion or limitation of certain types of damages. If any disclaimer or limitation set forth in this agreement violates the law of the state applicable to this agreement, the agreement shall be interpreted to make the maximum disclaimer or limitation permitted by the applicable state law. The invalidity or unenforceability of any provision of this agreement shall not void the remaining provisions.

1.F.6. INDEMNITY - You agree to indemnify and hold the Foundation, the trademark owner, any agent or employee of the Foundation, anyone providing copies of Project Gutenberg™ electronic works in accordance with this agreement, and any volunteers associated with the production, promotion and distribution of Project Gutenberg™ electronic works, harmless from all liability, costs and expenses, including legal fees, that arise directly or indirectly from any of the following which you do or cause to occur: (a) distribution of this or any Project Gutenberg™ work, (b) alteration, modification, or additions or deletions to any Project Gutenberg™ work, and (c) any Defect you cause.

Section 2. Information about the Mission of Project Gutenberg™

Project Gutenberg™ is synonymous with the free distribution of electronic works in formats readable by the widest variety of computers including obsolete, old, middle-aged and new computers. It exists because of the efforts of hundreds of volunteers and donations from people in all walks of life.

Volunteers and financial support to provide volunteers with the assistance they need are critical to reaching Project Gutenberg™’s goals and ensuring that the Project Gutenberg™ collection will remain freely available for generations to come. In 2001, the Project Gutenberg Literary Archive Foundation was created to provide a secure and permanent future for Project Gutenberg™ and future generations. To learn more about the Project Gutenberg Literary Archive Foundation and how your efforts and donations can help, see Sections 3 and 4 and the Foundation information page at www.gutenberg.org.

Section 3. Information about the Project Gutenberg Literary Archive Foundation

The Project Gutenberg Literary Archive Foundation is a non-profit 501(c)(3) educational corporation organized under the laws of the state of Mississippi and granted tax exempt status by the Internal Revenue Service. The Foundation’s EIN or federal tax identification number is 64-6221541. Contributions to the Project Gutenberg Literary Archive Foundation are tax deductible to the full extent permitted by U.S. federal laws and your state’s laws.

The Foundation’s business office is located at 809 North 1500 West, Salt Lake City, UT 84116, (801) 596-1887. Email contact links and up to date contact information can be found at the Foundation’s website and official page at www.gutenberg.org/contact

Section 4. Information about Donations to the Project Gutenberg Literary Archive Foundation

Project Gutenberg™ depends upon and cannot survive without widespread public support and donations to carry out its mission of increasing the number of public domain and licensed works that can be freely distributed in machine-readable form accessible by the widest array of equipment including outdated equipment. Many small donations ($1 to $5,000) are particularly important to maintaining tax exempt status with the IRS.

The Foundation is committed to complying with the laws regulating charities and charitable donations in all 50 states of the United States. Compliance requirements are not uniform and it takes a considerable effort, much paperwork and many fees to meet and keep up with these requirements. We do not solicit donations in locations where we have not received written confirmation of compliance. To SEND DONATIONS or determine the status of compliance for any particular state visit www.gutenberg.org/donate.

While we cannot and do not solicit contributions from states where we have not met the solicitation requirements, we know of no prohibition against accepting unsolicited donations from donors in such states who approach us with offers to donate.

International donations are gratefully accepted, but we cannot make any statements concerning tax treatment of donations received from outside the United States. U.S. laws alone swamp our small staff.

Please check the Project Gutenberg web pages for current donation methods and addresses. Donations are accepted in a number of other ways including checks, online payments and credit card donations. To donate, please visit: www.gutenberg.org/donate.

Section 5. General Information About Project Gutenberg™ electronic works

Professor Michael S. Hart was the originator of the Project Gutenberg™ concept of a library of electronic works that could be freely shared with anyone. For forty years, he produced and distributed Project Gutenberg™ eBooks with only a loose network of volunteer support.

Project Gutenberg™ eBooks are often created from several printed editions, all of which are confirmed as not protected by copyright in the U.S. unless a copyright notice is included. Thus, we do not necessarily keep eBooks in compliance with any particular paper edition.

Most people start at our website which has the main PG search facility: www.gutenberg.org.

This website includes information about Project Gutenberg™, including how to make donations to the Project Gutenberg Literary Archive Foundation, how to help produce our new eBooks, and how to subscribe to our email newsletter to hear about new eBooks.

Table of Contents

- A DESCRIPTION Of a New-Invented Stove-Grate.

- Transcriber’s Notes:

- THE FULL PROJECT GUTENBERG LICENSE